Oracle WebLogic Server SIP Container Installation Guide 11g Release 1 (11.1.1)

11g Release 1 (11.1.1)

E15460-02

Contents

Title and Copyright Information

Preface

- Audience

- Documentation Accessibility

- Related Documents

- Conventions

1 Installing Oracle WebLogic SIP Container Base Platform

- 1.1 Installing Oracle WebLogic Server SIP Container

Index

Oracle® WebLogic Server SIP Container

Installation Guide

11g Release 1 (11.1.1)

E15460-02

January 2011

Oracle WebLogic Server SIP Container Installation Guide 11g Release 1 (11.1.1)

E15460-02

Copyright © 2006, 2011, Oracle and/or its affiliates. All rights reserved.

This software and related documentation are provided under a license agreement containing restrictions on use and disclosure and are protected by intellectual property laws. Except as expressly permitted in your license agreement or allowed by law, you may not use, copy, reproduce, translate, broadcast, modify, license, transmit, distribute, exhibit, perform, publish, or display any part, in any form, or by any means. Reverse engineering, disassembly, or decompilation of this software, unless required by law for interoperability, is prohibited.

The information contained herein is subject to change without notice and is not warranted to be error-free. If you find any errors, please report them to us in writing.

If this software or related documentation is delivered to the U.S. Government or anyone licensing it on behalf of the U.S. Government, the following notice is applicable:

U.S. GOVERNMENT RIGHTS Programs, software, databases, and related documentation and technical data delivered to U.S. Government customers are "commercial computer software" or "commercial technical data" pursuant to the applicable Federal Acquisition Regulation and agency-specific supplemental regulations. As such, the use, duplication, disclosure, modification, and adaptation shall be subject to the restrictions and license terms set forth in the applicable Government contract, and, to the extent applicable by the terms of the Government contract, the additional rights set forth in FAR 52.227-19, Commercial Computer Software License (December 2007). Oracle USA, Inc., 500 Oracle Parkway, Redwood City, CA 94065.

This software is developed for general use in a variety of information management applications. It is not developed or intended for use in any inherently dangerous applications, including applications which may create a risk of personal injury. If you use this software in dangerous applications, then you shall be responsible to take all appropriate fail-safe, backup, redundancy, and other measures to ensure the safe use of this software. Oracle Corporation and its affiliates disclaim any liability for any damages caused by use of this software in dangerous applications.

Oracle is a registered trademark of Oracle Corporation and/or its affiliates. Other names may be trademarks of their respective owners.

This software and documentation may provide access to or information on content, products, and services from third parties. Oracle Corporation and its affiliates are not responsible for and expressly disclaim all warranties of any kind with respect to third-party content, products, and services. Oracle Corporation and its affiliates will not be responsible for any loss, costs, or damages incurred due to your access to or use of third-party content, products, or services.

Preface

This preface contains the following topics:

- Audience

- Documentation Accessibility

- Related Documents

- Conventions

Audience

This guide is intended for system administrators and developers who want to install and use Oracle WebLogic SIP Container.

Documentation Accessibility

Our goal is to make Oracle products, services, and supporting documentation accessible to all users, including users that are disabled. To that end, our documentation includes features that make information available to users of assistive technology. This documentation is available in HTML format, and contains markup to facilitate access by the disabled community. Accessibility standards will continue to evolve over time, and Oracle is actively engaged with other market-leading technology vendors to address technical obstacles so that our documentation can be accessible to all of our customers. For more information, visit the Oracle Accessibility Program Web site at http://www.oracle.com/accessibility/.

Accessibility of Code Examples in Documentation

Screen readers may not always correctly read the code examples in this document. The conventions for writing code require that closing braces should appear on an otherwise empty line; however, some screen readers may not always read a line of text that consists solely of a bracket or brace.

Accessibility of Links to External Web Sites in Documentation

This documentation may contain links to Web sites of other companies or organizations that Oracle does not own or control. Oracle neither evaluates nor makes any representations regarding the accessibility of these Web sites.

Deaf/Hard of Hearing Access to Oracle Support Services

To reach Oracle Support Services, use a telecommunications relay service (TRS) to call Oracle Support at 1.800.223.1711. An Oracle Support Services engineer will handle technical issues and provide customer support according to the Oracle service request process. Information about TRS is available at http://www.fcc.gov/cgb/consumerfacts/trs.html, and a list of phone numbers is available at http://www.fcc.gov/cgb/dro/trsphonebk.html.

Related Documents

For more information, see the following documents:

- Oracle WebLogic SIP Container Administrator's Guide

- Oracle WebLogic SIP Container Developer's Guide

- Oracle WebLogic SIP Container Release Notes

Conventions

The following text conventions are used in this document:

Convention

Meaning

boldface

Boldface type indicates graphical user interface elements associated with an action, or terms defined in text or the glossary.

italic

Italic type indicates book titles, emphasis, or placeholder variables for which you supply particular values.

monospace

Monospace type indicates commands within a paragraph, URLs, code in examples, text that appears on the screen, or text that you enter.

1 Installing Oracle WebLogic SIP Container Base Platform

This chapter describes how to install Oracle WebLogic Server SIP Container, and contains the following section:

- Section 1.1, "Installing Oracle WebLogic Server SIP Container"

These installation instructions are written using UNIX syntax and assume a bash shell. You can adapt them for your shell on UNIX or use the corresponding Microsoft Windows commands and syntax when installing on Microsoft Windows.

1.1 Installing Oracle WebLogic Server SIP Container

Perform the following steps to install Oracle WebLogic Server SIP Container:

1. Give executable permission on the installer file (if needed).

2. Run one of the following commands, depending on your operating system. For example:

- On Linux: ./owlcs103_linux32.bin

- On Windows: owlcs103_win32.exe

The installation files are extracted and the Welcome screen appears.

3. On the Welcome screen click Next. The Choose Middleware Home Directory appears.

Note:

The Middleware Home Directory is the root directory for the OWLSC Base Platform installation. Middleware Home Directory is referred to as MW_HOME in this book. When you see MW_HOME or $MW_HOME, that means the absolute path to your Middleware Home directory.

4. In the Choose Middleware Home Directory screen, select Create a New Middleware Home (do not try to install into an existing middleware directory).

5. Enter the absolute path to the middleware home.

6. Click Next. The Register for Security Updates screen appears.

7. In the Register for Security Updates screen you can optionally enter the following:

- An e-mail address for receiving updates on security issues (recommended).

- Select the checkbox and enter your My Oracle Support password to receive security updates through My Oracle Support. For more information, see http://www.oracle.com/support/policies.html.

8. Click Next. The Choose Install Types screen appears.

9. On the Choose Install Types screen select Typical. Click Next. The Choose Product Installation Directories screen appears.

10. Though you can change locations, Oracle Corporation recommends that you use the default locations whenever possible. Click Next.

11. If on a Windows operating system, the Choose Shortcut Location screen appears. If you so choose, select the All Users Start Menu folder and click Next. The Installation Summary screen appears.

12. On the Installation Summary screen, click Next.

13. On the Installation Complete screen click Next.
The installation is complete.

Index

O

O

Oracle WebLogic SIP Container Base Platform

installing, 1

Oracle WebLogic SIP Server

installing, 1.1

Copyright © 2006, 2011, Oracle and/or its affiliates. All rights reserved.