Contents

Title and Copyright Information

Preface

Audience

Documentation Accessibility

Related Documents

1 Oracle Exadata Storage Server Metrics

Metrics Appearing in the All Metrics Page

Celldisk Statistics Category

Cell Offload Efficiency Category

Cell Statistics Category

Cell Summary Statistics Category

Consumer Group Statistics Category

Critical Event Category

Database Resource Manager Category

Database Statistics Category

Filesystem Utilization

Flashcache Statistics Category

Griddisk Statistics Category

Interconnect_SKGXP Statistics Category

LUN Statistics Category

Physicaldisk Statistics Category

Response Category

Metrics Appearing in the View Configuration Page

Cell Celldisk Configuration Category

Cell Griddisk Configuration Category

Cell IORM Configuration Category

Cell LUN Configuration Category

Cell Physicaldisk Configuration Category

Oracle Cell Configuration Category

2 Oracle Exadata Storage Server Reports

Oracle® Enterprise Manager

System Monitoring Plug-In Metric Reference Manual for Oracle Exadata Storage Server

Release 1.2.4.0.0

E13105-05

September 2010

Oracle Enterprise Manager System Monitoring Plug-In Metric Reference Manual for Oracle Exadata Storage Server Release 1.2.4.0.0

E13105-05

Copyright © 2010, Oracle and/or its affiliates. All rights reserved.

Primary Author: Aravind Jayaraaman

This software and related documentation are provided under a license agreement containing restrictions on use and disclosure and are protected by intellectual property laws. Except as expressly permitted in your license agreement or allowed by law, you may not use, copy, reproduce, translate, broadcast, modify, license, transmit, distribute, exhibit, perform, publish, or display any part, in any form, or by any means. Reverse engineering, disassembly, or decompilation of this software, unless required by law for interoperability, is prohibited.

The information contained herein is subject to change without notice and is not warranted to be error-free. If you find any errors, please report them to us in writing.

If this software or related documentation is delivered to the U.S. Government or anyone licensing it on behalf of the U.S. Government, the following notice is applicable:

U.S. GOVERNMENT RIGHTS Programs, software, databases, and related documentation and technical data delivered to U.S. Government customers are "commercial computer software" or "commercial technical data" pursuant to the applicable Federal Acquisition Regulation and agency-specific supplemental regulations. As such, the use, duplication, disclosure, modification, and adaptation shall be subject to the restrictions and license terms set forth in the applicable Government contract, and, to the extent applicable by the terms of the Government contract, the additional rights set forth in FAR 52.227-19, Commercial Computer Software License (December 2007). Oracle USA, Inc., 500 Oracle Parkway, Redwood City, CA 94065.

This software is developed for general use in a variety of information management applications. It is not developed or intended for use in any inherently dangerous applications, including applications which may create a risk of personal injury. If you use this software in dangerous applications, then you shall be responsible to take all appropriate fail-safe, backup, redundancy, and other measures to ensure the safe use of this software. Oracle Corporation and its affiliates disclaim any liability for any damages caused by use of this software in dangerous applications.

Oracle is a registered trademark of Oracle Corporation and/or its affiliates. Other names may be trademarks of their respective owners.

This software and documentation may provide access to or information on content, products, and services from third parties. Oracle Corporation and its affiliates are not responsible for and expressly disclaim all warranties of any kind with respect to third-party content, products, and services. Oracle Corporation and its affiliates will not be responsible for any loss, costs, or damages incurred due to your access to or use of third-party content, products, or services.

Preface

This manual is a compilation of the plug-ins metrics provided in Oracle Enterprise Manager Grid Control for Oracle Exadata Storage Server.

Audience

This document is intended for Oracle Enterprise Manager Grid Control users interested in plug-ins metrics and reports for Oracle Exadata Storage Server.

Documentation Accessibility

Our goal is to make Oracle products, services, and supporting documentation accessible to all users, including users that are disabled. To that end, our documentation includes features that make information available to users of assistive technology. This documentation is available in HTML format, and contains markup to facilitate access by the disabled community. Accessibility standards will continue to evolve over time, and Oracle is actively engaged with other market-leading technology vendors to address technical obstacles so that our documentation can be accessible to all of our customers. For more information, visit the Oracle Accessibility Program Web site at http://www.oracle.com/accessibility/.

Accessibility of Code Examples in Documentation

Screen readers may not always correctly read the code examples in this document. The conventions for writing code require that closing braces should appear on an otherwise empty line; however, some screen readers may not always read a line of text that consists solely of a bracket or brace.

Accessibility of Links to External Web Sites in Documentation

This documentation may contain links to Web sites of other companies or organizations that Oracle does not own or control. Oracle neither evaluates nor makes any representations regarding the accessibility of these Web sites.

Deaf/Hard of Hearing Access to Oracle Support Services

To reach Oracle Support Services, use a telecommunications relay service (TRS) to call Oracle Support at 1.800.223.1711. An Oracle Support Services engineer will handle technical issues and provide customer support according to the Oracle service request process. Information about TRS is available at http://www.fcc.gov/cgb/consumerfacts/trs.html, and a list of phone numbers is available at http://www.fcc.gov/cgb/dro/trsphonebk.html.

Related Documents

For more information, see the following documents:

Oracle Exadata Storage Server Software User's Guide

Oracle Enterprise Manager System Monitoring Plug-In Installation Guide for Oracle Exadata Storage Server

Oracle Enterprise Manager Concepts Guide

Oracle Enterprise Manager Grid Control Installation Guide

You can find these documents in the Oracle Enterprise Manager Grid Control documentation library at:

http://www.oracle.com/technology/documentation/oem.html

1 Oracle Exadata Storage Server Metrics

This chapter provides descriptions for all Oracle Exadata Storage Server metric categories, and the tables list and describe associated metrics for each category.

The chapter is divided into two parts:

Metrics Appearing in the All Metrics Page

Metrics Appearing in the View Configuration Page

The first part describes the metrics that appear in the All Metrics page, and the second part describes the configuration metrics that appear in the View Configuration page.

Metrics Appearing in the All Metrics Page

This section describes the metrics that appear in the All Metrics page. To view the All Metrics page, go to the Oracle Exadata Storage Server Home page, and from the Related Links section, click All Metrics. In each of the individual metric pages, you can use the View Data list to refresh and collect data again from Oracle Exadata Storage Server.

Celldisk Statistics Category

This category provides statistical information about the celldisk.

Table 1-1 Celldisk Statistics Metrics

Metric
Description

Celldisk Large Read Latency/Req (msec)

Latency in milliseconds to read large blocks per request on a celldisk

Celldisk Large Write Latency/Req (msec)

Latency in milliseconds to write large blocks per request on a celldisk

Celldisk Read Requests/Sec

Number of requests to read large and small blocks on a celldisk per second

Celldisk Read Throughput/Sec (MB)

Number of megabytes read on a celldisk per second

Celldisk Small Read Latency/Req (msec)

Latency in milliseconds to read small blocks per request on a celldisk

Celldisk Small Write Latency/Req (msec)

Latency in milliseconds to write small blocks per request on a celldisk

Celldisk Write Requests/Sec

Number of requests to write large and small blocks on a celldisk per second

Celldisk Write Throughput/Sec (MB)

Number of megabytes written on a celldisk per second

Cell Offload Efficiency Category

To optimize the performance of queries that perform table and index scans, the database can offload data search and retrieval processing to the storage server. This category provides information about the offload efficiency.

Table 1-2 Cell Offload Efficiency Metrics

Metric
Description

Offload Efficiency

Ratio of data accessed by the storage cell to the data that is processed by the database. Larger values mean more offloading to the storage cell.

Cell Statistics Category

This category provides statistical information about the cell.

Table 1-3 Cell Statistics Metrics

Metric
Description

CPU Busy (%)

Percentage of time over the previous minute that the system CPUs were not idle (from /proc/stat)

Fan Count

Number of working fans on the cell

NIC IO Recv Req/Sec

Total number of IO packets received by interconnects per second

NIC IO Trans Req/Sec

Total number of IO packets transmitted by interconnects per second

NIC Non-Working Count

Number of non-working interconnects

Run Queue Length

Average number (over the preceding minute) of processes in the Linux run queue marked running or uninterruptible (from /proc/loadavg)

Temperature

Temperature (Celsius) of the server, provided by the BMC

Cell Summary Statistics Category

This category provides cell summary details.

Table 1-4 Cell Summary Statistics Metrics

Metric
Description

Avg Celldisk Read Requests

Average number of requests to read large and small blocks per celldisk per second

Avg Celldisk Reads (MB)

Average number of megabytes read on all the celldisks per second

Avg Celldisk Small Read Latency (msec)

Average latency in milliseconds to read large blocks per request on all the celldisk

Avg Celldisk Small Write Latency (msec)

Average latency in milliseconds to write large blocks per request on a celldisk

Avg Celldisk Write_Requests

Average number of requests to write large and small blocks per celldisk per second

Avg Celldisk Writes (MB)

Average number of megabytes written on all the celldisks per second

Max Celldisk Read Requests

Number of requests to read large and small blocks per second from the celldisk with the highest value

Max Celldisk Reads (MB)

Number of megabytes read per second from the celldisk with the highest value

Max Celldisk Small Read Latency (msec)

Latency in milliseconds to read small blocks from the celldisk with the highest value

Max Celldisk Small Write Latency (msec)

Latency in milliseconds to write small blocks from the celldisk with the highest value

Max Celldisk Write Requests

Number of requests to write large and small blocks per second from the celldisk with the highest value

Max Celldisk Writes (MB)

Number of megabytes written per second from the celldisk with the highest value

Total Celldisk Small Write Latency (msec)

Latency in milliseconds to write small blocks on all the celldisks

Total Celldisk Reads (MB)

Number of megabytes read on all the celldisks per second

Total Celldisk Small Read Latency (msec)

Total latency in milliseconds to read small blocks on all the celldisks

Total Celldisk Read Requests

Total number of requests to read large and small blocks on all the celldisks per second

Total Celldisk Write Requests

Total number of requests to write large and small blocks on all the celldisks per second

Total Celldisk Writes (MB)

Total number of megabytes written on all the celldisks per second

Consumer Group Statistics Category

This category provides statistical information about the consumer group.

Table 1-5 Consumer Group Statistics Metrics

Metric
Description

CG Large IO Requests/Sec

Number of large IO requests served for a consumer group per second

CG Large IO Wait/Request (msec)

IORM wait time in milliseconds for large IO in a consumer group. A large value indicates that the I/O workload from this consumer group is exceeding the allocation specified for it in the consumer group plan.

CG Small IO Requests/Sec

Number of small IO requests served for a consumer group per second

CG Small IO Wait/Request (msec)

IORM wait time in milliseconds for small IO in a consumer group. A large value indicates that the I/O workload from this consumer group is exceeding the allocation specified for it in the consumer group plan.

Metric Column

Metric column used for internal reports

Plan Type

Plan type used for internal reports

Critical Event Category

This category provides information about the alerts generated from the storage server.

Table 1-6 Critical Event Metrics

Metric
Description

Action

Action taken

Alert Begin Time

Time when the alert event was detected

Cell Alert

Identifier for an alert

Examined By

Alert verified by

Msg

Alert message

Notification

Notification sent

Sequence Begin Time

Starting time of the sequence

Severity

Severity of the alert. Values are Critical, Warning, Info.

Database Resource Manager Category

This category provides information about the database resource manager.

Table 1-7 Database Resource Manager Metrics

Metric
Description

Category Large IO Requests/Sec

Number of large IO requests served for a category per second

Category Large IO Wait/Request (msec)

IORM wait time in milliseconds for large IO in a category. A large value indicates that the I/O workload from this category is exceeding the allocation specified for it in the category plan.

Category Small IO Requests/Sec

Number of small IO requests served for a category per second

Category Small IO Wait/Request (msec)

IORM wait time in milliseconds for small IO in a category. A large value indicates that the I/O workload from this category is exceeding the allocation specified for it in the category plan.

Metric Column

Metric column used for internal reports

Plan Type

Plan type used for internal reports

Database Statistics Category

This category provides statistical information about the database.

Table 1-8 Database Statistics Metrics

Metric
Description

Database Large IO Requests/Sec

Number of large IO requests served for a database per second

Database Large IO Wait/Request (msec)

IORM wait time in milliseconds for large IO in a database. A large value indicates a heavy large I/O workload from this database

Database Small IO Requests/Sec

Number of small IO requests served for a database per second

Database Small IO Wait/Request (msec)

IORM wait time in milliseconds for small IO in a database. A large value indicates a heavy small I/O workload from this database.

Metric Column

Metric column used for internal reports

Plan Type

Plan type used for internal reports.

Filesystem Utilization

This category provides statistical information about the file system.

Table 1-9 Filesystem Utilization Metrics

Metric
Description

Filesystem Utilization

Percentage of total space currently used on the file system.

Flashcache Statistics Category

This category provides statistical information about the flash cache.

Table 1-10 Flashcache Statistics Metrics

Metric
Description

Flashcache Used (MB)

Number of megabytes used on FlashCache.

IO Errors/sec

Number of IO errors on FlashCache.

Keep Overwrite(MB/sec)

Number of megabytes pushed out of the FlashCache because of space limit for 'keep' objects.

Keep Read Requests Missed/sec

Number of read IO requests for 'keep' objects that did not find all data in FlashCache.

Keep Read Requests Skipped/sec

Number of read IO requests for 'keep' objects with a hint to bypass FlashCache.

Keep Read Requests/sec

Number of read IO requests for 'keep' objects satisfied from FlashCache.

Keep Read Throughput(MB/sec)

Number of megabytes read from FlashCache for 'keep' objects.

Keep Used(MB)

Number of megabytes used for 'keep' objects on FlashCache.

Keep Write Request/sec

Number of IO requests for 'keep' objects that resulted in FlashCache being populated with data.

Keep Write Throughput(MB/sec)

Number of megabytes written to FlashCache for 'keep' objects.

Read Requests Missed/sec

Number of read IO requests that did not find all the data in FlashCache.

Read Requests Skipped/sec

Number of read IO requests with a hint to bypass FlashCache.

Read Requests/sec

Number of read IO requests satisfied from FlashCache.

Read Throughput(MB/sec)

Number of megabytes read from FlashCache.

Reads Missed Throughput(MB/sec)

Number of megabytes read from disks because not all requested data was in FlashCache.

Reads Skipped Throughput(MB/sec)

Number of megabytes read from disks for IO requests with a hint to bypass FlashCache.

Write Requests/sec

Number of IO requests which resulted in FlashCache being populated with data.

Write Throughput(MB/sec)

Number of megabytes written to FlashCache.

Griddisk Statistics Category

This category provides statistical information about the grid disk.

Table 1-11 Griddisk Statistics Metrics

Metric
Description

Read Requests Per Sec

Number of requests to read large and small blocks on a griddisk per second

Read Throughput Per Sec (MB)

Number of megabytes read in large and small blocks on a griddisk per second

Write Requests Per Sec

Number of requests to read large and small blocks on a celldisk per second

Write Throughput Per Sec (MB)

Number of megabytes read in large and small blocks on a griddisk per second

Interconnect_SKGXP Statistics Category

This category provides statistical information about Interconnect_SKGXP.

Table 1-12 Interconnect_SKGXP Statistics Metrics

Metric
Description

Interconnect_MB_Transmitted

Cumulative number of megabytes transmitted to a particular host

Interconnect_MB_Dropped

Cumulative number of megabytes dropped during transmission to a particular host

Interconnect_MB_Resent

Cumulative number of megabytes retransmitted to a particular host

Interconnect_MB_Received

Cumulative number of megabytes received from a particular host

Interconnect_MB_RDMA_Dropped

Cumulative number of megabytes dropped during RDMA transmission to a particular host

Interconnect_MB_RDMA_Retry_Latency

Cumulative latency of the retry action during RDMA transmission to a particular host

LUN Statistics Category

This category provides statistical information about Logical Unit Number (LUN).

Table 1-13 LUN Statistics Metrics

Metric
Description

LUN status

Status of the LUN, which can be normal, warning, or critical.

Physicaldisk Statistics Category

This category provides statistical information about the physical disk.

Table 1-14 Physicaldisk Statistics Metrics

Metric
Description

Physicaldisk status

Status of the physical disk, which can be normal, warning, or critical.

Response Category

This category provides response metrics.

Table 1-15 Response Metrics

Metric
Description

Response Status

Status of the target

Metrics Appearing in the View Configuration Page

This section describes the metrics that appear in the View Configuration page. To view the View Configuration page, go to the Oracle Exadata Storage Server Home page, and from the Configuration section, click View Configuration.

Cell Celldisk Configuration Category

This category describes the Celldisk configuration metrics.

Table 1-16 Cell Celldisk Configuration Metrics

Metric
Description

Name

Unique name of the cell disk.

Cell Name

Name of the cell.

Realm Name

Name of the realm.

Status

Current status of the cell disk. Status can be normal or importRequired

Size (GB)

Total size of the cell disk.

LUN

ID of the LUN on which the cell disk is located.

Error Count

Number of errors that occurred on the cell disk.

Free Space (GB)

Amount of unused space available on the cell disk.

Device Partition

Operating system device name of the partition that is used by the cell disk.

Cell Griddisk Configuration Category

This category describes the Griddisk configuration metrics.

Table 1-17 Cell Griddisk Configuration Metrics

Metric
Description

Name

Unique name of the grid disk.

Cell Name

Name of the cell.

Realm Name

Name of the Realm.

Status

Current status of the grid disk. The value is active, inactive, or importRequired.

Size (GB)

Total size of the grid disk.

Creation Time

Time stamp when the grid disk was created.

Cell Disk

Name of the cell disk that contains the grid disk.

Lowest Offset (MB)

Lowest byte offset of the grid disk on the physical disk.

Error Count

Count of hardware errors detected by the cell disk containing this grid disk.

Available To

Indicates the names of the clients that can access this grid disk.

Cell IORM Configuration Category

This category describes the IORM configuration metrics.

Table 1-18 Cell IORM Configuration Metrics

Metric
Description

Name

Unique name of the IORM plan. The name value is automatically set to cellname_IORMPLAN.

Cell Name

Name of the cell.

Realm Name

Name of the realm.

Status

Current status of the IORM plan, either active or inactive.

Latency

Latency of the plan is currently not used.

Directive Type

Type of the plan INTER_DATABASE, CATEGORY and CONSUMERGROUP.

Database Name

Name of the database for which the priorities are relevant.

Priority Level 1 to Level 8

The priority of each directive type totals 100%. The various databases will have different priority percentages at different priority levels.

Role

This is currently not used.

Cell LUN Configuration Category

This category describes the LUN configuration metrics.

Table 1-19 Cell LUN Configuration Metrics

Metric
Description

Name

Unique name assigned to the LUN. This might be different (or extended from) the LUN ID if the ID is not unique.

Cell Name

Name of the cell.

Realm Name

Name of the realm.

Status

Status of the LUN, which can be normal, warning, or critical.

ID

Identifier assigned by the system.

Cell Disk

Name of the cell disk associated with the LUN. This is empty if the LUN is not associated with a cell disk.

Error Count

Number of errors on this LUN.

Raid Level

Value of the RAID level that is used on the LUN. For example: RAID 0.

Device Name

Operating system device name for the LUN. For example: /dev/cciss/c1d5.

Size (GB)

Raw size of the LUN before being converted to a cell disk.

UID

Unique identifier assigned by the system.

Auto Create

Set to either TRUE or FALSE to indicate whether the LUN was automatically created. Single-disk LUNs are automatically created when disks without LUNs are converted to cell disks. For example, CREATE DISK ALL creates single-disk LUNs for all physical disks without LU.Ns. These single-disk LUNs have this attribute set to TRUE.

Physical Drives

Physical disk names that form the LUN.

Cell Physicaldisk Configuration Category

This category describes the Physicaldisk configuration metrics.

Table 1-20 Cell Physicaldisk Configuration Metrics

Metric
Description

Name

Unique name of the physical disk.

Cell Name

Name of the cell.

Realm Name

Name of the realm.

Status

Status of the physical disk, which can be normal, warning, or critical.

ID

Identifier assigned by the system.

Make Model

Model description provided by the system.

LUN/s

List of LUNs converted from this physical disk.

Error Count

Number of errors on this physical disk.

Controller Firmware

Name of the Controller firmware.

Controller HW Version

Name of the controller version.

Physical Interface

Interface type used by the disk. For example, SAS.

Physical Firmware

System-assigned name of the firmware for the disk.

Size (GB)

Size of the disk.

Serial

System-assigned unique ID.

Usage Type

Intended use of the disk. For example, Data Drive.

Port

Port on the controller for this disk.

Insert Time

Time when the disk was inserted.

Oracle Cell Configuration Category

This category describes the Oracle cell configuration metrics.

Table 1-21 Oracle Cell Configuration Metrics

Metric
Description

Name

Unique name for the cell.

Status

Status of the cell.

Realm Name

Name assigned by the user as the cell realm.

ID

ID supplied by the hardware vendor.

Make Model

Make and model of the cell hardware supplied by the vendor.

Location

Location of the cell.

BMC Configured

Set to either TRUE or FALSE. If set to true, the hardware is configured to send SNMP traps to Management Server.

BMC Type

Name and version of the BMC.

IP Block

IP block.

Fan Count

Count of working fans and total fans, displayed as working/total.

Power Count

Count of power supplies, displayed as working/total. Not available on HP hardware.

Metric History Days

Number of days that metric history, alert history, and ADR files are retained. The default is 7 days.

SNMP Subscriber

List of hosts that subscribe to the SNMP alert notifications.

SMTP Server

SMTP e-mail server used to send alert notifications.

SMTP Port

SMTP e-mail server port used to send alert notifications.

IP Address 1 to Address 4

IP address 1 to 4 for the cell.

Kernel Version

Version of the host kernel software.

OSS Version

OS version.

Interconnect Count

Number of network interconnection cards.

CPU Count

Number of CPUs on the cell.

2 Oracle Exadata Storage Server Reports

This chapter provides a list of out-of-box reports available for System Monitoring Plug-In for Oracle Exadata Storage Server.

Table 2-1 Oracle Exadata Storage Server Reports

Report Name
Report Elements

Cell Performance

Shows the performance of the cell.

You can click the cell name from the Cell column to view details about the performance of the realm celldisk. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also click Click here for realm performance to view details about the performance of the realm.

Cell Filesystem Utilization

Shows the performance of the cell file system.

You can click the cell name from the Cell column to view details about the performance of the realm celldisk. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also click Click here for realm filesystem utilization to view details about the performance of the realm file system.

Realm Performance

Shows the performance of the realm.

You can click the cell name from the Cell column to view details about the performance of the realm celldisk. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also use the Search section to query for a particular cell in the realm. Leaving the search fields empty retrieves information for all cells in this realm.

CellDisk Performance

Shows the performance of the celldisk.

You can click the celldisk name from the Celldisk column to view details about the performance of the realm griddisk. You can click the cell name from the Cellname column to view details about the performance of the realm. You can click the LUN value from the LUN column to view details about the performance of the realm LUN. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also click Click here for realm celldisk performance to view details about the performance of the realm celldisk.

Realm Filesystem Utilization

Shows the performance of the realm file system.

You can click the cell name from the Cell column to view details about the performance of the realm celldisk. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also use the Search section to query for a particular cell and file system in the realm. Leaving the search fields empty retrieves information for all cells and file systems in this realm.

Realm CellDisk Performance

Shows the performance of the realm celldisk.

You can click the cell name from the CellName column to view details about the performance of the realm. You can click the celldisk name from the Celldisk column to view details about the performance of the realm griddisk. You can click the LUN value from the LUN column to view details about the performance of the realm LUN. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also use the Search section to query for a particular cell or celldisk. Leaving the search fields empty retrieves information for all cells and celldisks.

Griddisk Performance

Shows the performance of the griddisk.

You can click the cell name from the Cellname column to view details about the performance of the realm. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also click Click here for realm griddisk performance to view details about the performance of the realm griddisk.

Realm Griddisk Performance

Shows the performance of the realm griddisk.

You can click the cell name from the Cell column to view details about the performance of the realm. You can click the celldisk name from the Celldisk column to view details about the performance of the realm celldisk. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also use the Search section to query for a particular cell, celldisk, or griddisk. Leaving the search fields empty retrieves information for all cells, celldisks, and griddisks.

LUN Performance

Shows the performance of LUN.

You can click the LUN value to view details about the performance of the realm physical disk. You can click the cell name from the Cellname column to view details about the performance of the realm. You can click the celldisk name from the Celldisk column to view details about the performance of the realm celldisk. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also click Click here for realm LUN performance to view details about the performance of the realm LUN.

Realm LUN Performance

Shows the performance of the realm LUN.

You can click the LUN value to view details about the performance of the realm physical disk. You can click the celldisk name from the Celldisk column to view details about the performance of the realm celldisk. You can click the cell name from the Cellname column to view details about the performance of the realm. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also use the Search section to query for a particular cell, LUN, or celldisk. Leaving the search fields empty retrieves information for all cells, LUNs, and celldisks.

Physical Disk Performance

Shows the performance of the physical disk.

You can click the cell name from the Cellname column to view details about the performance of the realm. You can click the LUN value to view details about the performance of the realm LUN. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also click Click here for realm physical disk performance to view details about the performance of the realm physical disk.

Realm Physical Disk Performance

Shows the performance of the realm physical disk.

You can click the LUN value to view details about the performance of the realm LUN. You can click the cell name from the Cellname column to view details about the performance of the realm. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also use the Search section to query for a particular cell, LUN, or disk. Leaving the search fields empty retrieves information for all cells, LUNs, and disks.

IORM Database Performance

Shows the performance of the IORM database.

You can click the cell name from the Cellname column to view details about the performance of the realm. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also click Click here for realm iorm database performance to view details about the performance of the realm IORM database.

Realm IORM Database Performance

Shows the performance of the realm IORM database.

You can click the cell name from the Cellname column to view details about the performance of the realm. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also use the Search section to query for a particular cell. Leaving the search fields empty retrieves information for all cells.

IORM Category Performance

Shows the performance of the IORM category.

You can click the cell name from the Cellname column to view details about the performance of the realm. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also click Click here for realm iorm category performance to view details about the performance of the realm IORM category.

Realm IORM Category Performance

Shows the performance of the realm IORM category.

You can click the cell name from the Cellname column to view details about the performance of the realm. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also use the Search section to query for a particular cell. Leaving the search fields empty retrieves information for all cells.

IORM Consumer Group Performance

Shows the performance of the IORM consumer group.

You can click the cell name from the Cellname column to view details about the performance of the realm. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also click Click here for realm consumer group performance to view details about the performance of the realm IORM consumer group.

Realm IORM Consumer Group Performance

Shows the performance of the realm IORM consumer group.

You can click the cell name from the Cellname column to view details about the performance of the realm. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also use the Search section to query for a particular cell. Leaving the search fields empty retrieves information for all cells.

Cell Configuration

Shows configuration details about the cell.

You can also click Click here for realm configuration performance to view configuration details about the realm.

Realm Configuration

Shows configuration details about the realm.

You can click the cell name from the Cell Name column to view configuration details about the realm griddisk.

You can also use the Search section to query for a particular cell. Leaving the search fields empty retrieves information for all cells.

Celldisk Configuration

Shows configuration details about the celldisk.

You can click the cell name from the Cell Name column to view configuration details about the realm. You can click the celldisk name from the Celldisk Name column to view configuration details about the realm griddisk. You can click the LUN value in the LUN column to view configuration details about the realm LUN. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also click Click here for realm celldisk configuration performance to view configuration details about the realm celldisk.

Realm Celldisk Configuration

Shows configuration details about the realm celldisk.

You can click the cell name from the Cell Name column to view configuration details about the realm. You can click the Celldisk name from the Celldisk Name column to view configuration details about the realm griddisk. You can click the LUN value in the LUN column to view configuration details about the realm LUN. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also use the Search section to query for a particular cell or celldisk. Leaving the search fields empty retrieves information for all cells and celldisks.

Griddisk Configuration

Shows configuration details about the griddisk.

You can click the celldisk name from the Celldisk column to view configuration details about the realm celldisk. You can click the Cell name from the Cell Name column to view configuration details about the realm. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also click Click here for realm griddisk configuration to view configuration details about the realm griddisk.

Realm Griddisk Configuration

Shows configuration details about the realm griddisk.

You can click the celldisk name from the Celldisk column to view configuration details about the realm celldisk. You can click the cell name from the Cell Name column to view configuration details about the realm. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also use the Search section to query for a particular cell, celldisk, or griddisk. Leaving the search fields empty retrieves information for all cells, celldisks, and griddisks.

LUN Configuration

Shows configuration details about the LUN.

You can click the LUN value to view configuration details about the realm physical disk. You can click the celldisk name from the Celldisk column to view configuration details about the realm celldisk. You can click the cell name from the Cellname column to view configuration details about the realm. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also click Click here for realm LUN configuration to view configuration details about the realm LUN.

Realm LUN Configuration

Shows configuration details about the realm LUN.

You can click the LUN value to view configuration details about the realm physical disk. You can click the celldisk name from the Celldisk column to view configuration details about the realm celldisk. You can click the cell name from the Cell Name column to view configuration details about the realm. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also use the Search section to query for a particular cell, LUN, or celldisk. Leaving the search fields empty retrieves information for all cells, LUNs, and celldisks.

Physical Disk Configuration

Shows configuration details about the physical disk.

You can click the LUN value to view configuration details about the realm LUN. You can click the cell name from the Cell Name column to view configuration details about the realm. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also click Click here for realm physical disk configuration to view configuration details about the realm physical disk.

Realm Physical Disk Configuration

Shows configuration details about the realm physical disk.

You can click the LUN value to view configuration details about the realm LUN. You can click the cell name from the Cell Name column to view configuration details about the realm. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also use the Search section to query for a particular cell, LUN, or physical disk. Leaving the search fields empty retrieves information for all cells, LUNs, and physical disks.

IO Resource Manager Configuration

Shows configuration details about the IO resource manager.

You can click the cell name from the Cell Name column to view configuration details about the realm. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also click Click here for realm IO resource manager configuration to view configuration details about the realm IO resource manager.

Realm IO Resource Manager Configuration

Shows configuration details about the realm IO resource manager.

You can click the cell name from the Cellname column to view configuration details about the realm. You can also click the values specified in other columns to drill down further and view more details about each of those columns.

You can also use the Search section to query for a particular cell or plan type. Leaving the search fields empty retrieves information for all cells and plan types.

Cell Flashcache Statistics

Shows statistical information about the cell flash cache.

Realm Flashcache Statistics

Show statistical information about the realm flash cache.

Note:

In the Reports page, you can use the refresh icon to refresh the details based on the data stored in the OMS. Note that this refresh icon does not collect data again from Oracle Exadata Storage Server, but it refreshes the page based on the data that is available in the OMS. The actual collection of data from Oracle Exadata Storage Server happens only once in 24 hours.

Oracle Legal Notices

Copyright Notice

Copyright © 1994-2010, Oracle and/or its affiliates. All rights reserved.

License Restrictions Warranty/Consequential Damages Disclaimer

This software and related documentation are provided under a license agreement containing restrictions on use and disclosure and are protected by intellectual property laws. Except as expressly permitted in your license agreement or allowed by law, you may not use, copy, reproduce, translate, broadcast, modify, license, transmit, distribute, exhibit, perform, publish, or display any part, in any form, or by any means. Reverse engineering, disassembly, or decompilation of this software, unless required by law for interoperability, is prohibited.

Warranty Disclaimer

The information contained herein is subject to change without notice and is not warranted to be error-free. If you find any errors, please report them to us in writing.

Restricted Rights Notice

If this software or related documentation is delivered to the U.S. Government or anyone licensing it on behalf of the U.S. Government, the following notice is applicable:

U.S. GOVERNMENT RIGHTS Programs, software, databases, and related documentation and technical data delivered to U.S. Government customers are "commercial computer software" or "commercial technical data" pursuant to the applicable Federal Acquisition Regulation and agency-specific supplemental regulations. As such, the use, duplication, disclosure, modification, and adaptation shall be subject to the restrictions and license terms set forth in the applicable Government contract, and, to the extent applicable by the terms of the Government contract, the additional rights set forth in FAR 52.227-19, Commercial Computer Software License (December 2007). Oracle USA, Inc., 500 Oracle Parkway, Redwood City, CA 94065.

Hazardous Applications Notice

This software is developed for general use in a variety of information management applications. It is not developed or intended for use in any inherently dangerous applications, including applications which may create a risk of personal injury. If you use this software in dangerous applications, then you shall be responsible to take all appropriate fail-safe, backup, redundancy, and other measures to ensure the safe use of this software. Oracle Corporation and its affiliates disclaim any liability for any damages caused by use of this software in dangerous applications.

Trademark Notice

Oracle is a registered trademark of Oracle Corporation and/or its affiliates. Other names may be trademarks of their respective owners.

Third-Party Content, Products, and Services Disclaimer

This software and documentation may provide access to or information on content, products, and services from third parties. Oracle Corporation and its affiliates are not responsible for and expressly disclaim all warranties of any kind with respect to third-party content, products, and services. Oracle Corporation and its affiliates will not be responsible for any loss, costs, or damages incurred due to your access to or use of third-party content, products, or services.