Contents

System Monitoring Plug-in Installation Guide for Sybase Adaptive Server Enterprise (ASE)

Description

Versions Supported

Prerequisites

Configuring Sybase Adaptive Server for Monitoring

Deploying the Plug-in

Setting up the JDBC Driver

TCP/IP Port Information

Enabling TCP/IP Port

Finding TCP/IP Port

Adding Instances for Monitoring

Verifying and Validating the Plug-in

Undeploying the Plug-in

Troubleshooting the Plug-In

Documentation Accessibility

Oracle® Enterprise Manager

System Monitoring Plug-in Installation Guide for Sybase Adaptive Server Enterprise (ASE)

Release 6 (1.0.1.0.0)

E11847-01

December 2007

This document provides a brief description about the Oracle System Monitoring Plug-in for Sybase Adaptive Server Enterprise, details on the versions the plug-in supports, prerequisites for installing the plug-in, and step-by-step instructions on how to download, install, verify, and validate the plug-in.

Description

The System Monitoring Plug-in for Sybase Adaptive Server Enterprise extends Oracle Enterprise Manager Grid Control to add support for managing Sybase Adaptive Server instances. By deploying the plug-in within your Grid Control environment, you gain the following management features:

Monitor Sybase Adaptive Server instances.

Gather configuration data and track configuration changes for Sybase Adaptive Server instances.

Raise alerts and violations based on thresholds set on monitored metrics and configuration data.

Provide rich out-of-box reports based on the gathered data.

Support monitoring by a remote agent. For remote monitoring, the agent need not be on the same host as the Sybase Adaptive Server.

Versions Supported

This plug-in supports the following versions of products:

Enterprise Manager Grid Control 10.2.0.1 or higher

Oracle Management Agent 10.2.0.1 or higher for Windows

Version 15.x or higher of Express (XE), Enterprise (EE), and Developer (DE) editions of Sybase Adaptive Server

Note:

The system monitoring plug-in for Sybase Adaptive Server is not certified for monitoring Sybase Adaptive Server Clusters. For more information, refer to the known issues described in the Oracle Enterprise Manager System Monitoring Plug-in Troubleshooting Guide available at:

http://www.oracle.com/technology/documentation/oem.html

Prerequisites

The following prerequisites must be met before you can deploy the plug-in:

Sybase Adaptive Server Enterprise version 15.x or higher is installed.

The following components of Oracle Enterprise Manager Grid Control are installed and running:

Oracle Enterprise Manager Grid Control 10.2.0.1 or higher

Oracle Management agent for Windows 10.2.0.1 or higher

You can install the agent on the same computer as Sybase Adaptive Server (referred to as local agent monitoring), or you can install the agent on a different computer from Sybase Adaptive Server (referred to as remote agent monitoring).

Preferred credentials are set on all agents where you want to deploy the plug-in.

The MDA tables must be installed before they can be queried. The MDA tables only exist on 12.5.0.3 and higher. To install MDA tables, do the following:

Ensure that the configuration parameter enable cis is set to 1. If not, restart ASE. Run the following command:

sp_configure 'enable cis', 1
go

Add 'loopback' server name alias (assuming @@servername is also defined in the interfaces file). This step is no longer required in 15.0 ESD#2 or later.

use master
go
sp_addserver loopback, null, @@servername
go

Test this configuration. This step is no longer required in 15.0 ESD#2 or later.

set cis_rpc_handling on
go

Alternatively, run the following command and then disconnect and reconnect your session:

sp_configure 'cis rpc handling', 1
exec loopback...sp_who  -- note: 3 dots!
go

Install the MDA tables. Do not run this script with 'sqsh' as it will cause errors. 'sqsh' sees a '$' as the start of a sqsh variable, and this distorts the native RPC names, since these start with a '$' as well. Instead, either use 'isql' as below, or run 'sqsh' with the '-Lexpand=0' option to disable sqsh variable expansion feature. For ASE 15.0.2 and higher, this script is included in the installmaster.

isql -U sa -P yourpassword -S YOURSERVER \
     -i $SYBASE/$SYBASE_ASE/scripts/installmontables

Assign mon_role to logins allowed MDA access. This also applies to the 'sa' login.

use master
go
grant role mon_role to sa
go

Test basic MDA configuration as follows. You may need to disconnect and reconnect to activate mon_role when you grant this role to the login you are currently using.

select * from master..monState
go

Enable all configuration parameters. These are all dynamic (except the per object statistics active parameter). For all 'pipe' tables, the number of messages is set to 100 here, but you can choose a larger size.

sp_configure "enable monitoring", 1
go
sp_configure "sql text pipe active", 1
go
sp_configure "sql text pipe max messages", 100
go
sp_configure "plan text pipe active", 1
go
sp_configure "plan text pipe max messages", 100
go
sp_configure "statement pipe active", 1
go
sp_configure "statement pipe max messages", 100
go
sp_configure "errorlog pipe active", 1
go
sp_configure "errorlog pipe max messages", 100
go
sp_configure "deadlock pipe active", 1
go
sp_configure "deadlock pipe max messages", 100
go
sp_configure "wait event timing", 1
go
sp_configure "process wait events", 1
go
sp_configure "object lockwait timing", 1
go
sp_configure "SQL batch capture", 1
go
sp_configure "statement statistics active", 1
go
sp_configure "per object statistics active", 1
go

For ASE 15.0.2, also run the following command:

sp_configure "enable stmt cache monitoring", 1
go

Set the following static parameter to a higher value (the setting is in bytes per user connection) if you're expecting a lot of (or long) SQL batches:

sp_configure "max SQL text monitored", 2048
go

Note:

Enabling the following configuration parameters will result in >5% performance overhead:

sp_configure "sql text pipe active", 1
sp_configure "sql text pipe max messages", 100
sp_configure "max SQL text monitored", 2048
sp_configure "plan text pipe active", 1
sp_configure "plan text pipe max messages", 100
sp_configure "statement pipe active", 1
sp_configure "statement pipe max messages", 100
sp_configure "statement statistics active", 1
sp_configure "per object statistics active", 1

Configuring Sybase Adaptive Server for Monitoring

To monitor the Sybase Adaptive Server target using Enterprise Manager, the Sybase Adaptive Server user must have the role mon_role. In addition to mon_role permissions, the monitoring user must also have Select permissions to access the following sys tables:

syslisteners

sysloginroles

syssrvroles

The following commands will grant Select permission to the monitoring user:

grant select on syslisteners to public
go
grant select on sysloginroles to public
go
grant select on syssrvroles (name, srid) to public
go

The above steps will give Select permission to all existing users in the database. To grant Select permission to only the monitoring user, referred to as monuser below, run the following commands. To execute these commands, the user must have sa_role permissions.

Create a group.

sp_addgroup OracleEMGroup
go

Add the user monuser to the group.

sp_adduser monuser, null, OracleEMGroup
go

Grant Select permission on the tables to OracleEMGroup.

grant select on syslisteners to OracleEMGroup
go
grant select on sysloginroles to OracleEMGroup
go
grant select on syssrvroles (name, srid) to OracleEMGroup
go

Deploying the Plug-in

After you ensure that the prerequisites are met, follow these steps to deploy the plug-in:

Download the Sybase Adaptive Server Plug-in archive to your desktop or computer on which the browser is launched. You can download the archive from the Oracle Technology Network (OTN).

Log into Enterprise Manager Grid Control as a Super Administrator.

Click the Setup link in the upper right corner of the Grid Control Home page, then click the Management Plug-ins link on the left side of the Setup page.

Figure 1 shows the Management Plug-ins page.

Figure 1 Management Plug-ins Deployment Page

Click Import.

Click Browse and select the plug-in archive.

Click List Archive.

Select the plug-in and click OK.

Verify that you have set preferred credentials on all agents where you want to deploy the plug-in.

In the Management Plug-ins page, click the icon in the Deploy column for the Sybase Adaptive Server plug-in. The Deploy Management Plug-in wizard appears.

Click Add Agents, then select one or more agents to which you want to deploy the plug-in. The wizard reappears and displays the agent you selected.

Click Next, then click Finish.

If you see an error message stating that the preferred credential is not set up, go to the Preferences page and add the preferred credentials for the Agent target type.

To check the deployment status, go to Related Links and click the link Deployment Status.

Setting up the JDBC Driver

Following are the steps to set up jConnect for the Sybase Adaptive Server plugin:

Download the jConnect JDBC driver version 6.0 from www.sybase.com.

Create a jdbcdriver directory under agent/sysman/ and place the jConn3.jar file in that directory.

Add the location of the driver .jar file to the classpath.lst file under the $ORACLE_HOME/sysman/config directory.

If the agent is installed on a system that is part of an OS cluster, you need to edit the classpath.lst file under the $ORACLE_HOME/<node_name>/sysman/config directory, where node_name is the name of the clustered node where the agent is running.

If the classpath.lst file does not exist, create the file. For example, the classpath.lst file in a UNIX environment might appear as shown in the following example:

/home/usera/agent/sysman/jdbcdriver/sybase/jConn3.jar

TCP/IP Port Information

The following sections provide information you require to enable the TCP/IP port and to find the TCP/IP port for a particular Sybase Adaptive Server instance.

Enabling TCP/IP Port

For all editions of Sybase Adaptive Server

From the Sybase Adaptive Server Configuration Manager, select Sybase Adaptive Server Network Configuration in the left panel and navigate to the Sybase Adaptive Server instance.

The right panel displays all protocols for the specified Sybase Adaptive Server instance and their status.

Ensure that TCP/IP is enabled.

(If TCP/IP is disabled), right-click TCP/IP and select Properties. The TCP/IP Properties dialog box appears.

In the Protocol tab, select enabled, and click Apply.

Restart the Sybase Adaptive Server instance.

Finding TCP/IP Port

To find the TCP/IP port number for a particular Sybase Adaptive Server instance, run the following query:

Select address_info from syslisteners

The above query returns the host address followed by the port number.

Adding Instances for Monitoring

After successfully deploying the plug-in, follow these steps to add the plug-in target to Grid Control for central monitoring and management:

From the Agent home page where the plug-in was deployed, select the Sybase Adaptive Server target type from the Add drop-down list, then click Go. The Add Sybase Adaptive Server page appears as shown in Figure 2.

Figure 2 Configuration Properties Page

Provide the following information for the properties:

Name — Unique target name across all the Grid Control targets, such as SybaseServer_Hostname. This is the display name in the Grid Control. It represents this Sybase Adaptive Server target across all user interfaces within Grid Control.

JDBC URL — Provide the URL in the format jdbc:sybase:Tds:<system>:<tcp/ip port>

For example, jdbc:sybase:Tds:stmpi2.idc.oracle.com:5000

JDBC Driver — Optional parameter. Provide this value in the format com.sybase.jdbc3.jdbc.SybDriver

Database Username — Valid user for the database in mon_role.

Password for the Database User — Corresponding password for the database user

Click Test Connection to make sure the parameters you entered are correct.

Reenter the encrypted parameters from step 2 if the connection test was successful, then click OK.

Important:

If you do not reenter the encrypted parameters before clicking OK, you might encounter an error suggesting that the login failed.

After you deploy and configure the plug-in to monitor one or more targets in the environment, you can customize the monitoring settings of the plug-in. This alters the collection intervals and threshold settings of the metrics to meet the particular needs of your environment. If you decide to disable one or more metric collections, this could impact the reports that the metric is a part of.

Verifying and Validating the Plug-in

After waiting a few minutes for the plug-in to start collecting data, use the following steps to verify and validate that Enterprise Manager is properly monitoring the plug-in target:

Click the Sybase Adaptive Server target link from the Agent home page Monitored Targets table. The Sybase Adaptive Server home page appears.

The Sybase Adaptive Server home page appears as shown in Figure 3.

Figure 3 Sybase Adaptive Server Home Page

Verify that no metric collection errors are reported in the Metrics table.

Ensure that reports can be seen and no errors are reported by clicking the Reports property page.

Ensure that configuration data can be seen by clicking the View Configuration link in the Configuration section. If configuration data does not immediately appear, click Refresh in the View Configuration page.

Undeploying the Plug-in

Follow these steps to undeploy the plug-in from an agent:

Log in to Enterprise Manager Grid Control as a Super Administrator.

Select the Targets tab, then the All Targets subtab. The All Targets page appears.

Select the Sybase Adaptive Server Plug-in target and click Remove. You must do this step for all targets of the plug-in.

Make sure that the preferred credentials are set on the agents where the plug-in is deployed.

Click the Setup link in the upper right corner of the All Targets page, then click the Management Plug-ins link on the left side of the Setup page. The Management Plug-ins page appears.

Click the icon in the Undeploy column for the Sybase Adaptive Server Plug-in. The Undeploy Management Plug-in page appears.

Check all the agents that are currently deployed with the Sybase Adaptive Server Plug-in and click OK.

You must undeploy the plug-in from every agent in the system to completely remove it from the enterprise.

Select the Sybase Adaptive Server Plug-in on the Management Plug-in page and click Delete.

Troubleshooting the Plug-In

If the following parameters are not enabled for the Sybase Adaptive Server plug-in, metric collection errors may occur:

sp_configure "sql text pipe active", 1
sp_configure "sql text pipe max messages", 100
sp_configure "max SQL text monitored", 2048
sp_configure "plan text pipe active", 1
sp_configure "plan text pipe max messages", 100
sp_configure "statement pipe active", 1
sp_configure "statement pipe max messages", 100
sp_configure "statement statistics active", 1
sp_configure "per object statistics active", 1

Documentation Accessibility

Our goal is to make Oracle products, services, and supporting documentation accessible, with good usability, to the disabled community. To that end, our documentation includes features that make information available to users of assistive technology. This documentation is available in HTML format, and contains markup to facilitate access by the disabled community. Accessibility standards will continue to evolve over time, and Oracle is actively engaged with other market-leading technology vendors to address technical obstacles so that our documentation can be accessible to all of our customers. For more information, visit the Oracle Accessibility Program Web site at http://www.oracle.com/accessibility/.

Accessibility of Code Examples in Documentation

Screen readers may not always correctly read the code examples in this document. The conventions for writing code require that closing braces should appear on an otherwise empty line; however, some screen readers may not always read a line of text that consists solely of a bracket or brace.

Accessibility of Links to External Web Sites in Documentation

This documentation may contain links to Web sites of other companies or organizations that Oracle does not own or control. Oracle neither evaluates nor makes any representations regarding the accessibility of these Web sites.

TTY Access to Oracle Support Services

Oracle provides dedicated Text Telephone (TTY) access to Oracle Support Services within the United States of America 24 hours a day, seven days a week. For TTY support, call 800.446.2398.

System Monitoring Plug-in Installation Guide for Sybase Adaptive Server Enterprise (ASE), Release 6 (1.0.1.0.0)

E11847-01

Copyright © 2007 Oracle. All rights reserved.

The Programs (which include both the software and documentation) contain proprietary information; they are provided under a license agreement containing restrictions on use and disclosure and are also protected by copyright, patent, and other intellectual and industrial property laws. Reverse engineering, disassembly, or decompilation of the Programs, except to the extent required to obtain interoperability with other independently created software or as specified by law, is prohibited.

The information contained in this document is subject to change without notice. If you find any problems in the documentation, please report them to us in writing. This document is not warranted to be error-free. Except as may be expressly permitted in your license agreement for these Programs, no part of these Programs may be reproduced or transmitted in any form or by any means, electronic or mechanical, for any purpose.

If the Programs are delivered to the United States Government or anyone licensing or using the Programs on behalf of the United States Government, the following notice is applicable:

U.S. GOVERNMENT RIGHTS Programs, software, databases, and related documentation and technical data delivered to U.S. Government customers are "commercial computer software" or "commercial technical data" pursuant to the applicable Federal Acquisition Regulation and agency-specific supplemental regulations. As such, use, duplication, disclosure, modification, and adaptation of the Programs, including documentation and technical data, shall be subject to the licensing restrictions set forth in the applicable Oracle license agreement, and, to the extent applicable, the additional rights set forth in FAR 52.227-19, Commercial Computer Software--Restricted Rights (June 1987). Oracle USA, Inc., 500 Oracle Parkway, Redwood City, CA 94065

The Programs are not intended for use in any nuclear, aviation, mass transit, medical, or other inherently dangerous applications. It shall be the licensee's responsibility to take all appropriate fail-safe, backup, redundancy and other measures to ensure the safe use of such applications if the Programs are used for such purposes, and we disclaim liability for any damages caused by such use of the Programs.

Oracle, JD Edwards, PeopleSoft, and Siebel are registered trademarks of Oracle Corporation and/or its affiliates. Other names may be trademarks of their respective owners.

The Programs may provide links to Web sites and access to content, products, and services from third parties. Oracle is not responsible for the availability of, or any content provided on, third-party Web sites. You bear all risks associated with the use of such content. If you choose to purchase any products or services from a third party, the relationship is directly between you and the third party. Oracle is not responsible for: (a) the quality of third-party products or services; or (b) fulfilling any of the terms of the agreement with the third party, including delivery of products or services and warranty obligations related to purchased products or services. Oracle is not responsible for any loss or damage of any sort that you may incur from dealing with any third party.

Oracle Legal Notices

Copyright Notice

Copyright © 1994-2010, Oracle and/or its affiliates. All rights reserved.

License Restrictions Warranty/Consequential Damages Disclaimer

This software and related documentation are provided under a license agreement containing restrictions on use and disclosure and are protected by intellectual property laws. Except as expressly permitted in your license agreement or allowed by law, you may not use, copy, reproduce, translate, broadcast, modify, license, transmit, distribute, exhibit, perform, publish, or display any part, in any form, or by any means. Reverse engineering, disassembly, or decompilation of this software, unless required by law for interoperability, is prohibited.

Warranty Disclaimer

The information contained herein is subject to change without notice and is not warranted to be error-free. If you find any errors, please report them to us in writing.

Restricted Rights Notice

If this software or related documentation is delivered to the U.S. Government or anyone licensing it on behalf of the U.S. Government, the following notice is applicable:

U.S. GOVERNMENT RIGHTS Programs, software, databases, and related documentation and technical data delivered to U.S. Government customers are "commercial computer software" or "commercial technical data" pursuant to the applicable Federal Acquisition Regulation and agency-specific supplemental regulations. As such, the use, duplication, disclosure, modification, and adaptation shall be subject to the restrictions and license terms set forth in the applicable Government contract, and, to the extent applicable by the terms of the Government contract, the additional rights set forth in FAR 52.227-19, Commercial Computer Software License (December 2007). Oracle USA, Inc., 500 Oracle Parkway, Redwood City, CA 94065.

Hazardous Applications Notice

This software is developed for general use in a variety of information management applications. It is not developed or intended for use in any inherently dangerous applications, including applications which may create a risk of personal injury. If you use this software in dangerous applications, then you shall be responsible to take all appropriate fail-safe, backup, redundancy, and other measures to ensure the safe use of this software. Oracle Corporation and its affiliates disclaim any liability for any damages caused by use of this software in dangerous applications.

Trademark Notice

Oracle is a registered trademark of Oracle Corporation and/or its affiliates. Other names may be trademarks of their respective owners.

Third-Party Content, Products, and Services Disclaimer

This software and documentation may provide access to or information on content, products, and services from third parties. Oracle Corporation and its affiliates are not responsible for and expressly disclaim all warranties of any kind with respect to third-party content, products, and services. Oracle Corporation and its affiliates will not be responsible for any loss, costs, or damages incurred due to your access to or use of third-party content, products, or services.