Oracle® Grid Infrastructure

Installation Guide

12c Release 1 (12.1) for HP-UX Itanium

E51134-03

August 2015

Oracle Grid Infrastructure Installation Guide, 12c Release 1 (12.1) for HP-UX Itanium

E51134-03

Copyright © 2014, 2015 Oracle and/or its affiliates. All rights reserved.

Primary Author: Aparna Kamath

Contributing Authors: Mark Bauer, Jonathan Creighton, Barb Lundhild, Sundar Matpadi, Markus Michalewicz, Soma Prasad, Janet Stern, Douglas Williams

Contributors: Dharma Sirnapalli, Angad Gokakkar, Diego Iglesias, Binoy Sukumaran, Taisuke Gishi, Aneesh Khandelwal, Peng Miao, Ken Natsume, Ayaka Saeki, Jarod Wang, Jessica Ye, Min Yu

This software and related documentation are provided under a license agreement containing restrictions on use and disclosure and are protected by intellectual property laws. Except as expressly permitted in your license agreement or allowed by law, you may not use, copy, reproduce, translate, broadcast, modify, license, transmit, distribute, exhibit, perform, publish, or display any part, in any form, or by any means. Reverse engineering, disassembly, or decompilation of this software, unless required by law for interoperability, is prohibited.

The information contained herein is subject to change without notice and is not warranted to be error-free. If you find any errors, please report them to us in writing.

If this is software or related documentation that is delivered to the U.S. Government or anyone licensing it on behalf of the U.S. Government, then the following notice is applicable:

U.S. GOVERNMENT END USERS: Oracle programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, delivered to U.S. Government end users are "commercial computer software" pursuant to the applicable Federal Acquisition Regulation and agency-specific supplemental regulations. As such, use, duplication, disclosure, modification, and adaptation of the programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, shall be subject to license terms and license restrictions applicable to the programs. No other rights are granted to the U.S. Government.

This software or hardware is developed for general use in a variety of information management applications. It is not developed or intended for use in any inherently dangerous applications, including applications that may create a risk of personal injury. If you use this software or hardware in dangerous applications, then you shall be responsible to take all appropriate fail-safe, backup, redundancy, and other measures to ensure its safe use. Oracle Corporation and its affiliates disclaim any liability for any damages caused by use of this software or hardware in dangerous applications.

Oracle and Java are registered trademarks of Oracle and/or its affiliates. Other names may be trademarks of their respective owners.

Intel and Intel Xeon are trademarks or registered trademarks of Intel Corporation. All SPARC trademarks are used under license and are trademarks or registered trademarks of SPARC International, Inc. AMD, Opteron, the AMD logo, and the AMD Opteron logo are trademarks or registered trademarks of Advanced Micro Devices. UNIX is a registered trademark of The Open Group.

This software or hardware and documentation may provide access to or information about content, products, and services from third parties. Oracle Corporation and its affiliates are not responsible for and expressly disclaim all warranties of any kind with respect to third-party content, products, and services unless otherwise set forth in an applicable agreement between you and Oracle. Oracle Corporation and its affiliates will not be responsible for any loss, costs, or damages incurred due to your access to or use of third-party content, products, or services, except as set forth in an applicable agreement between you and Oracle.

List of Tables

1-1 Server Hardware Checklist for Oracle Grid Infrastructure

1-2 Environment Configuration for Oracle Grid Infrastructure and Oracle RAC

1-3 Network Configuration Tasks for Oracle Grid Infrastructure and Oracle RAC

1-4 Installation Upgrades Checklist for Oracle Grid infrastructure

1-5 Oracle Grid Infrastructure Storage Configuration Checks

1-6 Oracle Grid Infrastructure Checks to Perform Before Starting the Installer

2-1 Swap Space Required for 64-bit System

3-1 HP-UX Itanium Requirements

3-2 Requirements for Programming Environments for HP-UX Itanium Systems

4-1 Grid Naming Service Example Network

4-2 Manual Network Configuration Example

6-1 Supported Storage Options for Oracle Clusterware and Oracle RAC

6-2 Oracle Clusterware Shared File System Volume Size Requirements

6-3 Oracle RAC Shared File System Volume Size Requirements

6-4 Total Oracle Clusterware Storage Space Required by Redundancy Type

6-5 Total Oracle Database Storage Space Required by Redundancy Type

C-1 Response Files for Oracle Database

C-2 Response files for Oracle Grid Infrastructure

E-1 Minimal HP-UX Kernel Parameter Values

Preface

Oracle Grid Infrastructure Installation Guide for HP-UX Itanium explains how to configure a server in preparation for installing and configuring an Oracle Grid Infrastructure installation (Oracle Clusterware and Oracle Automatic Storage Management). It also explains how to configure a server and storage in preparation for an Oracle Real Application Clusters (Oracle RAC) installation.

Intended Audience

Documentation Accessibility

Related Documents

Conventions

Intended Audience

Oracle Grid Infrastructure Installation Guide for HP-UX Itanium provides configuration information for network and system administrators, and database installation information for database administrators (DBAs) who install and configure Oracle Clusterware and Oracle Automatic Storage Management in an Oracle Grid Infrastructure for a cluster installation.

For customers with specialized system roles who intend to install Oracle RAC, this book is intended to be used by system administrators, network administrators, or storage administrators to configure a system in preparation for an Oracle Grid Infrastructure for a cluster installation, and complete all configuration tasks that require operating system root privileges. When Oracle Grid Infrastructure installation and configuration is completed successfully, a system administrator should only need to provide configuration information and to grant access to the database administrator to run scripts as root during an Oracle RAC installation.

This guide assumes that you are familiar with Oracle Database concepts.

Documentation Accessibility

For information about Oracle's commitment to accessibility, visit the Oracle Accessibility Program website at http://www.oracle.com/pls/topic/lookup?ctx=acc&id=docacc.

Access to Oracle Support

Oracle customers that have purchased support have access to electronic support through My Oracle Support. For information, visit http://www.oracle.com/pls/topic/lookup?ctx=acc&id=info or visit http://www.oracle.com/pls/topic/lookup?ctx=acc&id=trs if you are hearing impaired.

Related Documents

For more information, refer to the following Oracle resources:

Oracle Clusterware and Oracle Real Application Clusters Documentation

This installation guide reviews steps required to complete an Oracle Clusterware and Oracle Automatic Storage Management installation, and to perform preinstallation steps for Oracle RAC.

If you intend to install Oracle Database or Oracle RAC, then complete preinstallation tasks as described in this installation guide, complete Oracle Grid Infrastructure installation, and review those installation guides for additional information. You can install either Oracle databases for a standalone server on an Oracle Grid Infrastructure installation, or install an Oracle RAC database. If you want to install an Oracle Restart deployment of grid infrastructure, then refer to Oracle Database Installation Guide for HP-UX Itanium

Most Oracle error message documentation is only available in HTML format. If you only have access to the Oracle Documentation media, then browse the error messages by range. When you find a range, use your browser's "find in page" feature to locate a specific message. When connected to the Internet, you can search for a specific error message using the error message search feature of the Oracle online documentation.

Installation Guides

Oracle Database Installation Guide for HP-UX Itanium

Oracle Real Application Clusters Installation Guide for Linux and UNIX

Operating System-Specific Administrative Guides

Oracle Database Administrator's Reference, 12c Release 1 (12.1) for UNIX Systems

Oracle Clusterware and Oracle Automatic Storage Management Administrative Guides

Oracle Clusterware Administration and Deployment Guide

Oracle Database Storage Administrator's Guide

Oracle Real Application Clusters Administrative Guides

Oracle Real Application Clusters Administration and Deployment Guide

Oracle Database 2 Day + Real Application Clusters Guide

Generic Documentation

Oracle Database 2 Day DBA

Oracle Database Administrator's Guide

Oracle Database Concepts

Oracle Database New Features Guide

Oracle Database Net Services Administrator's Guide

Oracle Database Reference

Printed documentation is available for sale in the Oracle Store at the following web site:

https://shop.oracle.com

To download free release notes, installation documentation, white papers, or other collateral, visit the Oracle Technology Network (OTN). You must register online before using OTN; registration is free and can be done at the following web site:

http://www.oracle.com/technetwork/index.html

If you already have a username and password for OTN, then you can go directly to the documentation section of the OTN web site:

http://www.oracle.com/technetwork/indexes/documentation/index.html

Oracle error message documentation is available only in HTML. You can browse the error messages by range in the Documentation directory of the installation media. When you find a range, use your browser's search feature to locate a specific message. When connected to the Internet, you can search for a specific error message using the error message search feature of the Oracle online documentation.

Conventions

The following text conventions are used in this document:

Convention | Meaning
boldface | Boldface type indicates graphical user interface elements associated with an action, or terms defined in text or the glossary.
italic | Italic type indicates book titles, emphasis, or placeholder variables for which you supply particular values.
monospace | Monospace type indicates commands within a paragraph, URLs, code in examples, text that appears on the screen, or text that you enter.

Changes in This Release for Oracle Grid Infrastructure Installation Guide

This preface contains:

Changes in Oracle Grid Infrastructure 12c Release 1 (12.1)

Changes in Oracle Grid Infrastructure 12c Release 1 (12.1)

The following are changes in Oracle Grid Infrastructure Installation Guide for Oracle Grid Infrastructure 12c Release 1.

New Features for Oracle Grid Infrastructure 12c Release 1 (12.1.0.2)

New Features for Oracle Grid Infrastructure 12c Release 1 (12.1.0.1)

Deprecated Features

Desupported Features

Other Changes

New Features for Oracle Grid Infrastructure 12c Release 1 (12.1.0.2)

Rapid Oracle Home Provisioning

Rapid Home Provisioning is a method of deploying software homes to nodes in a cloud computing environment from a single cluster where you store home images (called gold images) of Oracle software, such as databases, middleware, and applications. Rapid Home Provisioning Server (RHPS) clusters provide gold images to Rapid Home Provisioning Clients (RHPC).

See Oracle Clusterware Administration and Deployment Guide and Oracle Real Application Clusters Installation Guide.

Cluster and Oracle RAC Diagnosability Tools Enhancements

The Trace File Analyzer (TFA) Collector is installed automatically with Oracle Grid Infrastructure installation. The Trace File Analyzer Collector is a diagnostic collection utility to simplify diagnostic data collection on Oracle Grid Infrastructure and Oracle RAC systems.

See Also:

Oracle Clusterware Administration and Deployment Guide for information about using Trace File Analyzer Collector

Automatic Installation of Grid Infrastructure Management Repository

The Grid Infrastructure Management Repository is automatically installed with Oracle Grid Infrastructure 12c Release 1 (12.1.0.2).

Note:

The Grid Infrastructure Management Repository feature is not available with HP-UX Itanium configurations.

Oracle RAC Cache Fusion Accelerator

Oracle RAC uses its Cache Fusion protocol and Global Cache Service (GCS) to provide fast, reliable, and efficient inter-instance data communication in an Oracle RAC cluster, so that the individual memory buffer caches of multiple instances can function as one global cache for the database. Using Cache Fusion provides a nearly linear scalability for most applications. This release includes accelerations to the Cache Fusion protocol that provide enhanced scalability for all applications.

New Features for Oracle Grid Infrastructure 12c Release 1 (12.1.0.1)

Oracle Flex Cluster

Oracle Flex Cluster is a new concept, which joins together a traditional closely coupled cluster with a modest node count with a large number of loosely coupled nodes. In order to support various configurations that can be established using this new concept, SRVCTL provides new commands and command options to ease the installation and configuration.

See Section 4.10, "Configuration Requirements for Oracle Flex Clusters"

See Also:

Oracle Clusterware Administration and Deployment Guide for more information about Oracle Flex Clusters, and Oracle Grid Infrastructure Installation Guide for more information about Oracle Flex Cluster deployment

Oracle Cluster Registry Backup in ASM Disk Group Support

The Oracle Cluster Registry (OCR) backup mechanism enables storing the OCR backup in an Oracle ASM disk group. Storing the OCR backup in an Oracle ASM disk group simplifies OCR management by permitting access to the OCR backup from any node in the cluster should an OCR recovery become necessary.

IPv6 Support for Public Networks

Oracle Clusterware 12c Release 1 (12.1) supports IPv6-based public IP and VIP addresses.

IPv6-based IP addresses have become the latest standard for the information technology infrastructure in today's data centers. With this release, Oracle RAC and Oracle Grid Infrastructure support this standard. You can configure cluster nodes during installation with either IPv4 or IPv6 addresses on the same network. Database clients can connect to either IPv4 or IPv6 addresses. The Single Client Access Name (SCAN) listener automatically redirects client connection requests to the appropriate database listener for the IP protocol of the client request.

See Section 4.4, "IPv4 and IPv6 Protocol Requirements"

Grid Infrastructure Script Automation for Installation and Upgrade

This feature enables running any script requiring root privileges through the installer and other configuration assistants, so that you are no longer required to run root-based scripts manually during deployment.

Using script automation for installation and upgrade eliminates the need to run scripts manually on each node during the final steps of an Oracle Grid Infrastructure installation or upgrade.

See Section 1.1.2, "Oracle Grid Infrastructure and Oracle RAC Environment Checklist"

Oracle Grid Infrastructure Rolling Migration for One-Off Patches

Oracle Grid Infrastructure one-off patch rolling migration and upgrade for Oracle ASM and Oracle Clusterware enables you to independently upgrade or patch clustered Oracle Grid Infrastructure nodes with one-off patches, without affecting database availability. This feature provides greater uptime and patching flexibility. This release also introduces a new Cluster state, "Rolling Patch." Operations allowed in a patch quiesce state are similar to the existing "Rolling Upgrade" cluster state.

See Section B.9.5, "Performing Rolling Upgrades of Oracle Automatic Storage Management"

See Also:

Oracle Database Storage Administrator's Guide for more information about ASM rolling migrations and patches

Oracle Flex ASM Server and Oracle CloudFS

Oracle Flex ASM decouples the Oracle ASM instance from database servers and enables the Oracle ASM instance to run on a separate physical server from the database servers. Any number of Oracle ASM instances can be clustered to support numerous database clients. This is a component feature of Oracle CloudFS.

Oracle CloudFS is a storage cloud infrastructure with resource pooling, network accessibility, rapid elasticity and rapid provisioning that are key requirements for cloud computing environments.

This feature enables you to consolidate all storage requirements into a single set of disk groups. All these disk groups are managed by a small set of Oracle ASM instances running in a single Cluster Synchronization Services (CSS) cluster. Depending on the performance requirements, you can make policy decisions on how various Oracle ASM clients access its files in a disk group.

Oracle Flex ASM supports Oracle Database 12c Release 1 (12.1) and later. Oracle Database 10g Release 2 (10.2) or later through Oracle Database 11g Release 2 (11.2) can continue to use ASM disk groups with no requirement to install patches.

See Section 4.6, "About Oracle Flex ASM Clusters Networks"

See Also:

Oracle Database Storage Administrator's Guide for more information about using Oracle Flex ASM servers

Policy-Based Cluster Management and Administration

Oracle Grid Infrastructure allows running multiple applications in one cluster. Using a policy-based approach, the workload introduced by these applications can be allocated across the cluster using a policy. In addition, a policy set enables different policies to be applied to the cluster over time as required. Policy sets can be defined using a web-based interface or a command-line interface.

Hosting various workloads in the same cluster helps to consolidate the workloads into a shared infrastructure that provides high availability and scalability. Using a centralized policy-based approach allows for dynamic resource reallocation and prioritization as the demand changes.

See Oracle Clusterware Administration and Deployment Guide for more information about managing applications with policies

Shared Grid Naming Service (GNS) Across Multiple Clusters

In previous releases, the Grid Naming Service (GNS) was dedicated to one Oracle Grid Infrastructure-based cluster, providing name resolution only for its own cluster member nodes. With this release, one Oracle GNS can now manage just the cluster member nodes in its own cluster, or GNS can provide naming resolution for all nodes across all clusters in the data center that are delegated to Oracle GNS for resolution.

Using only one Oracle GNS for all nodes that are part of an Oracle Grid Infrastructure cluster in the data center not only streamlines the naming convention, but also enables a data center cloud, minimizing day-to-day administration efforts.

See Section 4.5, "Oracle Grid Infrastructure IP Name and Address Requirements"

Support for Separation of Database Administration Duties

Oracle Database 12c Release 1 (12.1) provides support for separation of administrative duties for Oracle Database by introducing task-specific and least-privileged administrative privileges that do not require the SYSDBA administrative privilege. These new privileges are: SYSBACKUP for backup and recovery, SYSDG for Oracle Data Guard, and SYSKM for encryption key management.

See Section 5.1.8.3, "Extended Oracle Database Groups for Job Role Separation"

See Also:

Oracle Database Administrator's Guide for an overview of system privileges and operating system authentication

Oracle Database Security Guide for information about using system privileges

Deprecated Features

The following features are deprecated in this release, and may be desupported in a future release. See Oracle Database Upgrade Guide for a complete list of deprecated features in this release.

Deprecation Announcement for Oracle Restart

Oracle Restart is a feature provided as part of Oracle Grid Infrastructure. Oracle Restart monitors and can restart Oracle Database instances, Oracle Net Listeners, and Oracle ASM instances. Oracle Restart is currently restricted to manage single instance Oracle Databases and Oracle ASM instances only, and is subject to desupport in future releases. Oracle continues to provide Oracle ASM as part of the Oracle Grid Infrastructure installation for Standalone and Cluster deployments.

See Also:

My Oracle Support Note 1584742.1 for more information about Oracle Restart deprecation announcement and its replacement:

https://support.oracle.com/epmos/faces/DocumentDisplay?id=1584742.1&displayIndex=1

Change for Standalone Deinstallation tool

The deinstallation tool is now integrated with the installation media.

Deprecation of -cleanupOBase

The -cleanupOBase flag of the deinstallation tool is deprecated in this release. There is no replacement for this flag.

Desupported Features

The following features are no longer supported by Oracle. See Oracle Database Upgrade Guide for a complete list of desupported features.

Oracle Enterprise Manager Database Control

CLEANUP_ORACLE_BASE Property Removed

Raw and block devices are not supported

Other Changes

Document Structure Changes

This book is redesigned to provide an installation checklist for Oracle Grid Infrastructure installation, which comprises Oracle Clusterware and Oracle Automatic Storage Management installation. Use the checklist to prepare for installation. For more details, refer to the chapters that subdivide preinstallation tasks into category topics.

Preinstallation Task Changes

To facilitate cluster deployment, Oracle Universal Installer (OUI) and Cluster Verification Utility (CVU) detects when minimum requirements for installation are not completed, and creates shell script programs, called Fixup scripts, to resolve many incomplete system configuration requirements. If OUI detects an incomplete task that is marked "fixable", then you can easily fix the issue by clicking Fix & Check Again to generate a Fixup script.

Fixup scripts do not replace system tuning, but they do reduce the amount of manual system configuration required for an initial deployment. For this reason, some manual tasks that Fixup scripts perform are now moved to an appendix. If you choose to, you can continue to configure your servers manually.

See Section 3.3, "Using Installation Fixup Scripts" and Appendix E, "How to Complete Installation Tasks Manually"

Desupport of 32-bit Platforms

Oracle Grid Infrastructure and Oracle Real Application Clusters cannot be installed on 32-bit systems.

1 Oracle Grid Infrastructure Installation Checklist

The following checklist provides a list of required preinstallation steps

Use this checklist to coordinate tasks to help to ensure that all system and storage preparation and configuration tasks are completed before starting Oracle Grid Infrastructure for a cluster installation.

1.1 System Hardware, Software and Configuration Checklists

This section contains the following server configuration installation checklists:

Oracle Grid Infrastructure Installation Server Hardware Checklist

Oracle Grid Infrastructure and Oracle RAC Environment Checklist

Oracle Grid Infrastructure Network Checklist

Oracle Grid Infrastructure and Oracle RAC Upgrades Checklist

Oracle Grid Infrastructure Storage Configuration Tasks

Oracle Grid Infrastructure Starting the Installation Tasks

1.1.1 Oracle Grid Infrastructure Installation Server Hardware Checklist

Review the following hardware checklist for all installations:

Table 1-1 Server Hardware Checklist for Oracle Grid Infrastructure

Check
Task

Server hardware: server make, model, core architecture, and host bus adaptors (HBA) are supported to run with Oracle RAC.

Network Switches

Public network switch, at least 1 GbE, connected to a public gateway.

Private network switch, at least 1 GbE, with 10 GbE recommended, dedicated for use only with other cluster member nodes. The interface must support the user datagram protocol (UDP) using high-speed network adapters and switches that support TCP/IP. Alternatively, use InfiniBand for the interconnect.

Runlevel: Servers should be either in runlevel 3 or runlevel 5.

Random Access Memory (RAM): At least 4 GB of RAM for Oracle Grid Infrastructure for a Cluster installations, including installations where you plan to install Oracle RAC.

Temporary disk space allocation: At least 1 GB allocated to /tmp.

Operating System

Supported in the list of supported kernels and releases listed in Section 3.6, "Operating System Requirements List for HP-UX Itanium Platforms".

Same operating system kernel running on each cluster member node.

OpenSSH installed manually, if you do not have it installed already, as described in Section 3.10, "Using Automatic SSH Configuration During Installation".

Storage hardware: either Storage Area Network (SAN) or Network-Attached Storage (NAS).

Local Storage Space for Oracle Software

At least 8 GB of space for the Oracle Grid Infrastructure for a cluster home (Grid home). Oracle recommends that you allocate 100 GB to allow additional space for patches.

At least 12 GB of space for the Oracle base of the Oracle Grid Infrastructure installation owner (Grid user). The Oracle base includes Oracle Clusterware and Oracle ASM log files.

10 GB of additional space in the Oracle base directory of the Grid Infrastructure owner for diagnostic collections generated by Trace File Analyzer (TFA) Collector.

Intelligent Platform Management Interface (IPMI) Configuration completed, with IPMI administrator account information available to the person running the installation.

If you intend to use IPMI, then ensure baseboard management controller (BMC) interfaces are configured, and have an administration account username and password to provide when prompted during installation.

For nonstandard installations, if you must change configuration on one or more nodes after installation (for example, if you have different administrator user names and passwords for BMC interfaces on cluster nodes), then decide if you want to reconfigure the BMC interface, or modify IPMI administrator account information after installation.

1.1.2 Oracle Grid Infrastructure and Oracle RAC Environment Checklist

Review the following environment checklist for all installations:

Table 1-2 Environment Configuration for Oracle Grid Infrastructure and Oracle RAC

Check
Task

Create Groups and Users. Review Section 5.1, "Creating Groups, Users and Paths for Oracle Grid Infrastructure" for information about the groups and users you need to create for the kind of deployment you want to do. Installation owners have resource limits settings and other requirements. Group and user names must use only ASCII characters.

Create mount point paths for the software binaries. Oracle recommends that you follow the guidelines for an Optimal Flexible Architecture configuration, as described in the appendix "Optimal Flexible Architecture," in Oracle Database Installation Guide for your platform.

Review Oracle Inventory (oraInventory) and OINSTALL Group Requirements. The Oracle Inventory directory is the central inventory of Oracle software installed on your system. Users who have the Oracle Inventory group as their primary group are granted the OINSTALL privilege to write to the central inventory.

If you have an existing installation, then OUI detects the existing oraInventory directory from the /etc/oraInst.loc file, and uses this location.

If you are installing Oracle software for the first time, and your system does not have an oraInventory directory, then the installer creates an Oracle inventory that is one directory level up from the Oracle base for the Oracle Grid Infrastructure install, and designates the installation owner's primary group as the Oracle Inventory group. Ensure that this group is available as a primary group for all planned Oracle software installation owners.

Ensure that the Grid home (the Oracle home path you select for Oracle Grid Infrastructure) uses only ASCII characters

This restriction includes installation owner user names, which are used as a default for some home paths, as well as other directory names you may select for paths.

Unset Oracle software environment variables. If you have set ORA_CRS_HOME as an environment variable, then unset it before starting an installation or upgrade. Do not use ORA_CRS_HOME as a user environment variable.

If you have had an existing installation on your system, and you are using the same user account to install this installation, then unset the following environment variables: ORA_CRS_HOME; ORACLE_HOME; ORA_NLS10; TNS_ADMIN.

Determine root privilege delegation option for installation. During installation, you are asked to run configuration scripts as the root user. You can either run these scripts manually as root when prompted, or during installation you can provide configuration information and passwords using a root privilege delegation option.

To run root scripts automatically, select Automatically run configuration scripts. during installation. To use the automatic configuration option, the root user for all cluster member nodes must use the same password.

Use root user credentials

Provide the superuser password for cluster member node servers.

Use Sudo

Sudo is a UNIX and Linux utility that allows members of the sudoers list privileges to run individual commands as root. Provide the username and password of an operating system user that is a member of sudoers, and is authorized to run Sudo on each cluster member node.

To enable Sudo, have a system administrator with the appropriate privileges configure a user that is a member of the sudoers list, and provide the username and password when prompted during installation.

Run root scripts manually

If you run root scripts manually, then you must run the root.sh script on the first node and wait for it to finish. You can then run root.sh concurrently on all other nodes.

1.1.3 Oracle Grid Infrastructure Network Checklist

Review this network checklist for all installations to ensure that you have required hardware, names, and addresses for the cluster. During installation, you are prompted to identify which interfaces are public, private, or interfaces in use for another purpose, such as a network file system.

If you use a third-party cluster software, then the public host name information is obtained from that software.

During installation, you designate interfaces for use as public, private, or Oracle ASM interfaces. You can also designate interfaces that are in use for other purposes, and not available for Oracle Grid Infrastructure use.

Table 1-3 Network Configuration Tasks for Oracle Grid Infrastructure and Oracle RAC

Check
Task

Public Network Hardware:

Public network switch (redundant switches recommended) connected to a public gateway and to the public interface ports for each cluster member node.

Ethernet interface card (redundant network cards recommended, trunked as one Ethernet port name).

The switches and network interfaces must be at least 1 GbE.

The network protocol is TCP/IP.

Private Network Hardware for the Interconnect

Private dedicated network switches (redundant switches recommended), connected to the private interface ports for each cluster member node. Note: If you have more than one private network interface card for each server, then Oracle Clusterware automatically associates these interfaces for the private network using Grid Interprocess Communication (GIPC) and Grid Infrastructure Redundant Interconnect, also known as Cluster High Availability IP (HAIP).

The switches and network interface adapters must be at least 1 GbE, with 10 GbE recommended. Alternatively, use InfiniBand for the interconnect.

The interconnect must support the user datagram protocol (UDP).

Oracle Flex ASM Network Hardware

Oracle Flex ASM can use either the same private networks as Oracle Clusterware, or use its own dedicated private networks. Each network can be classified PUBLIC or PRIVATE+ASM or PRIVATE or ASM. ASM networks use the TCP protocol.

Cluster Names and Addresses: Determine and Configure the following names and addresses for the cluster

Cluster name: Decide a name for the cluster, and be prepared to enter it during installation. The cluster name should have the following characteristics:

Globally unique across all hosts, even across different DNS domains.

At least one character long and less than or equal to 15 characters long.

Consist of the same character set used for host names, in accordance with RFC 1123: Hyphens (-), and single-byte alphanumeric characters (a to z, A to Z, and 0 to 9).

Third Party Vendor Clusterware: If you use third-party vendor clusterware, then Oracle recommends that you use the vendor cluster name.

Grid Naming Service Virtual IP Address (GNS VIP): If you plan to use GNS, then configure a GNS name and fixed address on the DNS for the GNS VIP, and configure a subdomain on your DNS delegated to the GNS VIP for resolution of cluster addresses. GNS domain delegation is mandatory with dynamic public networks (DHCP, autoconfiguration).

Single Client Access Name (SCAN) and addresses

Using Grid Naming Service Resolution: Do not configure SCAN names and addresses in your DNS. SCANs are managed by GNS.

Using Manual Configuration and DNS resolution: Configure a SCAN name to resolve to three addresses on the domain name service (DNS).

Standard or Hub Node Public, Private and Virtual IP names and Addresses:

If you are not using GNS, and you are configuring a Standard cluster, then configure the following for each Hub Node:

Public node name and address, configured on the DNS and in /etc/hosts (for example, node1.example.com, address 192.0.2.10). The public node name should be the primary host name of each node, which is the name displayed by the hostname command.

Private node address, configured on the private interface for each node.

The private subnet that the private interfaces use must connect all the nodes you intend to have as cluster members. Oracle recommends that the network you select for the private network uses an address range defined as private by RFC 1918.

Public node virtual IP name and address (for example, node1-vip.example.com, address 192.0.2.11).

If you are not using GNS, then determine a virtual host name for each node. A virtual host name is a public node name that is used to reroute client requests sent to the node if the node is down. Oracle Database uses VIPs for client-to-database connections, so the VIP address must be publicly accessible. Oracle recommends that you provide a name in the format hostname-vip. For example: myclstr2-vip.

1.1.4 Oracle Grid Infrastructure and Oracle RAC Upgrades Checklist

Review this upgrade checklist if you have an existing Oracle Grid Infrastructure or Oracle RAC installation. A cluster is being upgraded until all cluster member nodes are running Oracle Grid Infrastructure 12c Release 1 (12.1), and the new clusterware becomes the active version.

If you intend to install Oracle RAC, then you must first complete the upgrade to Oracle Grid Infrastructure 12c Release 1 (12.1) on all cluster nodes before you install the Oracle Database 12c Release 1 (12.1) version of Oracle RAC.

Note:

All Oracle Grid Infrastructure upgrades (upgrades of existing Oracle Clusterware and Oracle ASM installations) are out-of-place upgrades. You cannot upgrade from an existing Oracle Grid Infrastructure installation to an Oracle Flex Cluster installation.

Table 1-4 Installation Upgrades Checklist for Oracle Grid infrastructure

Check
Task

Review Oracle Database Upgrade Guide

Install the latest available patchset release.

Confirm that the installation owner you plan to use is the same as the installation owner that owns the existing Oracle Grid Infrastructure installation.

The new Oracle Grid Infrastructure installation and the Oracle Grid Infrastructure home installation that you are upgrading must be owned by same operating system user, or permission errors result.

Confirm that the Oracle Automatic Storage Management (Oracle ASM) instances you have use standard Oracle ASM instance names.

The default ASM SID for a single-instance database is +ASM, and the default SID for ASM on Oracle Real Application Clusters nodes is +ASMnode#, where node# is the node number. With Oracle Grid Infrastructure 11.2.0.1 and later, non-default Oracle ASM instance names are not supported.

If you have non-default Oracle ASM instance names, then before you upgrade your cluster, use your existing release srvctl to remove individual Oracle ASM instances with non-default names, and add Oracle ASM instances with default names.

Check Network Addresses for Standard Oracle Grid Infrastructure deployments to ensure the following about IP addresses for the public and private networks:

The private and public IP addresses are in unrelated, separate subnets. The private subnet should be in a dedicated private subnet.

The public and virtual IP addresses, including the SCAN addresses, are in the same subnet (the range of addresses permitted by the subnet mask for the subnet network).

Neither private nor public IP addresses use a link local subnet (169.254.*.*).

Migrate OCR files from RAW or Block devices to Oracle ASM or a supported file system. Raw and Block devices are not supported.

Confirm that you are using a supported operating system, kernel release, and all required operating system packages for the new Oracle Grid Infrastructure installation.

Run the ocrcheck command to confirm Oracle Cluster Registry (OCR) file integrity. If this check fails, then repair the OCRs before proceeding.

Review Oracle 12c Upgrade Companion (My Oracle Support Note 1462240.1) for the most current information regarding other upgrade issues:

https://support.oracle.com/CSP/main/article?cmd=show&type=NOT&id=1462240.1

Run the Oracle Database Pre-Upgrade utility SQL script that is located in the path $ORACLE_HOME/rdbms/admin after you complete Oracle Grid Infrastructure installation to prepare your databases for upgrades.

For more information, review My Oracle Support Note 884522.1:

https://support.oracle.com/CSP/main/article?cmd=show&type=NOT&id=884522.1

1.1.5 Oracle Grid Infrastructure Storage Configuration Tasks

Review the following storage configuration task checklist for all installations:

Table 1-5 Oracle Grid Infrastructure Storage Configuration Checks

Check
Task

During installation, you are asked to provide paths for the following Oracle Clusterware files. These path locations must be writable by the Oracle Grid Infrastructure installation owner (Grid user). These locations must be shared across all nodes of the cluster, either on Oracle ASM (preferred), or on a cluster file system, because the files created during installation must be available to all cluster member nodes.

Voting disks are files that Oracle Clusterware uses to verify cluster node membership and status.

The location for voting disk files must be owned by the user performing the installation (oracle or grid), and must have permissions set to 640.

Oracle Cluster Registry files (OCR) contain cluster and database configuration information for Oracle Clusterware.

Before installation, the location for OCR files must be owned by the user performing the installation (grid or oracle). That installation user must have oinstall as its primary group. During installation, the installer creates the OCR files and changes ownership of the path and OCR files to root.

1.1.6 Oracle Grid Infrastructure Starting the Installation Tasks

Table 1-6 Oracle Grid Infrastructure Checks to Perform Before Starting the Installer

Check
Task

Check running Oracle processes, and shut down if necessary:

On a node with a standalone database not using Oracle ASM: You do not need to shut down the database while you install Oracle Grid Infrastructure.

On a node with a standalone Oracle Database using Oracle ASM: Stop the existing Oracle ASM instances. The Oracle ASM instances are restarted during installation.

On an Oracle RAC Database node: This installation requires an upgrade of Oracle Clusterware, as Oracle Clusterware is required to run Oracle RAC. As part of the upgrade, you must shut down the database one node at a time as the rolling upgrade proceeds from node to node.

Ensure cron jobs do not run during installation

If the installer is running when daily cron jobs start, then you may encounter unexplained installation problems if your cron job is performing cleanup, and temporary files are deleted before the installation is finished. Oracle recommends that you complete installation before daily cron jobs are run, or disable daily cron jobs that perform cleanup until after the installation is completed.

Decide if you want to install other languages

During installation, you are asked if you want translation of user interface text into languages other than the default, which is English. If the language set for the operating system is not supported by the installer, then by default the installer runs in the English language.

See Oracle Database Globalization Support Guide for detailed information about character sets and language configuration.

2 Configuring Servers for Oracle Grid Infrastructure and Oracle RAC

This chapter describes the operating system tasks you must complete on your servers before you install Oracle Grid Infrastructure for a cluster and Oracle Real Application Clusters (Oracle RAC). The values provided in this chapter are for installation minimums only. Oracle recommends that you configure production systems in accordance with planned system loads.

This chapter contains the following topics:

Checking Server Hardware and Memory Configuration

General Server Minimum Requirements

Server Storage Minimum Requirements

Server Memory Minimum Requirements

2.1 Checking Server Hardware and Memory Configuration

To ensure that each system meets these requirements, follow these steps:

To determine the physical RAM size, enter the following command:

# /usr/contrib/bin/machinfo  | grep -i Memory

If the size of the physical RAM installed in the system is less than the required size, then you must install more memory before continuing.

To determine the size of the configured swap space, enter the following command:

# /usr/sbin/swapinfo -a

Note:

Oracle recommends that you take multiple values for the available RAM and swap space before finalizing a value. This is because the available RAM and swap space keep changing depending on the user interactions with the computer.

Contact your operating system vendor for swap space allocation guidance for your server. The vendor guidelines supersede the swap space requirements listed in this guide.

To determine the amount of disk space available in the /tmp directory, enter the following command:

# bdf /tmp

If there is less than 7 GB of disk space available in the /tmp directory, then complete one of the following steps:

Delete unnecessary files from the /tmp directory to make available the disk space required.

Extend the file system that contains the /tmp directory. If necessary, contact your system administrator for information about extending file systems.

To determine the amount of free disk space on the system, enter the following command:

# bdf

To determine if the system architecture can run the software, enter the following command:

$ uname -m

Verify that the processor architecture matches the Oracle software release to install.

If you do not see the expected output (ia64), then you cannot install the software on this system.

View the shared memory kernel parameters (shmmni, shmseg, and shmmax) to determine if any changes are necessary for your system.

kctune -v shmmni
kctune -v shmseg
kctune -v shmmax

Use the kctune shmmni=1024 command to set the memory kernel parameter to the required value. See Section 2.4, "Server Memory Minimum Requirements" for more information about shared memory planning.

2.2 General Server Minimum Requirements

Select servers with the same instruction set architecture; running 32-bit and 64-bit Oracle software versions in the same cluster stack is not supported.

Ensure that the server is started with runlevel 3.

Ensure display cards provide at least 1024 x 768 display resolution, so that OUI displays correctly while performing a system console-based installation.

Ensure servers run the same operating system binary.

Oracle Grid Infrastructure installations and Oracle Real Application Clusters (Oracle RAC) support servers with different hardware in the same cluster. Your cluster can have nodes with CPUs of different speeds or sizes, but Oracle recommends that you use nodes with the same hardware configuration.

Oracle recommends that if you configure clusters using different configuration, that you categorize cluster nodes into homogenous pools as part of your server categorization management policy.

See Also:

Oracle Clusterware Administration and Deployment Guide for more information about server state and configuration attributes, and about using server pools to manage resources and workloads

2.3 Server Storage Minimum Requirements

Each system must meet the following minimum storage requirements:

1 GB of space in the /tmp directory.

If the free space available in the /tmp directory is less than what is required, then complete one of the following steps:

Delete unnecessary files from the /tmp directory to make available the space required.

Extend the file system that contains the /tmp directory. If necessary, contact your system administrator for information about extending file systems.

At least 8 GB of space for the Oracle Grid Infrastructure for a cluster home (Grid home). Oracle recommends that you allocate 100 GB to allow additional space for patches.

At least 12 GB of space for the Oracle base of the Oracle Grid Infrastructure installation owner (Grid user). The Oracle base includes Oracle Clusterware and Oracle ASM log files.

10 GB of additional space in the Oracle base directory of the Grid Infrastructure owner for diagnostic collections generated by Trace File Analyzer (TFA) Collector.

If you are installing Oracle Databases, and you plan to configure automated database backups, then you require additional space either in a file system or in an Oracle Automatic Storage Management disk group for the Fast Recovery Area.

See Also:

Oracle Database Backup and Recovery User's Guide for more information about Fast Recovery Area sizing

2.4 Server Memory Minimum Requirements

Ensure that your system meets the following minimum requirements, depending on your system architecture

64-bit System Minimum Memory Requirements

Shared Memory Requirements

Note:

If you encounter an OUI error indicating inadequate swap space size, but your swap space meets the requirements listed here, then you can ignore that error.

2.4.1 64-bit System Minimum Memory Requirements

Each system must meet the following minimum memory requirements:

At least 4 GB of RAM for Oracle Grid Infrastructure for a Cluster installations, including installations where you plan to install Oracle RAC.

Swap space equivalent to the multiple of the available RAM, as indicated in the following table:

Table 2-1 Swap Space Required for 64-bit System

Available RAM
Swap Space Required

Between 4 GB and 16 GB

Equal to RAM

More than 16 GB

16 GB of RAM

Note:

32-bit systems are no longer supported.

2.4.2 Shared Memory Requirements

If you intend to install Oracle Databases or Oracle RAC databases on the cluster, be aware that the size of the shared memory mount area on each server must be greater than the system global area (SGA) and the program global area (PGA) of the databases on the servers. Review expected SGA and PGA sizes with database administrators to ensure that you do not have to increase the shared memory mount area after databases are installed on the cluster.

3 Configuring Operating Systems for Oracle Grid Infrastructure and Oracle RAC

This chapter describes the system configuration tasks that you must complete before you start Oracle Universal Installer (OUI) to install Oracle Grid Infrastructure for a cluster, and that you may need to complete if you intend to install Oracle Real Application Clusters (Oracle RAC) on the cluster.

This chapter contains the following topics:

Reviewing Operating System and Software Upgrade Best Practices

Reviewing Operating System Security Common Practices

Using Installation Fixup Scripts

Logging In to a Remote System Using X Terminal

About Software Requirements

Operating System Requirements List for HP-UX Itanium Platforms

Additional Drivers and Software Packages for HP-UX

Checking the Software Requirements

Setting Network Time Protocol for Cluster Time Synchronization

Using Automatic SSH Configuration During Installation

Creating Required Symbolic Links

Setting the Minor Number for Device Files

Checking the Run Level and Name Service Cache Daemon

3.1 Reviewing Operating System and Software Upgrade Best Practices

Review the following information regarding upgrades:

General Upgrade Best Practices

Oracle ASM Upgrade Notifications

Rolling Upgrade Procedure Notifications

3.1.1 General Upgrade Best Practices

If you have an existing Oracle installation, then do the following:

Caution:

Always create a backup of existing databases before starting any configuration change.

Record the version numbers, patches, and other configuration information

Review upgrade procedures for your existing installation

Review Oracle upgrade documentation before proceeding with installation, to decide how you want to proceed

To find the most recent software updates, and to find best practices recommendations about preupgrade, postupgrade, compatibility, and interoperability, see Oracle 12c Upgrade Companion (My Oracle Support Note 1462240.1):

https://support.oracle.com/CSP/main/article?cmd=show&type=NOT&id=1462240.1

See Also:

Appendix B, "How to Upgrade to Oracle Grid Infrastructure 12c Release 1"

3.1.2 Oracle ASM Upgrade Notifications

Be aware of the following issues regarding Oracle ASM upgrades:

You can upgrade Oracle Automatic Storage Management (Oracle ASM) 11g Release 1 (11.1) and later without shutting down an Oracle RAC database by performing a rolling upgrade either of individual nodes, or of a set of nodes in the cluster. However, if you have a standalone database on a cluster that uses Oracle ASM, then you must shut down the standalone database before upgrading. If you are upgrading from Oracle ASM 10g, then you must shut down the entire Oracle ASM cluster to perform the upgrade.

The location of the Oracle ASM home changed in Oracle Grid Infrastructure 11g Release 2 (11.2) so that Oracle ASM is installed with Oracle Clusterware in the Oracle Grid Infrastructure home (Grid home).

If you have an existing Oracle ASM home from a previous release, then it should be owned by the same user that you plan to use to upgrade Oracle Clusterware.

3.1.3 Rolling Upgrade Procedure Notifications

Be aware of the following information regarding rolling upgrades:

During rolling upgrades of the operating system, Oracle supports using different operating system binaries when both versions of the operating system are certified with the Oracle Database release you are using.

Using mixed operating system versions is supported during upgrade only.

Be aware that mixed operating systems are supported only supported for the duration of an upgrade, over the period of a few hours.

Oracle Clusterware does not support nodes that have processors with different instruction set architectures (ISAs) in the same cluster. Each node must be binary compatible with the other nodes in the cluster.

For example, you cannot have one node using an Intel 64 processor and another node using an IA-64 (Itanium) processor in the same cluster. You could have one node using an Intel 64 processor and another node using an AMD64 processor in the same cluster because the processors use the same x86-64 ISA and run the same binary version of Oracle software.

3.2 Reviewing Operating System Security Common Practices

Secure operating systems are an important basis for general system security. Ensure that your operating system deployment is in compliance with common security practices as described in your operating system vendor security guide.

3.3 Using Installation Fixup Scripts

Oracle Universal Installer (OUI) detects when the minimum requirements for an installation are not met, and creates shell scripts, called Fixup scripts, to finish incomplete system configuration steps. If OUI detects an incomplete task, then it generates a Fixup script (runfixup.sh). You can run the script after you click Fix and Check Again.

You also can have CVU generate Fixup scripts before installation.

See Also:

Oracle Clusterware Administration and Deployment Guide for information about using the cluvfy command

Fixup scripts do the following:

If necessary set, kernel parameters to values required for successful installation, including:

Shared memory parameters.

Open file descriptor and UDP send/receive parameters.

Create and set permissions on the Oracle Inventory (central inventory) directory.

Create or reconfigures primary and secondary group memberships for the installation owner, if necessary, for the Oracle Inventory directory and the operating system privileges groups.

Set shell limits if necessary to required values.

Note:

If you have not set HTTP or FTP proxy addresses, then some configuration tasks involving updates of kernel packages may fail to complete.

If you have SSH configured between cluster member nodes for the user account that you will use for installation, then you can check your cluster configuration before installation and generate a fixup script to make operating system changes before starting the installation.

To do this, log in as the user account that will perform the installation, navigate to the staging area where the runcluvfy command is located, and use the following command syntax, where node is a comma-delimited list of nodes you want to make cluster members:

$ ./runcluvfy.sh stage -pre crsinst -n node -fixup -verbose

For example, if you intend to configure a two-node cluster with nodes node1 and node2, enter the following command:

$ ./runcluvfy.sh stage -pre crsinst -n node1,node2 -fixup -verbose

3.4 Logging In to a Remote System Using X Terminal

During installation, you are required to perform tasks as root or as other users on remote terminals. Complete the following procedure for user accounts that you want to enable for remote display.

Note:

If you log in as another user (for example, oracle), then repeat this procedure for that user as well.

To enable remote display, complete one of the following procedures:

If you are installing the software from an X Window System workstation or X terminal, then:

Start an X terminal session (xterm).

If you are installing the software on another system and using the system as an X11 display, then enter a command using the following syntax to enable remote hosts to display X applications on the local X server:

# xhost + RemoteHost

where RemoteHost is the fully qualified remote host name. For example:

# xhost + somehost.example.com
somehost.example.com being added to the access control list

If you are not installing the software on the local system, then use the ssh command to connect to the system where you want to install the software:

# ssh -Y RemoteHost

where RemoteHost is the fully qualified remote host name. The -Y flag ("yes") enables remote X11 clients to have full access to the original X11 display.For example:

# ssh -Y somehost.example.com

If you are not logged in as the root user, then enter the following command to switch the user to root:

$ su - root
password:
#

If you are installing the software from a PC or other system with X server software installed, then:

Note:

If necessary, see your X Window System documentation for more information about completing this procedure. Depending on the X software that you are using, you may need to complete the tasks in a different order.

Start the X Window System software.

Configure the security settings of the X Window System software to permit remote hosts to display X applications on the local system.

Connect to the remote system where you want to install the software as the Oracle Grid Infrastructure for a cluster software owner (grid, oracle) and start a terminal session on that system; for example, an X terminal (xterm).

Open another terminal on the remote system, and log in as the root user on the remote system, so you can run scripts as root when prompted.

3.5 About Software Requirements

Depending on the products that you intend to install, that you have the required operating system kernel and packages installed. Note that patch requirements are minimum required patch versions, and that earlier patch numbers are rolled into later patch updates.

Requirements listed in this document are current as of the date listed on the title page. To obtain the most current information about kernel requirements, see the online version on the Oracle Technology Network at the following URL:

http://www.oracle.com/technetwork/indexes/documentation/index.html

OUI performs checks your system to verify that it meets the listed operating system package requirements. To ensure that these checks complete successfully, verify the requirements before you start OUI.

Note:

Oracle does not support running different operating system versions on cluster members, unless an operating system is being upgraded. You cannot run different operating system version binaries on members of the same cluster, even if each operating system is supported.

3.6 Operating System Requirements List for HP-UX Itanium Platforms

Table 3-1 HP-UX Itanium Requirements

Item
Requirement

SSH Requirement

Oracle Clusterware requires SSH. The required SSH software is the default SSH shipped with your operating system.

Operating System

HP-UX 11iV3 patch Bundle Sep/ 2008 (B.11.31.0809.326a) or higher

HP-UX 11.31 packages and bundles

The following patches must be installed:

PHCO_43503 - 11.31 diskowner(1M) cumulative patch
PHKL_38038 - 11.31 vm cumulative patch
PHKL_38938 - 11.31 SCSI cumulative I/O patch
PHKL_40941 - 11.31 scheduler cumulative patch
PHSS_36354 - 11.31 assembler patch
PHSS_37042 - 11.31 hppac
PHSS_37959 - Libcl patch for alternate stack issue fix (QXCR1000818011)
PHSS_38141 - 11.31 aC++ Runtime
PHSS_39094 - 11.31 linker + fdp cumulative patch
PHSS_39100 - 11.31 Math Library Cumulative Patch
PHSS_39102 - 11.31 Integrity Unwind Library

Oracle Clusterware

All HP-UX 11.31 installations

No additional requirements for Oracle Clusterware.

At the time of this release, Hyper Messaging Protocol (HMP) is not supported.

HP Serviceguard A.11.20 is supported.

Note: HP Serviceguard is optional. It is required only if you want to use shared logical volumes for Oracle Clusterware or database files.

3.7 Additional Drivers and Software Packages for HP-UX

You are not required to install additional drivers and packages, but you may choose to install or configure drivers and packages in the following list:

Installation Requirements for Open Database Connectivity

Installation Requirements for Oracle Messaging Gateway

Installation Requirements for Programming Environments for HP-UX Itanium Systems

Installation Requirements for Web Browsers

3.7.1 Installation Requirements for Open Database Connectivity

Review the following sections if you plan to install Open Database Connectivity (ODBC):

About ODBC Drivers and Oracle Database

Installing ODBC Drivers for HP-UX Itanium Systems

3.7.1.1 About ODBC Drivers and Oracle Database

Open Database Connectivity (ODBC) is a set of database access APIs that connect to the database, prepare, and then run SQL statements on the database. An application that uses an ODBC driver can access non-uniform data sources, such as spreadsheets and comma-delimited files.

3.7.1.2 Installing ODBC Drivers for HP-UX Itanium Systems

Oracle ODBC driver on HP-UX Itanium is certified with ODBC Driver Manager 2.3.1. To use ODBC, you must also install gcc 4.2.3 or later.

You do not require ODBC drivers for Oracle Clusterware or Oracle Database.

Download and install the ODBC Driver from the following website:

http://www.unixodbc.org/

3.7.2 Installation Requirements for Oracle Messaging Gateway

Review the following sections to install Oracle Messaging Gateway

About Oracle Messaging Gateway

Installing Oracle Messaging Gateway

3.7.2.1 About Oracle Messaging Gateway

Oracle Messaging Gateway is a feature of Oracle Database. It enables communication between applications based on non-Oracle messaging systems and Oracle Streams Advanced Queuing.

Oracle Messaging Gateway supports the integration of Oracle Streams Advanced Queuing (AQ) with with applications based on WebSphere and TIBCO Rendezvous. For information on supported versions, see Oracle Database Advanced Queuing User's Guide.

3.7.2.2 Installing Oracle Messaging Gateway

Oracle Messaging Gateway is installed with Oracle Database.

Check My Oracle Support Certification for current requirements. Certifications are available at the following URL:

https://support.oracle.com

If you require a CSD for IBM WebSphere MQ, then see the following website for download and installation information:

http://www-01.ibm.com/support/docview.wss?uid=swg21182310

3.7.3 Installation Requirements for Programming Environments for HP-UX Itanium Systems

Review the following sections to install programming environments:

About Programming Environments and Oracle Database

Configuring Support for Programming Environments

3.7.3.1 About Programming Environments and Oracle Database

Oracle Database supports multiple programming languages for application development in different environments. Some languages require that you install additional compiler packages for the operating system.

Programming environments are optional. They are not required for Oracle Database.

See Also :

Oracle Database Advanced Application Developer's Guide for an overview of programming environments

3.7.3.2 Configuring Support for Programming Environments

Ensure that your system meets the requirements for the programming environment you want to configure:

Table 3-2 Requirements for Programming Environments for HP-UX Itanium Systems

Programming Environments
Support Requirements

Java Database Connectivity (JDBC) / Oracle Call Interface (OCI)

Use JDK 6 (1.6.0.16) or Java 7 (1.7.0.00) or later with the JNDI extension with Oracle Java Database Connectivity and Oracle Call Interface drivers.

JDK 1.6.0.16 is installed with this release.

Note: These are not mandatory for Oracle Grid Infrastructure installation.

Pro*C/C++,
Oracle Call Interface,
Oracle C++ Call Interface,
Oracle XML Developer's Kit (XDK)

Compiler Version: A.06.20 (HP C/aC++ Swlist Bundle - C.11.31.04) - Sep 2008

Patch for HP-UX 11i V3 (11.31) on HP-UX Itanium:

PHSS_39824 - 11.31 HP C/aC++ Compiler (A.06.23) patch

PHSS_39826 - 11.31 u2comp/be/plugin (C.06.23) patch

Additional patches may be needed depending on applications you deploy.

Pro*COBOL

Micro Focus Server Express 5.1

Pro*FORTRAN

HP FORTRAN/90 - Sep 2008 - release

VERITAS File System

PHKL_39773: 11.31 VRTS 5.0 GARP6 VRTSvxfs Kernel Patch

Note: The VERITAS file system is optional. This patch is required only if you want to use a VERITAS File System 5.0.

3.7.4 Installation Requirements for Web Browsers

Web browsers are required only if you intend to use Oracle Enterprise Manager Database Express and Oracle Enterprise Manager Cloud Control. Web browsers must support Java Script, and the HTML 4.0 and CSS 1.0 standards. For a list of browsers that meet these requirements, see the Enterprise Manager certification matrix on My Oracle Support:

https://support.oracle.com

See Also:

Oracle Enterprise Manager Cloud Control Basic Installation Guide for steps on how to access the Enterprise Manager certification matrix

3.8 Checking the Software Requirements

To ensure that the system meets these requirements, follow these steps:

To determine which version of HP-UX is installed, enter the following command:

# uname -a
"HP-UX hostname B.11.31 U ia64 4156074294 unlimited-user license"

In this example, the version of HP-UX 11i is 11.31 on Itanium.

Verify that the system meets the minimum patch bundle requirements using the following command:

# /usr/sbin/swlist -l bundle |grep QPK

The QPK (Quality Pack) bundles have version numbers of the form B.11.31.0809.326a (for the September 2008 release), B.11.31.0903.334a (for the March 2009 release), and so on. If a required bundle, product, or fileset is not installed, then you must install it. Refer to your operating system or software documentation for information about installing products.

Note:

There may be more recent versions of the patches listed in the preceding paragraph that are installed on the system. If a listed patch is not installed, then determine if a more recent version is installed before installing the version listed.

If a required patch is not installed, then download it from the following website and install it:

http://itresourcecenter.hp.com">>http://itresourcecenter.hp.com

If the web site shows a more recent version of the patch, then download and install that version.

If you require a CSD for WebSphere MQ, then refer to the following website for download and installation information:

http://www-01.ibm.com/support/docview.wss?uid=swg21182310

Note:

There may be more recent versions of the patches listed installed on the system. If a listed patch is not installed, then determine whether a more recent version is installed before installing the version listed.

3.9 Setting Network Time Protocol for Cluster Time Synchronization

Oracle Clusterware requires the same time zone setting on all cluster nodes. During installation, the installation process picks up the time zone setting of the Grid installation owner on the node where OUI runs, and uses that on all nodes as the default TZ setting for all processes managed by Oracle Clusterware. This default is used for databases, Oracle ASM, and any other managed processes.

You have two options for time synchronization:

An operating system configured network time protocol (NTP)

Oracle Cluster Time Synchronization Service

Oracle Cluster Time Synchronization Service is designed for organizations whose cluster servers are unable to access NTP services. If you use NTP, then the Oracle Cluster Time Synchronization daemon (ctssd) starts up in observer mode. If you do not have NTP daemons, then ctssd starts up in active mode and synchronizes time among cluster members without contacting an external time server.

Note:

Before starting the installation of Oracle Grid Infrastructure, Oracle recommends that you ensure the clocks on all nodes are set to the same time.

If you have NTP daemons on your server but you cannot configure them to synchronize time with a time server, and you want to use Cluster Time Synchronization Service to provide synchronization service in the cluster, then deactivate and deinstall the Network Time Protocol (NTP).

To deactivate the NTP service, you must stop the existing ntpd service, disable it from the initialization sequences and remove the ntp.conf file. To complete these steps, run the following commands as the root user

# /sbin/init.d/xntpd stop
# rm /etc/ntp.conf

or, mv /etc/ntp.conf to /etc/ntp.conf.org.

When the installer finds that the NTP protocol is not active, the Cluster Time Synchronization Service is installed in active mode and synchronizes the time across the nodes. If NTP is found configured, then the Cluster Time Synchronization Service is started in observer mode, and no active time synchronization is performed by Oracle Clusterware within the cluster.

To confirm that ctssd is active after installation, enter the following command as the Grid installation owner:

$ crsctl check ctss

3.10 Using Automatic SSH Configuration During Installation

To install Oracle software, Secure Shell (SSH) connectivity should be set up between all cluster member nodes. OUI uses the ssh and scp commands during installation to run remote commands on and copy files to the other cluster nodes. You must configure SSH so that these commands do not prompt for a password.

Note:

SSH is used by Oracle configuration assistants for configuration operations from local to remote nodes. It is also used by Enterprise Manager.

You can configure SSH from the OUI interface during installation for the user account running the installation. The automatic configuration creates passwordless SSH connectivity between all cluster member nodes. Oracle recommends that you use the automatic procedure if possible.

To enable the script to run, you must remove stty commands from the profiles of any Oracle software installation owners, and remove other security measures that are triggered during a login, and that generate messages to the terminal. These messages, mail checks, and other displays prevent Oracle software installation owners from using the SSH configuration script that is built into the Oracle Universal Installer. If they are not disabled, then SSH must be configured manually before an installation can be run.

In rare cases, Oracle Clusterware installation may fail during the "AttachHome" operation when the remote node closes the SSH connection. To avoid this problem, set the following parameter in the SSH daemon configuration file /opt/ssh/etc/sshd_config on all cluster nodes to set the timeout wait to unlimited:

LoginGraceTime 0

See Also:

Section 5.2.4, "Preventing Installation Errors Caused by Terminal Output Commands" for information about how to remove stty commands in user profiles

3.11 Creating Required Symbolic Links

Note:

This task is required only if the Motif 2.1 Development Environment package (X11MotifDevKit.MOTIF21-PRG) is not installed.

To enable you to successfully relink Oracle products after installing this software, enter the following commands to create required X library symbolic links in the /usr/lib directory:

# cd /usr/lib
# ln -s libX11.3 libX11.sl
# ln -s libXIE.2 libXIE.sl
# ln -s libXext.3 libXext.sl
# ln -s libXhp11.3 libXhp11.sl
# ln -s libXi.3 libXi.sl
# ln -s libXm.4 libXm.sl
# ln -s libXp.2 libXp.sl
# ln -s libXt.3 libXt.sl
# ln -s libXtst.2 libXtst.sl

3.12 Setting the Minor Number for Device Files

Oracle Universal Installer, as part of its prerequisite checks, verifies that the device file settings for the minor number across all nodes is 0x4 or 0x104 for the /dev/async device. By default, the minor number is set to 0x0. To change the minor number prior to starting the installation, perform the following steps:

Log in as the root user.

Determine whether /dev/async exists. If the device does not exist, then use the following command to create it:

# /sbin/mknod /dev/async c 101 0x4

Alternatively, you can set the minor number value to 0x104 using the following command:

# /sbin/mknod /dev/async c 101 0x104

If /dev/async exists, then determine the current value of the minor number, as shown in the following example:

# ls -l /dev/async

crw-r--r--   1 root       sys        101 0x000000 Sep 28 10:38 /dev/async

If the existing minor number of the file is not 0x4 or 0x104, then change it to an expected value using one of the following commands:

# /sbin/mknod /dev/async c 101 0x4
or
# /sbin/mknod /dev/async c 101 0x104

3.13 Checking the Run Level and Name Service Cache Daemon

To allow Oracle Clusterware to better tolerate network failures with NAS devices or NFS mounts, enable the Name Service Cache Daemon (nscd). The nscd provides a caching mechanism for the most common name service requests. It is automatically started when the system starts in a multiuser state. Oracle software requires that the server is started with multiuser run level (3), which is the default for HP-UX.

To check to see if the server is set to 3, enter the command who -r. For example:

# who -r
.run-level 3  Jan 4 14:04     3      0  S

Refer to your operating system documentation if you must change the run level.

To check to see if the password and group caching daemon (pwgrd) is running, enter the following command:

ps -aef |grep pwgrd

4 Configuring Networks for Oracle Grid Infrastructure and Oracle RAC

Review the following sections to check that you have the networking hardware and internet protocol (IP) addresses required for an Oracle Grid Infrastructure for a cluster installation.

This chapter contains the following topics:

Network Interface Hardware Requirements

IP Interface Configuration Requirements

Private Interconnect Redundant Network Requirements

IPv4 and IPv6 Protocol Requirements

Oracle Grid Infrastructure IP Name and Address Requirements

About Oracle Flex ASM Clusters Networks

Broadcast Requirements for Networks Used by Oracle Grid Infrastructure

Multicast Requirements for Networks Used by Oracle Grid Infrastructure

Domain Delegation to Grid Naming Service

Configuration Requirements for Oracle Flex Clusters

Grid Naming Service Standard Cluster Configuration Example

Manual IP Address Configuration Example

Network Interface Configuration Options

See Also:

The Certify pages on My Oracle Support for the most up-to-date information about supported network protocols and hardware for Oracle RAC:

https://support.oracle.com

4.1 Network Interface Hardware Requirements

The following is a list of requirements for network configuration:

Each node must have at least two network adapters or network interface cards (NICs): one for the public network interface, and one for the private network interface (the interconnect).

When you upgrade a node to Oracle Grid Infrastructure 11g Release 2 (11.2.0.2) and later, the upgraded system uses your existing network classifications.

To configure multiple public interfaces, use a third-party technology for your platform to aggregate the multiple public interfaces before you start installation, and then select the single interface name for the combined interfaces as the public interface. Oracle recommends that you do not identify multiple public interface names during Oracle Grid Infrastructure installation. Note that if you configure two network interfaces as public network interfaces in the cluster without using an aggregation technology, the failure of one public interface on a node does not result in automatic VIP failover to the other public interface.

Oracle recommends that you use the Redundant Interconnect Usage feature to make use of multiple interfaces for the private network. However, you can also use third-party technologies to provide redundancy for the private network.

Note:

Redundant Interconnect Usage requires a complete Oracle Grid Infrastructure and Oracle Database Release 2 (11.2.0.2) or higher stack. Earlier release Oracle Databases cannot use this feature, and must use third-party NIC bonding technologies. If you consolidate different database releases in one cluster, and use databases before Oracle Database 11g Release 2 (11.2.0.2), then you may require both technologies.

For the public network, each network adapter must support TCP/IP.

For the private network, the interface must support the user datagram protocol (UDP) using high-speed network adapters and switches that support TCP/IP (minimum requirement 1 Gigabit Ethernet).

Note:

UDP is the default interface protocol for Oracle RAC and Oracle Clusterware. You must use a switch for the interconnect. Oracle recommends that you use a dedicated switch.

Oracle does not support token-rings or crossover cables for the interconnect.

4.2 IP Interface Configuration Requirements

For clusters using single interfaces for private networks, each node's private interface for interconnects must be on the same subnet, and that subnet must connect to every node of the cluster. For example, if the private interfaces have a subnet mask of 255.255.255.0, then your private network is in the range 192.168.0.0--192.168.0.255, and your private addresses must be in the range of 192.168.0.[0-255]. If the private interfaces have a subnet mask of 255.255.0.0, then your private addresses can be in the range of 192.168.[0-255].[0-255].

For clusters using Redundant Interconnect Usage, each private interface should be on a different subnet. However, each cluster member node must have an interface on each private interconnect subnet, and these subnets must connect to every node of the cluster. For example, you can have private networks on subnets 192.168.0 and 10.0.0, but each cluster member node must have an interface connected to the 192.168.0 and 10.0.0 subnets.

For the private network, the endpoints of all designated interconnect interfaces must be completely reachable on the network. There should be no node that is not connected to every private network interface. You can test if an interconnect interface is reachable using ping.

4.3 Private Interconnect Redundant Network Requirements

With Redundant Interconnect Usage, you can identify multiple interfaces to use for the cluster private network, without the need of using bonding or other technologies. This functionality is available starting with Oracle Database 11g Release 2 (11.2.0.2). If you use the Oracle Clusterware Redundant Interconnect feature, then you must use IPv4 addresses for the interfaces.

When you define multiple interfaces, Oracle Clusterware creates from one to four highly available IP (HAIP) addresses. Oracle RAC and Oracle Automatic Storage Management (Oracle ASM) instances use these interface addresses to ensure highly available, load-balanced interface communication between nodes. The installer enables Redundant Interconnect Usage to provide a high availability private network.

By default, Oracle Grid Infrastructure software uses all of the HAIP addresses for private network communication, providing load-balancing across the set of interfaces you identify for the private network. If a private interconnect interface fails or become non-communicative, then Oracle Clusterware transparently moves the corresponding HAIP address to one of the remaining functional interfaces.

Note:

During installation, you can define up to four interfaces for the private network. The number of HAIP addresses created during installation is based on both physical and logical interfaces configured for the network adapter. After installation, you can define additional interfaces. If you define more than four interfaces as private network interfaces, then be aware that Oracle Clusterware activates only four of the interfaces at a time. However, if one of the four active interfaces fails, then Oracle Clusterware transitions the HAIP addresses configured to the failed interface to one of the reserve interfaces in the defined set of private interfaces.

See Also:

Oracle Clusterware Administration and Deployment Guide for more information about HAIP addresses

4.4 IPv4 and IPv6 Protocol Requirements

Oracle Grid Infrastructure and Oracle RAC support the standard IPv6 address notations specified by RFC 2732 and global and site-local IPv6 addresses as defined by RFC 4193.

Cluster member node interfaces can be configured to use IPv4, IPv6, or both types of Internet protocol addresses. However, be aware of the following:

Configuring public VIPs: During installation, you can configure VIPs for a given public network as IPv4 or IPv6 types of addresses.

If you configure redundant network interfaces using a third-party technology, then Oracle does not support configuring one interface to support IPv4 addresses and the other to support IPv6 addresses. You must configure network interfaces of a redundant interface pair with the same IP protocol.

During installation, you cannot configure the cluster with VIP and SCAN names that resolve to both IPv4 and IPv6 addresses. For example, you cannot configure VIPs and SCANS on some cluster member nodes to resolve to IPv4 addresses, and VIPs and SCANs on other cluster member nodes to resolve to IPv6 addresses. Oracle does not support this configuration.

You can configure an IPv6 cluster by selecting VIP and SCAN names that resolve to addresses in an IPv6 subnet for the cluster, and selecting that subnet as public during installation.

If you install using static virtual IP (VIP) addresses in an IPv4 cluster, then the VIP names you supply during installation should resolve only to IPv4 addresses. If you install using static IPv6 addresses, then the VIP names you supply during installation should resolve only to IPv6 addresses.

During installation, Oracle does not support configuring some nodes in the same cluster with all IPv6 addresses and other nodes with all IPv4 addresses, or some nodes with both IPv4 and IPv6 addresses, while other nodes are configured exclusively with IPv4 or IPv6 addresses. During installation, you can choose to enable your clients to connect with IPv6 addresses or IPv4 addresses. After installation, you can add IPv4 addresses to an IPv6 cluster or IPv6 addresses to an IPv4 cluster.

Configuring private IP interfaces (interconnects): you must configure the private network as an IPv4 network. IPv6 addresses are not supported for the interconnect.

GNS or Multi-cluster addresses: Oracle Grid Infrastructure supports IPv4 DHCP addresses, and IPv6 addresses configured with the Stateless Address Autoconfiguration protocol, as described in RFC 2462.

Note:

Link-local and site-local IPv6 addresses as defined in RFC 1884 are not supported.

See Also:

http://www.ietf.org/rfc/rfc2732.txt for RFC 2732, and information about IPv6 notational representation

http://www.ietf.org/rfc/rfc3513.txt for RFC 3513, and information about proper IPv6 addressing

http://www.ietf.org/rfc/rfc2462.txt for RFC 2462, and information about IPv6 Stateless Address Autoconfiguration protocol

Oracle Database Net Services Administrator's Guide for more information about network communication and IP address protocol options

4.5 Oracle Grid Infrastructure IP Name and Address Requirements

This section contains the following topics:

About Oracle Grid Infrastructure Name Resolution Options

Cluster Name and SCAN Requirements

IP Name and Address Requirements For Grid Naming Service (GNS)

IP Name and Address Requirements for Standard Cluster Manual Configuration

4.5.1 About Oracle Grid Infrastructure Name Resolution Options

Before starting the installation, you must have at least two interfaces configured on each node: One for the private IP address and one for the public IP address.

You can configure IP addresses with one of the following options:

Dynamic IP address assignment using Multi-cluster or standard Oracle Grid Naming Service (GNS). If you select this option, then network administrators delegate a subdomain to be resolved by GNS (standard or multicluster). Requirements for GNS are different depending on whether you choose to configure GNS with zone delegation (resolution of a domain delegated to GNS), or without zone delegation (a GNS virtual IP address without domain delegation):

For GNS with zone delegation:

For IPv4, a DHCP service running on the public network the cluster uses

For IPv6, an autoconfiguration service running on the public network the cluster uses

Enough DHCP addresses to provide 1 IP address for each node, and 3 IP addresses for the cluster used by the Single Client Access Name (SCAN) for the cluster

Static IP address assignment using DNS or host file resolution. If you select this option, then network administrators assign a fixed IP address for each physical host name in the cluster and for IPs for the Oracle Clusterware managed VIPs. In addition, either domain name server (DNS) based static name resolution is used for each node, or host files for both the clusters and clients have to be updated, resulting in limited SCAN functionality. Selecting this option requires that you request network administration updates when you modify the cluster.

For GNS without zone delegation:

Configure a GNS virtual IP address (VIP) for the cluster. To enable Oracle Flex Cluster, you must at least configure a GNS virtual IP address.

Note:

Oracle recommends that you use a static host name for all non-VIP server node public host names.

Public IP addresses and virtual IP addresses must be in the same subnet.

4.5.2 Cluster Name and SCAN Requirements

The cluster name must be unique across your enterprise, must be at least one character long and no more than 15 characters in length, must be alphanumeric, cannot begin with a numeral, and may contain hyphens (-). Underscore characters (_) are not allowed.

If you configure a Standard cluster, and choose a Typical install, then the SCAN is also the name of the cluster. In that case, the SCAN must meet the requirements for a cluster name. The SCAN can be no longer than 15 characters.

In an Advanced installation, The SCAN and cluster name are entered in separate fields during installation, so cluster name requirements do not apply to the name used for the SCAN, and the SCAN can be longer than 15 characters. If you enter a domain with the SCAN name, and you want to use GNS with zone delegation, then the domain must be the GNS domain.

Note:

Select your name carefully. After installation, you can only change the cluster name by reinstalling Oracle Grid Infrastructure.

4.5.3 IP Name and Address Requirements For Grid Naming Service (GNS)

If you enable Grid Naming Service (GNS), then name resolution requests to the cluster are delegated to the GNS, which is listening on the GNS virtual IP address. The network administrator must configure the domain name server (DNS) to delegate resolution requests for cluster names (any names in the subdomain delegated to the cluster) to the GNS. When a request comes to the domain, GNS processes the requests and responds with the appropriate addresses for the name requested. To use GNS, you must specify a static IP address for the GNS VIP address.

Note:

The following restrictions apply to vendor configurations on your system:

For Standard Clusters: If you have vendor clusterware installed, then you cannot choose to use GNS, because the vendor clusterware does not support it. Vendor clusterware is not supported with Oracle Flex Cluster configurations.

You cannot use GNS with another multicast DNS. To use GNS, disable any third party mDNS daemons on your system.

4.5.4 IP Name and Address Requirements For Multi-Cluster GNS

Review the following requirements for using Multi-cluster GNS:

About Multi-Cluster GNS Networks

Configuring GNS Server Clusters

Configuring GNS Client Clusters

Creating and Using a GNS Client Data File

4.5.4.1 About Multi-Cluster GNS Networks

The general requirements for Multi-cluster GNS are similar to those for standard GNS. Multi-cluster GNS differs from standard GNS in that Multi-cluster GNS provides a single networking service across a set of clusters, rather than a networking service for a single cluster.

To provide networking service, Multi-cluster GNS is configured using DHCP addresses, and name advertisement and resolution is carried out with the following components:

The GNS server cluster performs address resolution for GNS client clusters. A GNS server cluster is the cluster where Multi-cluster GNS runs, and where name resolution takes place for the subdomain delegated to the set of clusters.

GNS client clusters receive address resolution from the GNS server cluster. A GNS client cluster is a cluster that advertises its cluster member node names using the GNS server cluster.

4.5.4.2 Configuring GNS Server Clusters

To use this option, your network administrators must have delegated a subdomain to GNS for resolution.

Before installation, create a static IP address for the GNS VIP address, and provide a subdomain that your DNS servers delegate to that static GNS IP address for resolution.

4.5.4.3 Configuring GNS Client Clusters

To configure a GNS client cluster, check to ensure all of the following requirements are completed:

A GNS server instance must be running on your network, and it must be accessible (for example, not blocked by a firewall).

All of the node names in the GNS domain must be unique; address ranges and cluster names must be unique for both GNS server and GNS client clusters.

You must have a GNS client data file that you generated on the GNS server cluster, so that the GNS client cluster has the information needed to delegate its name resolution to the GNS server cluster, and you must have copied that file to the GNS client cluster member node on which you are running the Oracle Grid Infrastructure installation.

4.5.4.4 Creating and Using a GNS Client Data File

On a GNS server cluster member, run the following command, where path_to_file is the name and path location of the GNS client data file you create:

srvctl export gns -clientdata path_to_file

For example:

$ srvctl export gns -clientdata /home/grid/gns_client_data

Copy the GNS Client data file to a secure path on the GNS Client node where you run the GNS Client cluster installation. The Oracle Installation user must have permissions to access that file. Oracle recommends that no other user is granted permissions to access the GNS Client data file. During installation, you are prompted to provide a path to that file.

After you have completed the GNS client cluster installation, you must run the following command on one of the GNS server cluster members to start GNS service, where path_to_file is the name and path location of the GNS client data file:

srvctl add gns -clientdata path_to_file

For example:

$ srvctl add gns -clientdata /home/grid/gns_client_data

See Also:

Oracle Clusterware Administration and Deployment Guide for more information about GNS server and GNS client administration

4.5.5 IP Name and Address Requirements for Standard Cluster Manual Configuration

If you do not enable GNS, then you must configure static cluster node names and addresses before starting installation.

Public and virtual IP names must conform with the RFC 952 standard, which allows alphanumeric characters and hyphens ("-"), but does not allow underscores ("_").

Oracle Clusterware manages private IP addresses in the private subnet on interfaces you identify as private during the installation interview.

The cluster must have the following names and addresses:

A public IP address for each node, with the following characteristics:

Static IP address

Configured before installation for each node, and resolvable to that node before installation

On the same subnet as all other public IP addresses, VIP addresses, and SCAN addresses in the cluster

A virtual IP address for each node, with the following characteristics:

Static IP address

Configured before installation for each node, but not currently in use

On the same subnet as all other public IP addresses, VIP addresses, and SCAN addresses in the cluster

A Single Client Access Name (SCAN) for the cluster, with the following characteristics:

Three static IP addresses configured on the domain name server (DNS) before installation so that the three IP addresses are associated with the name provided as the SCAN, and all three addresses are returned in random order by the DNS to the requestor

Configured before installation in the DNS to resolve to addresses that are not currently in use

Given addresses on the same subnet as all other public IP addresses, VIP addresses, and SCAN addresses in the cluster

Given a name that does not begin with a numeral, and that conforms with the RFC 952 standard, which allows alphanumeric characters and hyphens ("-"), but does not allow underscores ("_")

A private IP address for each node, with the following characteristics:

Static IP address

Configured before installation, but on a separate, private network, with its own subnet, that is not resolvable except by other cluster member nodes

The SCAN is a name used to provide service access for clients to the cluster. Because the SCAN is associated with the cluster as a whole, rather than to a particular node, the SCAN makes it possible to add or remove nodes from the cluster without needing to reconfigure clients. It also adds location independence for the databases, so that client configuration does not have to depend on which nodes are running a particular database. Clients can continue to access the cluster in the same way as with previous releases, but Oracle recommends that clients accessing the cluster use the SCAN.

Note:

In a Typical installation, the SCAN you provide is also the name of the cluster, so the SCAN name must meet the requirements for a cluster name. In an Advanced installation, The SCAN and cluster name are entered in separate fields during installation, so cluster name requirements do not apply to the SCAN name.

You can use the nslookup command to confirm that the DNS is correctly associating the SCAN with the addresses. For example:

root@node1]$ nslookup mycluster-scan
Server:         dns.example.com
Address:        192.0.2.001

Name:   mycluster-scan.example.com
Address: 192.0.2.201
Name:   mycluster-scan.example.com
Address: 192.0.2.202
Name:   mycluster-scan.example.com
Address: 192.0.2.203

After installation, when a client sends a request to the cluster, the Oracle Clusterware SCAN listeners redirect client requests to servers in the cluster.

Note:

Oracle strongly recommends that you do not configure SCAN VIP addresses in the hosts file. Use DNS resolution for SCAN VIPs. If you use the hosts file to resolve SCANs, then the SCAN can resolve to one IP address only.

Configuring SCANs in a DNS or a hosts file is the only supported configuration. Configuring SCANs in a Network Information Service (NIS) is not supported.

See Also:

Section D.2, "Understanding Network Addresses." for more information about network addresses

4.6 About Oracle Flex ASM Clusters Networks

Starting with Oracle Grid Infrastructure 12c Release 1 (12.1), as part of an Oracle Flex Cluster installation, Oracle ASM is configured within Oracle Grid Infrastructure to provide storage services. Each Oracle Flex ASM cluster has its own name that is globally unique within the enterprise.

Oracle Flex ASM enables an Oracle ASM instance to run on a separate physical server from the database servers. Many Oracle ASM instances can be clustered to support numerous database clients.

You can consolidate all the storage requirements into a single set of disk groups. All these disk groups are managed by a small set of Oracle ASM instances running in a single Oracle Flex Cluster.

Every Oracle Flex ASM cluster has one or more Hub Nodes on which Oracle ASM instances are running.

See Also:

Oracle Clusterware Administration and Deployment Guide for more information about Oracle Flex Clusters

Oracle Database Storage Administrator's Guide for more information about Oracle Flex ASM

Oracle Flex ASM can use either the same private networks as Oracle Clusterware, or use its own dedicated private networks. Each network can be classified PUBLIC, ASM & PRIVATE, PRIVATE, or ASM.

The Oracle Flex ASM cluster network has the following requirements and characteristics:

The ASM network can be configured during installation, or configured or modified after installation.

Cluster nodes can be configured as follows:

Oracle Flex ASM cluster Hub Nodes, with the following characteristics:

Are similar to prior release Oracle Grid Infrastructure cluster member nodes, as all servers configured with the Hub Node role are peers.

Have direct connections to the ASM disks.

Run a Direct ASM client process.

Access the ASM disks as Hub Nodes only, where they are designated a Hub Node for that storage.

Respond to service requests delegated to them through the global ASM listener configured for the Oracle Flex ASM cluster, which designates three of the Oracle Flex ASM cluster member Hub Node listeners as remote listeners for the Oracle Flex ASM cluster.

See Also:

Oracle Database Storage Administrator's Guide for more information about Oracle Flex ASM clusters

4.7 Broadcast Requirements for Networks Used by Oracle Grid Infrastructure

Broadcast communications (ARP and UDP) must work properly across all the public and private interfaces configured for use by Oracle Grid Infrastructure.

The broadcast must work across any configured VLANs as used by the public or private interfaces.

When configuring public and private network interfaces for Oracle RAC, you must enable ARP. Highly Available IP (HAIP) addresses do not require ARP on the public network, but for VIP failover, you will need to enable ARP. Do not configure NOARP.

4.8 Multicast Requirements for Networks Used by Oracle Grid Infrastructure

For each cluster member node, the Oracle mDNS daemon uses multicasting on all interfaces to communicate with other nodes in the cluster. Multicasting is required on the private interconnect. For this reason, at a minimum, you must enable multicasting for the cluster:

Across the broadcast domain as defined for the private interconnect

On the IP address subnet ranges 224.0.0.0/24 and optionally 230.0.1.0/24

You do not need to enable multicast communications across routers.

4.9 Domain Delegation to Grid Naming Service

If you are configuring Grid Naming Service (GNS) for a standard cluster, then before installing Oracle Grid Infrastructure you must configure DNS to send to GNS any name resolution requests for the subdomain served by GNS. The subdomain that GNS serves represents the cluster member nodes.

4.9.1 Choosing a Subdomain Name for Use with Grid Naming Service

To implement GNS, your network administrator must configure the DNS to set up a domain for the cluster, and delegate resolution of that domain to the GNS VIP. You can use a separate domain, or you can create a subdomain of an existing domain for the cluster. The subdomain name, can be any supported DNS name such as sales-cluster.rac.com.

Oracle recommends that the subdomain name is distinct from your corporate domain. For example, if your corporate domain is mycorp.example.com, the subdomain for GNS might be rac-gns.mycorp.example.com.

If the subdomain is not distinct, then it should be for the exclusive use of GNS. For example, if you delegate the subdomain mydomain.example.com to GNS, then there should be no other domains that share it such as lab1.mydomain.example.com.

See Also:

Oracle Clusterware Administration and Deployment Guide for more information about GNS

Section 4.5.2, "Cluster Name and SCAN Requirements" for information about choosing network identification names

4.9.2 Configuring DNS for Cluster Domain Delegation to Grid Naming Service

If you plan to use Grid Naming Service (GNS) with a delegated domain, then before Oracle Grid Infrastructure installation, configure your domain name server (DNS) to send to GNS name resolution requests for the subdomain GNS serves, which are the cluster member nodes. GNS domain delegation is mandatory with dynamic public networks (DHCP, autoconfiguration). GNS domain delegation is not required with static public networks (static addresses, manual configuration).

See Also:

Oracle Clusterware Administration and Deployment Guide for more information about GNS options, delegation, and public networks

The following is an overview of the steps to be performed for domain delegation. Your actual procedure may be different from this example.

Configure the DNS to send GNS name resolution requests using delegation:

In the DNS, create an entry for the GNS virtual IP address, where the address uses the form gns-server.clustername.domainname. For example, where the cluster name is mycluster, and the domain name is example.com, and the IP address is 192.0.2.1, create an entry similar to the following:

mycluster-gns-vip.example.com  A  192.0.2.1

The address you provide must be routable.

Set up forwarding of the GNS subdomain to the GNS virtual IP address, so that GNS resolves addresses to the GNS subdomain. To do this, create a BIND configuration entry similar to the following for the delegated domain, where cluster01.example.com is the subdomain you want to delegate:

 cluster01.example.com  NS  mycluster-gns-vip.example.com

When using GNS, you must configure resolve.conf on the nodes in the cluster (or the file on your system that provides resolution information) to contain name server entries that are resolvable to corporate DNS servers. The total timeout period configured—a combination of options attempts (retries) and options timeout (exponential backoff)—should be less than 30 seconds. For example, where xxx.xxx.xxx.42 and xxx.xxx.xxx.15 are valid name server addresses in your network, provide an entry similar to the following in /etc/resolv.conf:

options attempts: 2
options timeout: 1

search cluster01.example.com example.com
nameserver xxx.xxx.xxx.42
nameserver xxx.xxx.xxx.15

/etc/nsswitch.conf controls name service lookup order. In some system configurations, the Network Information System (NIS) can cause problems with SCAN address resolution. Oracle recommends that you place the nis entry at the end of the search list. For example:

/etc/nsswitch.conf
     hosts:    files   dns   nis

Note:

Be aware that use of NIS is a frequent source of problems when doing cable pull tests, as host name and username resolution can fail.

4.10 Configuration Requirements for Oracle Flex Clusters

Review the following information if you intend to configure an Oracle Flex Cluster:

General Requirements for Oracle Flex Cluster Configuration

Oracle Flex Cluster DHCP-Assigned Virtual IP (VIP) Addresses

Oracle Flex Cluster Manually-Assigned Addresses

4.10.1 General Requirements for Oracle Flex Cluster Configuration

Note the following requirements for Oracle Flex Cluster configuration:

You must use Grid Naming Service (GNS) with an Oracle Flex Cluster deployment.

You must configure the GNS VIP as a static IP address for Hub Nodes.

On Multi-cluster configurations, you must identify the GNS client data file location for Leaf Nodes. The GNS client data files are copied over from the GNS server before you start configuring a GNS client cluster.

All public network addresses for both Hub Nodes and Leaf Nodes, whether assigned manually or automatically, must be in the same subnet range.

All Oracle Flex Cluster addresses must be either static IP addresses, DHCP addresses assigned through DHCP (IPv4) or autoconfiguration addresses assigned through an autoconfiguration service (IPv6), registered in the cluster through GNS.

4.10.2 Oracle Flex Cluster DHCP-Assigned Virtual IP (VIP) Addresses

If you choose to configure DHCP-assigned VIPs, then during installation select one of the following options to configure cluster node VIP names for both Hub and Leaf Nodes:

Manual Names: Enter the node name and node VIP name for each cluster member node (for example, linnode1; linnode1-vip; linnode2; linnode2-vip; and so on) to be assigned to the VIP addresses delegated to cluster member nodes through DHCP, and resolved by DNS. Manual names must confirm with the RFC 952 standard, which allows alphanumeric characters and hyphens ("-"), but does not allow underscores ("_").

Automatically Assigned Names: Select Auto Assigned to allow the installer to assign names to VIP addresses generated through DHCP automatically. using the pattern name# and name#-vip, where name is the cluster name and # is an automatically assigned number. Addresses are assigned through DHCP, and resolved by GNS.

4.10.3 Oracle Flex Cluster Manually-Assigned Addresses

If you choose to configure manually-assigned VIPs, then during installation you must configure cluster node VIP names for both Hub and Leaf Nodes using one of the following options:

Manual Names: Enter the host name and virtual IP name for each node manually, and select whether it is a Hub Node or a Leaf Node. The names you provide must resolve to addresses configured on the DNS. Names must conform with the RFC 952 standard, which allows alphanumeric characters and hyphens ("-"), but does not allow underscores ("_").

Automatically Assigned Names: Enter string variables for values corresponding to host names that you have configured on the DNS. String variables allow you to assign a large number of names rapidly during installation. Configure addresses on the DNS with the following characteristics:

Hostname prefix: a prefix string used in each address configured on the DNS for use by cluster member nodes. For example: mycloud.

Range: A range of numbers to be assigned to the cluster member nodes, consisting of a starting node number and an ending node number, designating the end of the range: For example: 001, and 999.

Node name suffix: A suffix added after the end of a range number to a public node name. For example: nd.

VIP name suffix: A suffix added after the end of a virtual IP node name. For example: -vip.

You can create manual addresses using alphanumeric strings. For example, the following strings are examples of acceptable names: mycloud001nd; mycloud046nd; mycloud046-vip; mycloud348nd; mycloud784-vip.

4.11 Grid Naming Service Standard Cluster Configuration Example

To use GNS, you must specify a static IP address for the GNS VIP address, and you must have a subdomain configured on your DNS to delegate resolution for that subdomain to the static GNS IP address.

As nodes are added to the cluster, your organization's DHCP server can provide addresses for these nodes dynamically. These addresses are then registered automatically in GNS, and GNS provides resolution within the subdomain to cluster node addresses registered with GNS.

Because allocation and configuration of addresses is performed automatically with GNS, no further configuration is required. Oracle Clusterware provides dynamic network configuration as nodes are added to or removed from the cluster. The following example is provided only for information.

With a two node cluster where you have defined the GNS VIP, after installation you might have a configuration similar to the following for a two-node cluster, where the cluster name is mycluster, the GNS parent domain is gns.example.com, the subdomain is cluster01.example.com, the 192.0.2 portion of the IP addresses represents the cluster public IP address subdomain, and 192.168 represents the private IP address subdomain:

Table 4-1 Grid Naming Service Example Network

Identity
Home Node
Host Node
Given Name
Type
Address
Address Assigned By
Resolved By

GNS VIP

None

Selected by Oracle Clusterware

mycluster-gns-vip.example.com

virtual

192.0.2.1

Fixed by net administrator

DNS

Node 1 Public

Node 1

node1

node1Foot 1 

public

192.0.2.101

Fixed

GNS

Node 1 VIP

Node 1

Selected by Oracle Clusterware

node1-vip

virtual

192.0.2.104

DHCP

GNS

Node 1 Private

Node 1

node1

node1-priv

private

192.168.0.1

Fixed or DHCP

GNS

Node 2 Public

Node 2

node2

node2Footref 1

public

192.0.2.102

Fixed

GNS

Node 2 VIP

Node 2

Selected by Oracle Clusterware

node2-vip

virtual

192.0.2.105

DHCP

GNS

Node 2 Private

Node 2

node2

node2-priv

private

192.168.0.2

Fixed or DHCP

GNS

SCAN VIP 1

none

Selected by Oracle Clusterware

mycluster-scan.cluster01.example.com

virtual

192.0.2.201

DHCP

GNS

SCAN VIP 2

none

Selected by Oracle Clusterware

mycluster-scan.cluster01.example.com

virtual

192.0.2.202

DHCP

GNS

SCAN VIP 3

none

Selected by Oracle Clusterware

mycluster-scan.cluster01.example.com

virtual

192.0.2.203

DHCP

GNS

Footnote 1 Node host names may resolve to multiple addresses, including VIP addresses currently running on that host.

4.12 Manual IP Address Configuration Example

If you choose not to use GNS, then before installation you must configure public, virtual, and private IP addresses. Also, check that the default gateway can be accessed by a ping command. To find the default gateway, use the route command, as described in your operating system's help utility.

For example, with a two-node cluster where each node has one public and one private interface, and you have defined a SCAN domain address to resolve on your DNS to one of three IP addresses, you might have the configuration shown in the following table for your network interfaces:

Table 4-2 Manual Network Configuration Example

Identity
Home Node
Host Node
Given Name
Type
Address
Address Assigned By
Resolved By

Node 1 Public

Node 1

node1

node1Foot 1 

public

192.0.2.101

Fixed

DNS

Node 1 VIP

Node 1

Selected by Oracle Clusterware

node1-vip

virtual

192.0.2.104

Fixed

DNS and hosts file

Node 1 Private

Node 1

node1

node1-priv

private

192.168.0.1

Fixed

DNS and hosts file, or none

Node 2 Public

Node 2

node2

node2Footref 1

public

192.0.2.102

Fixed

DNS

Node 2 VIP

Node 2

Selected by Oracle Clusterware

node2-vip

virtual

192.0.2.105

Fixed

DNS and hosts file

Node 2 Private

Node 2

node2

node2-priv

private

192.168.0.2

Fixed

DNS and hosts file, or none

SCAN VIP 1

none

Selected by Oracle Clusterware

mycluster-scan

virtual

192.0.2.201

Fixed

DNS

SCAN VIP 2

none

Selected by Oracle Clusterware

mycluster-scan

virtual

192.0.2.202

Fixed

DNS

SCAN VIP 3

none

Selected by Oracle Clusterware

mycluster-scan

virtual

192.0.2.203

Fixed

DNS

Footnote 1 Node host names may resolve to multiple addresses.

You do not need to provide a private name for the interconnect. If you want name resolution for the interconnect, then you can configure private IP names in the hosts file or the DNS. However, Oracle Clusterware assigns interconnect addresses on the interface defined during installation as the private interface (eth1, for example), and to the subnet used for the private subnet.

The addresses to which the SCAN resolves are assigned by Oracle Clusterware, so they are not fixed to a particular node. To enable VIP failover, the configuration shown in the preceding table defines the SCAN addresses and the public and VIP addresses of both nodes on the same subnet, 192.0.2.

Note:

All host names must conform to the RFC 952 standard, which permits alphanumeric characters. Host names using underscores ("_") are not allowed.

4.13 Network Interface Configuration Options

The precise configuration you choose for your network depends on the size and use of the cluster you want to configure, and the level of availability you require. Network interfaces must be at least 1 GbE, with 10 GbE recommended. Alternatively, use InfiniBand for the interconnect.

If certified Network-attached Storage (NAS) is used for Oracle RAC and this storage is connected through Ethernet-based networks, then you must have a third network interface for NAS I/O. Failing to provide three separate interfaces in this case can cause performance and stability problems under load.

5 Configuring Users, Groups and Environments for Oracle Grid Infrastructure and Oracle RAC

This chapter describes the users, groups user environment and management environment settings to complete before you install Oracle Grid Infrastructure for a Cluster and Oracle Real Application Clusters.

This chapter contains the following topics:

Creating Groups, Users and Paths for Oracle Grid Infrastructure

Configuring Grid Infrastructure Software Owner User Environments

Enabling Intelligent Platform Management Interface (IPMI)

Determining Root Script Execution Plan

5.1 Creating Groups, Users and Paths for Oracle Grid Infrastructure

Log in as root, and use the following instructions to locate or create the Oracle Inventory group and a software owner for Oracle Grid Infrastructure.

Determining If the Oracle Inventory and Oracle Inventory Group Exists

Creating the Oracle Inventory Group If an Oracle Inventory Does Not Exist

Creating the Oracle Grid Infrastructure User

Creating the Oracle Base Directory Path

About Job Role Separation Operating System Privileges Groups and Users

Example of Creating Standard Groups, Users, and Paths

Example of Creating Role-allocated Groups, Users, and Paths

Creating the External Jobs User Account for HP-UX

Note:

During an Oracle Grid Infrastructure installation, both Oracle Clusterware and Oracle Automatic Storage Management are installed. You no longer can have separate Oracle Clusterware installation owners and Oracle Automatic Storage Management installation owners.

5.1.1 Determining If the Oracle Inventory and Oracle Inventory Group Exists

When you install Oracle software on the system for the first time, OUI creates the oraInst.loc file. This file identifies the name of the Oracle Inventory group (by default, oinstall), and the path of the Oracle Central Inventory directory. An oraInst.loc file has contents similar to the following:

inventory_loc=central_inventory_location
inst_group=group

In the preceding example, central_inventory_location is the location of the Oracle central inventory, and group is the name of the group that has permissions to write to the central inventory (the OINSTALL group privilege).

For Oracle Grid Infrastructure installations, the central inventory must be on local storage on the node.

If you have an existing Oracle central inventory, then ensure that you use the same Oracle Inventory for all Oracle software installations, and ensure that all Oracle software users you intend to use for installation have permissions to write to this directory.

To determine if you have an Oracle Inventory on your system:

Enter the following command:

# more /var/opt/oracle/oraInst.loc

If the oraInst.loc file exists, then the output from this command is similar to the following:

inventory_loc=/u01/app/oracle/oraInventory
inst_group=oinstall

In the previous output example:

The inventory_loc group shows the location of the Oracle Inventory

The inst_group parameter shows the name of the Oracle Inventory group (in this example, oinstall).

Ensure that Oracle Inventory group members are granted the HP-UX privileges RTPRIO, MLOCK, and RTSCHED. For example:

# /usr/bin/getprivgrp oinstall
oinstall: RTPRIO MLOCK RTSCHED

If the group is not granted these privileges, then add these privileges as described in the next section.

5.1.2 Creating the Oracle Inventory Group If an Oracle Inventory Does Not Exist

If the oraInst.loc file does not exist, then complete the following tasks:

Create the Oracle Inventory group by entering a command similar to the following:

# /usr/sbin/groupadd -g 1000 oinstall

The preceding command creates the oraInventory group oinstall, with the group ID number 1000. Members of the oraInventory group are granted privileges to write to the Oracle central inventory (oraInventory).

By default, if an oraInventory group does not exist, then the installer lists the primary group of the installation owner for the Oracle Grid Infrastructure for a Cluster software as the oraInventory group. Ensure that this group is available as a primary group for all planned Oracle software installation owners.

Note:

Group and user IDs must be identical on all nodes in the cluster. Check to make sure that the group and user IDs you want to use are available on each cluster member node, and confirm that the primary group for each Oracle Grid Infrastructure for a Cluster installation owner has the same name and group ID.

If it does not already exist, create the /etc/privgroup file. Add a line similar to the following to grant Oracle installation owners the RTPRIO, MLOCK, and RTSCHED privileges:

oinstall RTPRIO MLOCK RTSCHED

If /etc/privgroup exists, then add these privileges to the Oracle Inventory group. For example:

# /usr/sbin/setprivgrp oinstall RTPRIO MLOCK RTSCHED

Confirm the grant of privileges to the group. For example:

# /usr/bin/getprivgrp oinstall
oinstall: RTPRIO MLOCK RTSCHED

Repeat this procedure on all of the other nodes in the cluster.

5.1.3 Creating the Oracle Grid Infrastructure User

You must create a software owner for Oracle Clusterware in the following circumstances:

If an Oracle software owner user does not exist; for example, if this is the first installation of Oracle software on the system

If an Oracle software owner user exists, but you want to use a different operating system user, with different group membership, to separate Oracle Grid Infrastructure administrative privileges from Oracle Database administrative privileges.

In Oracle documentation, a user created to own only Oracle Grid Infrastructure software installations is called the grid user. A user created to own either all Oracle installations, or only Oracle database installations, is called the oracle user.

5.1.3.1 Understanding Restrictions for Oracle Software Installation Owners

Review the following restrictions for users created to own Oracle software:

If you intend to use multiple Oracle software owners for different Oracle Database homes, then Oracle recommends that you create a separate software owner for Oracle Grid Infrastructure software (Oracle Clusterware and Oracle ASM), and use that owner to run the Oracle Grid Infrastructure installation.

During installation, SSH must be set up between cluster member nodes. SSH can be set up automatically by Oracle Universal Installer (the installer). To enable SSH to be set up automatically, create Oracle installation owners without any stty commands in their profiles, and remove other security measures that are triggered during a login that generate messages to the terminal. These messages, mail checks, and other displays prevent Oracle software installation owner accounts from using the SSH configuration script that is built into the installer. If they are not disabled, then SSH must be configured manually before an installation can be run.

If you plan to install Oracle Database or Oracle RAC, then Oracle recommends that you create separate users for the Oracle Grid Infrastructure and the Oracle Database installations. If you use one installation owner, then when you want to perform administration tasks, you must change the value for $ORACLE_HOME to the instance you want to administer (Oracle ASM, in the Oracle Grid Infrastructure home, or the database in the Oracle home), using command syntax such as the following example, where /u01/app/12.1.0/grid is the Oracle Grid Infrastructure home:

$ ORACLE_HOME=/u01/app/12.1.0/grid; export ORACLE_HOME

If you try to administer an Oracle home or Grid home instance using sqlplus, lsnrctl, or asmcmd commands while the environment variable $ORACLE_HOME is set to a different Oracle home or Grid home path, then you encounter errors. For example, when you start SRVCTL from a database home, $ORACLE_HOME should be set to that database home, or SRVCTL fails. The exception is when you are using SRVCTL in the Oracle Grid Infrastructure home. In that case, $ORACLE_HOME is ignored, and the Oracle home environment variable does not affect SRVCTL commands. In all other cases, you must change $ORACLE_HOME to the instance that you want to administer.

To create separate Oracle software owners and separate operating system privileges groups for different Oracle software installations, note that each of these users must have the Oracle central inventory group (oraInventory group) as their primary group. Members of this group are granted the OINSTALL system privileges to write to the Oracle central inventory (oraInventory) directory, and are also granted permissions for various Oracle Clusterware resources, OCR keys, directories in the Oracle Clusterware home to which DBAs need write access, and other necessary privileges. In Oracle documentation, this group is represented as oinstall in code examples.

Each Oracle software owner must be a member of the same central inventory oraInventory group, and they must have this group as their primary group, so that all Oracle software installation owners share the same OINSTALL system privileges. Oracle recommends that you do not have more than one central inventory for Oracle installations. If an Oracle software owner has a different central inventory group, then you may corrupt the central inventory.

5.1.3.2 Determining if an Oracle Software Owner User Exists

To determine whether an Oracle software owner user named oracle or grid exists, enter a command similar to the following (in this case, to determine if oracle exists):

# id oracle

If the user exists, then the output from this command is similar to the following:

uid=501(oracle) gid=501(oinstall) groups=502(dba),503(oper)

Determine whether you want to use the existing user, or create another user. The user and group ID numbers must be the same on each node you intend to make a cluster member node.

To use the existing user, ensure that the user's primary group is the Oracle Inventory group (oinstall).

5.1.3.3 Creating or Modifying an Oracle Software Owner User for Oracle Grid Infrastructure

If the Oracle software owner (oracle, grid) user does not exist, or if you require a new Oracle software owner user, then create it. If you want to use an existing user account, then modify it to ensure that the user ID and group IDs are the same on each cluster member node.

Oracle recommends that you do not use the defaults on each node, because UIDs and GIDs assigned by default are likely to be different on each node. Instead, determine specifically named and numbered UIDs and GIDs, and confirm that they are unused on any node before you create or modify groups and users. Oracle strongly recommends that you confirm that you have identical user configuration on each node you intend to make a cluster member node before you start installation, and that the UID and GIDs do not need to be changed. If you need to change UIDs and GIDs for Oracle software users and groups, then you must reinstall the software.

Oracle does not support changing the UID or GID or group memberships for a user account that you have previously used to install and configure Oracle RAC or Oracle Grid Infrastructure. Oracle does not support changing the ownership of an existing Oracle Database home from one Oracle user to a different user.

If you must modify an existing Grid installation owner after previously installing Oracle Grid Infrastructure (for example, if you want to modify an existing Oracle Database user account before you install Oracle RAC, to distinguish between the Oracle Grid Infrastructure owner and the Oracle RAC Oracle Database owner user accounts), then you must stop and start Oracle Clusterware on each node (in a rolling fashion) to pick up the changes made to the user account that owns Oracle Grid Infrastructure.

The following procedures use grid as the name of the Oracle software owner, and asmadmin as the OSASM group. To create separate system privilege groups to separate administration privileges, complete group creation before you create the user, as described in Section 5.1.7, "About Job Role Separation Operating System Privileges Groups and Users,".

To create a grid installation owner account where you have an existing system privileges group (in this example, dba), whose members you want to have granted the SYSASM privilege to administer the Oracle ASM instance, enter a command similar to the following:

# /usr/sbin/useradd -u 1100 -g oinstall -G dba grid

In the preceding command:

The -u option specifies the user ID. Using this command flag is optional, as you can allow the system to provide you with an automatically generated user ID number. However, you must make note of the user ID number of the user you create for Oracle Grid Infrastructure, as you require it later during preinstallation, and you must have the same user ID number for this user on all nodes of the cluster.

The -g option specifies the primary group, which must be the Oracle Inventory group. For example: oinstall.

The -G option specified the secondary group, which in this example is dba.

The secondary groups must include the OSASM group, whose members are granted the SYSASM privilege to administer the Oracle ASM instance. You can designate a unique group for the SYSASM system privileges, separate from database administrator groups, or you can designate one group as the OSASM and OSDBA group, so that members of that group are granted the SYSASM and SYSDBA privileges to grant system privileges to administer both the Oracle ASM instances and Oracle Database instances. In code examples, this group is asmadmin.

If you are creating this user to own both Oracle Grid Infrastructure and an Oracle Database installation, then this user must have the OSDBA for ASM group as a secondary group. In code examples, this group name is asmdba. Members of the OSDBA for ASM group are granted access to Oracle ASM storage. You must create an OSDBA for ASM group if you plan to have multiple databases accessing Oracle ASM storage, or you must use the same group as the OSDBA for all databases, and for the OSDBA for ASM group.

Use the usermod command to change existing user id numbers and groups.

For example:

# id oracle
uid=501(oracle) gid=501(oracle) groups=501(oracle)
# /usr/sbin/usermod -u 1001 -g 1000 -G 1000,1001 oracle
# id oracle
uid=1001(oracle) gid=1000(oinstall) groups=1000(oinstall),1001(oracle)

Set the password of the user that will own Oracle Grid Infrastructure. For example:

# passwd grid

Repeat this procedure on all of the other nodes in the cluster.

Note:

If necessary, contact your system administrator before using or modifying an existing user.

5.1.4 About the Oracle Base Directory for the Grid User

The Oracle base directory for the Oracle Grid Infrastructure installation is the location where diagnostic and administrative logs, and other logs associated with Oracle ASM and Oracle Clusterware are stored. For Oracle installations other than Oracle Grid Infrastructure for a cluster, it is also the location under which an Oracle home is placed.

However, in the case of an Oracle Grid Infrastructure installation, you must create a different path, so that the path for Oracle bases remains available for other Oracle installations.

For OUI to recognize the Oracle base path, it must be in the form u[00-99][00-99]/app, and it must be writable by any member of the oraInventory (oinstall) group. The OFA path for the Oracle base is u[00-99][00-99]/app/user, where user is the name of the software installation owner. For example:

/u01/app/grid

5.1.5 About the Oracle Home Directory for Oracle Grid Infrastructure Software

The Oracle home for Oracle Grid Infrastructure software (Grid home) should be located in a path that is different from the Oracle home directory paths for any other Oracle software. The Optimal Flexible Architecture guideline for a Grid home is to create a path in the form /pm/v/u, where /p is a string constant, /m is a unique fixed-length key (typically a two-digit number), /v is the version of the software, and /u is the installation owner of the Oracle Grid Infrastructure software (Grid user). During Oracle Grid Infrastructure for a cluster installation, the path of the Grid home is changed to the root user, so any other users are unable to read, write, or execute commands in that path.

For example, to create a Grid home in the standard mount point path format u[00-99][00-99]/app/release/grid, where release is the release number of the Oracle Grid Infrastructure software, create the following path:

/u01/app/12.1.0/grid

During installation, ownership of the entire path to the Grid home is changed to root. (/u01, /u01/app, /u01/app/12.1.0, /u01/app/12.1.0/grid). If you do not create a unique path to the Grid home, then after the Grid install, you can encounter permission errors for other installations, including any existing installations under the same path.

To avoid placing the application directory in the mount point under root ownership, you can create and select paths such as the following for the Grid home:

/u01/12.1.0/grid

Caution:

For Oracle Grid Infrastructure for a cluster installations, note the following restrictions for the Oracle Grid Infrastructure binary home (Grid home directory for Oracle Grid Infrastructure):

It must not be placed under one of the Oracle base directories, including the Oracle base directory of the Oracle Grid Infrastructure installation owner.

It must not be placed in the home directory of an installation owner.

These requirements are specific to Oracle Grid Infrastructure for a cluster installations. Oracle Grid Infrastructure for a standalone server (Oracle Restart) can be installed under the Oracle base for the Oracle Database installation.

See Also:

Oracle Database Installation Guide for details about Optimal Flexible Architecture (OFA) guidelines

5.1.6 Creating the Oracle Home and Oracle Base Directory

Oracle recommends that you create Oracle Grid Infrastructure Grid home and Oracle base homes manually, particularly if you have separate Oracle Grid Infrastructure for a cluster and Oracle Database software owners, so that you can separate log files for the Oracle Grid Infrastructure installation owner in a separate Oracle base, and prevent accidental placement of the Grid home under an Oracle base path.

For example:

# mkdir -p /u01/app/12.1.0/grid
# mkdir -p /u01/app/grid
# mkdir -p /u01/app/oracle
# chown -R grid:oinstall /u01
# chown oracle:oinstall /u01/app/oracle
# chmod -R 775 /u01/

See Also:

Appendix D, "Oracle Grid Infrastructure for a Cluster Installation Concepts" for more details about Oracle base and Oracle home directories

5.1.7 About Job Role Separation Operating System Privileges Groups and Users

A job role separation configuration of Oracle Database and Oracle ASM is a configuration with groups and users to provide separate groups for operating system authentication.

With Oracle Database job role separation, each Oracle Database installation has separate operating system groups to provide authentication for system privileges on that Oracle Database, so multiple databases can be installed on the cluster without sharing operating system authentication for system privileges. In addition, each Oracle software installation is owned by a separate installation owner, to provide operating system user authentication for modifications to Oracle Database binaries.

With Oracle Grid Infrastructure job role separation, Oracle ASM has separate operating system groups that provides operating system authentication for Oracle ASM system privileges for storage tier administration. This operating system authentication is separated from Oracle Database operating system authentication. In addition, the Oracle Grid Infrastructure installation owner provides operating system user authentication for modifications to Oracle Grid Infrastructure binaries.

During the Oracle Database installation, Oracle Universal Installer (OUI) prompts you to specify the name of the OSDBA, OSOPER, OSBACKUPDBA, OSDGDBA and OSKMDBA groups. Members of these groups are granted operating system authentication for the set of database system privileges each group authorizes. Oracle recommends that you create different operating system groups for each set of system privileges.

Note:

This configuration is optional, to restrict user access to Oracle software by responsibility areas for different administrator users.

You can choose to create one administrative user and one group for operating system authentication for all system privileges on the storage and database tiers.

For example, you can designate the oracle user to be the installation owner for all Oracle software, and designate oinstall to be the group whose members are granted all system privileges for Oracle Clusterware; all system privileges for Oracle ASM; all system privileges for all Oracle Databases on the servers; and all OINSTALL system privileges for installation owners. This group must also be the Oracle Inventory group.

If you do not want to use role allocation groups, then Oracle strongly recommends that you use at least two groups:

A system privileges group whose members are granted administrative system privileges, including OSDBA, OSASM, and other system privileges groups.

An installation owner group (the oraInventory group) whose members are granted Oracle installation owner system privileges (the OINSTALL system privilege).

To simplify using the defaults for Oracle tools such as Cluster Verification Utility, if you do choose to use a single operating system group to grant all system privileges and the right to write to the oraInventory, then that group name should be oinstall.

Note:

To configure users for installation that are on a network directory service such as Network Information Services (NIS), refer to your directory service documentation.

See Also:

Oracle Database Administrator's Guide for more information about planning for system privileges authentication

Oracle Database Storage Administrator's Guide for more information about Oracle ASM operating system authentication

5.1.7.1 Overview of Creating Job Role Separation Groups and Users

This section provides an overview of how to create users and groups to use job role separation. Log in as root to create these groups and users.

Users for Oracle Installations with Job Role Separation

Database Groups for Job Role Separation Installations

Oracle ASM Groups for Job Role Separation Installations

5.1.7.1.1 Users for Oracle Installations with Job Role Separation

Oracle recommends that you create the following operating system groups and users for all installations where you create separate software installation owners:

One software owner to own each Oracle software product (typically, oracle, for the database software owner user, and grid for Oracle Grid Infrastructure.

You must create at least one software owner the first time you install Oracle software on the system. This user owns the Oracle binaries of the Oracle Grid Infrastructure software, and you can also make this user the owner of the Oracle Database or Oracle RAC binaries.

Oracle software owners must have the Oracle Inventory group as their primary group, so that each Oracle software installation owner can write to the central inventory (oraInventory), and so that OCR and Oracle Clusterware resource permissions are set correctly. The database software owner must also have the OSDBA group and (if you create it) the OSOPER group as secondary groups. In Oracle documentation, when Oracle software owner users are referred to, they are called oracle users.

Oracle recommends that you create separate software owner users to own each Oracle software installation. Oracle particularly recommends that you do this if you intend to install multiple databases on the system.

In Oracle documentation, a user created to own the Oracle Grid Infrastructure binaries is called the grid user. This user owns both the Oracle Clusterware and Oracle Automatic Storage Management binaries.

See Also:

Oracle Clusterware Administration and Deployment Guide and Oracle Database Administrator's Guide for more information about the OSDBA, OSASM and OSOPER groups and the SYSDBA, SYSASM and SYSOPER privileges

5.1.7.1.2 Database Groups for Job Role Separation Installations

The following operating system groups and user are required if you are installing Oracle Database:

The OSDBA group (typically, dba)

You must create this group the first time you install Oracle Database software on the system. This group identifies operating system user accounts that have database administrative privileges (the SYSDBA privilege). If you do not create separate OSDBA, OSOPER and OSASM groups for the Oracle ASM instance, then operating system user accounts that have the SYSOPER and SYSASM privileges must be members of this group. The name used for this group in Oracle code examples is dba. If you do not designate a separate group as the OSASM group, then the OSDBA group you define is also by default the OSASM group.

To specify a group name other than the default dba group, then you must choose the Advanced installation type to install the software or start Oracle Universal Installer (OUI) as a user that is not a member of this group. In this case, OUI prompts you to specify the name of this group.

Members of the OSDBA group formerly were granted SYSASM privileges on Oracle ASM instances, including mounting and dismounting disk groups. This privileges grant is removed with Oracle Grid Infrastructure 11g release 2 (11.2), if different operating system groups are designated as the OSDBA and OSASM groups. If the same group is used for both OSDBA and OSASM, then the privilege is retained.

The OSOPER group for Oracle Database (typically, oper)

This is an optional group. Create this group if you want a separate group of operating system users to have a limited set of database administrative privileges (the SYSOPER privilege). By default, members of the OSDBA group also have all privileges granted by the SYSOPER privilege.

To use the OSOPER group to create a database administrator group with fewer privileges than the default dba group, then you must choose the Advanced installation type to install the software or start OUI as a user that is not a member of the dba group. In this case, OUI prompts you to specify the name of this group. The usual name chosen for this group is oper.

5.1.7.1.3 Oracle ASM Groups for Job Role Separation Installations

SYSASM is a new system privilege that enables the separation of the Oracle ASM storage administration privilege from SYSDBA. With Oracle Automatic Storage Management 11g release 2 (11.2), members of the database OSDBA group are not granted SYSASM privileges, unless the operating system group designated as the OSASM group is the same group designated as the OSDBA group.

Select separate operating system groups as the operating system authentication groups for privileges on Oracle ASM. Before you start OUI, create the following groups and users for Oracle ASM

The Oracle Automatic Storage Management Group (typically asmadmin)

This is a required group. Create this group as a separate group if you want to have separate administration privilege groups for Oracle ASM and Oracle Database administrators. In Oracle documentation, the operating system group whose members are granted privileges is called the OSASM group, and in code examples, where there is a group specifically created to grant this privilege, it is referred to as asmadmin.

If you have multiple databases on your system, and use multiple OSDBA groups so that you can provide separate SYSDBA privileges for each database, then you should create a separate OSASM group, and use a separate user from the database users to own the Oracle Grid Infrastructure installation (Oracle Clusterware and Oracle ASM). Oracle ASM can support multiple databases.

Members of the OSASM group can use SQL to connect to an Oracle ASM instance as SYSASM using operating system authentication. The SYSASM privileges permit mounting and dismounting disk groups, and other storage administration tasks. SYSASM privileges provide no access privileges on an RDBMS instance.

The Oracle ASM Database Administrator group (OSDBA for ASM, typically asmdba)

Members of the Oracle ASM Database Administrator group (OSDBA for ASM) are granted read and write access to files managed by Oracle ASM. The Oracle Grid Infrastructure installation owner and all Oracle Database software owners must be a member of this group, and all users with OSDBA membership on databases that have access to the files managed by Oracle ASM must be members of the OSDBA group for ASM.

Members of the Oracle ASM Operator Group (OSOPER for ASM, typically asmoper)

This is an optional group. Create this group if you want a separate group of operating system users to have a limited set of Oracle ASM instance administrative privileges (the SYSOPER for ASM privilege), including starting up and stopping the Oracle ASM instance. By default, members of the OSASM group also have all privileges granted by the SYSOPER for ASM privilege.

To use the Oracle ASM Operator group to create an Oracle ASM administrator group with fewer privileges than the default asmadmin group, then you must choose the Advanced installation type to install the software, In this case, OUI prompts you to specify the name of this group. In code examples, this group is asmoper.

5.1.8 Descriptions of Job Role Separation Groups and Users

This section contains the following topics:

Oracle Software Owner For Each Oracle Software Product

Standard Oracle Database Groups for Job Role Separation

Extended Oracle Database Groups for Job Role Separation

Oracle ASM Groups for Job Role Separation

5.1.8.1 Oracle Software Owner For Each Oracle Software Product

Oracle recommends that you create one software owner to own each Oracle software product (typically, oracle, for the database software owner user, and grid for Oracle Grid Infrastructure).

You must create at least one software owner the first time you install Oracle software on the system. This user owns the Oracle binaries of the Oracle Grid Infrastructure software, and you can also make this user the owner of the Oracle Database or Oracle RAC binaries.

Oracle software owners must have the Oracle Inventory group as their primary group, so that each Oracle software installation owner can write to the central inventory (oraInventory), and so that OCR and Oracle Clusterware resource permissions are set correctly. The database software owner must also have the OSDBA group and (if you create them) the OSOPER, OSBACKUPDBA, OSDGDBA, and OSKMDBA groups as secondary groups. In Oracle documentation, when Oracle software owner users are referred to, they are called oracle users.

Oracle recommends that you create separate software owner users to own each Oracle software installation. Oracle particularly recommends that you do this if you intend to install multiple databases on the system.

In Oracle documentation, a user created to own the Oracle Grid Infrastructure binaries is called the grid user. This user owns both the Oracle Clusterware and Oracle Automatic Storage Management binaries.

See Also:

Oracle Database Storage Administrator's Guide and Oracle Database Administrator's Guide for more information about operating system groups and system privileges authentication

5.1.8.2 Standard Oracle Database Groups for Job Role Separation

The following is a list of standard Oracle Database groups. These groups provide operating system authentication for database administration system privileges:

OSDBA group (typically, dba)

You must create this group the first time you install Oracle Database software on the system. This group identifies operating system user accounts that have database administrative privileges (the SYSDBA privilege). If you do not create separate OSDBA, OSOPER and OSASM groups for the Oracle ASM instance, then operating system user accounts that have the SYSOPER and SYSASM privileges must be members of this group. The name used for this group in Oracle code examples is dba. If you do not designate a separate group as the OSASM group, then the OSDBA group you define is also by default the OSASM group.

To specify a group name other than the default dba group, you must either choose the Advanced installation type to install the software, or you start Oracle Universal Installer (OUI) as a user that is not a member of this group. If you start OUI with a user that is not a member of a group called dba, then OUI prompts you to specify the name of the OSDBA group.

Members of the OSDBA group formerly were granted SYSASM privilege on Oracle ASM instances, including mounting and dismounting disk groups. This privileges grant is removed with Oracle Grid Infrastructure 11g Release 2 (11.2), if different operating system groups are designated as the OSDBA and OSASM groups. If the same group is used for both OSDBA and OSASM, then the privileges are retained.

OSOPER group for Oracle Database (typically, oper)

You can choose to create this group if you want a separate group of operating system users to have a limited set of database administrative privileges for starting up and shutting down the database (the SYSOPER privilege).

5.1.8.3 Extended Oracle Database Groups for Job Role Separation

Starting with Oracle Database 12c Release 1 (12.1), in addition to the OSOPER privileges to start up and shut down the database, you can create new administrative privileges that are more task-specific and less privileged than the OSDBA/SYSDBA system privileges to support specific administrative privileges tasks required for everyday database operation Users granted these system privileges are also authenticated through operating system group membership.

You do not have to create these specific group names, but during installation you are prompted to provide operating system groups whose members are granted access to these system privileges. You can assign the same group to provide authentication for these privileges, but Oracle recommends that you provide a unique group to designate each privilege.

The OSDBA subset job role separation privileges and groups consist of the following:

OSBACKUPDBA group for Oracle Database (typically, backupdba)

Create this group if you want a separate group of operating system users to have a limited set of database backup and recovery related administrative privileges (the SYSBACKUP privilege).

OSDGDBA group for Oracle Data Guard (typically, dgdba)

Create this group if you want a separate group of operating system users to have a limited set of privileges to administer and monitor Oracle Data Guard (the SYSDG privilege).

OSKMDBA group for encryption key management (typically, kmdba)

Create this group if you want a separate group of operating sytem users to have a limited set of privileges for encryption key management such as Oracle Wallet Manager management (the SYSKM privilege).

5.1.8.4 Oracle ASM Groups for Job Role Separation

The SYSASM, SYSOPER for ASM, and SYSDBA for ASM system privileges enables the separation of the Oracle ASM storage administration privileges from SYSDBA. Members of operating systems you designate are granted the system privileges for these roles. Select separate operating system groups as the operating system authentication groups for privileges on Oracle ASM.

Before you start OUI, create the following OS groups and users for Oracle ASM, whose members are granted the corresponding SYS privileges:

OSASM Group for Oracle ASM Administration (typically asmadmin)

Create this group as a separate group if you want to have separate administration privileges groups for Oracle ASM and Oracle Database administrators. Members of this group are granted the SYSASM system privileges to administer Oracle ASM. In Oracle documentation, the operating system group whose members are granted privileges is called the OSASM group, and in code examples, where there is a group specifically created to grant this privilege, it is referred to as asmadmin.

Oracle ASM can support multiple databases. If you have multiple databases on your system, and use multiple OSDBA groups so that you can provide separate SYSDBA privileges for each database, then you should create a group whose members are granted the OSASM/SYSASM administrative privileges, and create a grid infrastructure user (grid) that does not own a database installation, so that you separate Oracle Grid Infrastructure SYSASM administrative privileges from a database administrative privileges group.

Members of the OSASM group can use SQL to connect to an Oracle ASM instance as SYSASM using operating system authentication. The SYSASM privileges permit mounting and dismounting disk groups, and other storage administration tasks. SYSASM privileges provide no access privileges on an RDBMS instance.

OSDBA for ASM Database Administrator group for ASM, typically asmdba)

Members of the ASM Database Administrator group (OSDBA for ASM) are granted read and write access to files managed by Oracle ASM. The Oracle Grid Infrastructure installation owner and all Oracle Database software owners must be a member of this group, and all users with OSDBA membership on databases that have access to the files managed by Oracle ASM must be members of the OSDBA group for ASM.

OSOPER for ASM Group for ASM Operators (OSOPER for ASM, typically asmoper)

This is an optional group. Create this group if you want a separate group of operating system users to have a limited set of Oracle ASM instance administrative privileges (the SYSOPER for ASM privilege), including starting up and stopping the Oracle ASM instance. By default, members of the OSASM group also have all privileges granted by the SYSOPER for ASM privilege.

To use the Oracle ASM Operator group to create an Oracle ASM administrator group with fewer privileges than the default asmadmin group, then you must choose the Advanced installation type to install the software, In this case, OUI prompts you to specify the name of this group. In code examples, this group is asmoper.

5.1.9 Creating Job Role Separation Operating System Privileges Groups and User

The following sections describe how to create the required operating system user and group for Oracle Grid Infrastructure and Oracle Database:

Creating the OSDBA Group to Prepare for Database Installations

Creating an OSOPER Group for Database Installations

Creating the OSASM Group

Creating the OSOPER for ASM Group

Creating the OSDBA for ASM Group for Database Access to Oracle ASM

Oracle Software Owner User Installation Tasks

Creating Identical Database Users and Groups on Other Cluster Nodes

5.1.9.1 Creating the OSDBA Group to Prepare for Database Installations

If you intend to install Oracle Database to use with the Oracle Grid Infrastructure installation, then you must create an OSDBA group in the following circumstances:

An OSDBA group does not exist; for example, if this is the first installation of Oracle Database software on the system

An OSDBA group exists, but you want to give a different group of operating system users database administrative privileges for a new Oracle Database installation

If the OSDBA group does not exist, or if you require a new OSDBA group, then create it as follows. Use the group name dba unless a group with that name already exists:

# /usr/sbin/groupadd -g 1031 dba

5.1.9.2 Creating an OSOPER Group for Database Installations

Create an OSOPER group only if you want to identify a group of operating system users with a limited set of database administrative privileges (SYSOPER operator privileges). For most installations, it is sufficient to create only the OSDBA group. To use an OSOPER group, then you must create it in the following circumstances:

If an OSOPER group does not exist; for example, if this is the first installation of Oracle Database software on the system

If an OSOPER group exists, but you want to give a different group of operating system users database operator privileges in a new Oracle installation

If you require a new OSOPER group, then create it as follows. Use the group name oper unless a group with that name already exists.

# /usr/sbin/groupadd -g 1032 oper1

5.1.9.3 Creating the OSASM Group

If the OSASM group does not exist or if you require a new OSASM group, then create it as follows. Use the group name asmadmin unless a group with that name already exists:

# /usr/sbin/groupadd -g 1020 asmadmin

5.1.9.4 Creating the OSOPER for ASM Group

Create an OSOPER for ASM group if you want to identify a group of operating system users, such as database administrators, whom you want to grant a limited set of Oracle ASM storage tier administrative privileges, including the ability to start up and shut down the Oracle ASM storage. For most installations, it is sufficient to create only the OSASM group, and provide that group as the OSOPER for ASM group during the installation interview.

If you require a new OSOPER for ASM group, then create it as follows. In the following, use the group name asmoper unless a group with that name already exists:

# /usr/sbin/groupadd -g 1022 asmoper

5.1.9.5 Creating the OSDBA for ASM Group for Database Access to Oracle ASM

You must create an OSDBA for ASM group to provide access to the Oracle ASM instance. This is necessary if OSASM and OSDBA are different groups.

If the OSDBA for ASM group does not exist or if you require a new OSDBA for ASM group, then create it as follows. Use the group name asmdba unless a group with that name already exists:

# /usr/sbin/groupadd -g 1021 asmdba

5.1.9.6 Oracle Software Owner User Installation Tasks

This section contains information about the Oracle software owner user, which is typically the user that owns Oracle Database or other Oracle application software. This section contains the following topics:

5.1.9.6.1 About Creating the Oracle Software Owner User

You must create an Oracle software owner user in the following circumstances:

If an Oracle software owner user exists, but you want to use a different operating system user, with different group membership, to give database administrative privileges to those groups in a new Oracle Database installation

If you have created an Oracle software owner for Oracle Grid Infrastructure, such as grid, and you want to create a separate Oracle software owner for Oracle Database software, such as oracle.

5.1.9.6.2 Determining if an Oracle Software Owner User Exists

To determine whether an Oracle software owner user named oracle or grid exists, enter a command similar to the following (in this case, to determine if oracle exists):

# id oracle

If the user exists, then the output from this command is similar to the following:

uid=501(oracle) gid=501(oinstall) groups=502(dba),503(oper)

Determine whether you want to use the existing user, or create another user. To use the existing user, ensure that the user's primary group is the Oracle Inventory group and that it is a member of the appropriate OSDBA and OSOPER groups. Refer to the following sections for more information:

To modify an existing user, refer to Section 5.1.9.6.4, "Modifying an Existing Oracle Software Owner User,".

To create a user, refer to the following section.

Note:

If necessary, contact your system administrator before using or modifying an existing user.

Oracle recommends that you do not use the UID and GID defaults on each node, as group and user IDs likely will be different on each node. Instead, provide common assigned group and user IDs, and confirm that they are unused on any node before you create or modify groups and users.

5.1.9.6.3 Creating an Oracle Software Owner User

If the Oracle software owner user does not exist, or if you require a new Oracle software owner user, then create it as follows. Use the user name oracle unless a user with that name already exists.

To create an oracle user, enter a command similar to the following:

# /usr/sbin/useradd -u 1101 -g oinstall -G dba,asmdba oracle

In the preceding command:

The -u option specifies the user ID. Using this command flag is optional, as you can allow the system to provide you with an automatically generated user ID number. However, you must make note of the oracle user ID number, as you require it later during preinstallation.

The -g option specifies the primary group, which must be the Oracle Inventory group--for example, oinstall

The -G option specifies the secondary groups, which must include the OSDBA group, the OSDBA for ASM group, and, if required, the OSOPER for ASM group. For example: dba, asmdba, or dba, asmdba, asmoper

Set the password of the oracle user:

# passwd oracle

5.1.9.6.4 Modifying an Existing Oracle Software Owner User

If the oracle user exists, but its primary group is not oinstall, or it is not a member of the appropriate OSDBA or OSDBA for ASM groups, then enter a command similar to the following to modify it. Specify the primary group using the -g option and any required secondary group using the -G option:

# /usr/sbin/usermod -g oinstall -G dba,asmdba oracle

Repeat this procedure on all of the other nodes in the cluster.

5.1.9.7 Creating Identical Database Users and Groups on Other Cluster Nodes

Oracle software owner users and the Oracle Inventory, OSDBA, and OSOPER groups must exist and be identical on all cluster nodes. To create these identical users and groups, you must identify the user ID and group IDs assigned them on the node where you created them, and then create the user and groups with the same name and ID on the other cluster nodes.

Note:

You must complete the following procedures only if you are using local users and groups. If you are using users and groups defined in a directory service such as NIS, then they are already identical on each cluster node.

Identifying Existing User and Group IDs

To determine the user ID (uid) of the grid or oracle users, and the group IDs (gid) of the existing Oracle groups, follow these steps:

Enter a command similar to the following (in this case, to determine a user ID for the oracle user):

# id oracle

The output from this command is similar to the following:

uid=502(oracle) gid=501(oinstall) groups=502(dba),503(oper),506(asmdba)

From the output, identify the user ID (uid) for the user and the group identities (gid) for the groups to which it belongs. Ensure that these ID numbers are identical on each node of the cluster. The user's primary group is listed after gid. Secondary groups are listed after groups.

Creating Users and Groups on the Other Cluster Nodes

To create users and groups on the other cluster nodes, repeat the following procedure on each node:

Log in to the next cluster node as root.

Enter commands similar to the following to create the oinstall, asmadmin, and asmdba groups, and if required, the asmoper, dba, and oper groups. Use the -g option to specify the correct gid for each group.

# /usr/sbin/groupadd -g 1000 oinstall
# /usr/sbin/groupadd -g 1020 asmadmin
# /usr/sbin/groupadd -g 1021 asmdba
# /usr/sbin/groupadd -g 1022 asmoper
# /usr/sbin/groupadd -g 1031 dba
# /usr/sbin/groupadd -g 1032 oper

Note:

If the group already exists, then use the groupmod command to modify it if necessary. If you cannot use the same group ID for a particular group on this node, then view the /etc/group file on all nodes to identify a group ID that is available on every node. You must then change the group ID on all nodes to the same group ID.

To create the oracle or Oracle Grid Infrastructure (grid) user, enter a command similar to the following (in this example, to create the oracle user):

# /usr/sbin/useradd -u 1101 -g oinstall -G asmdba,dba oracle

In the preceding command:

The -u option specifies the user ID, which must be the user ID that you identified in the previous subsection

The -g option specifies the primary group, which must be the Oracle Inventory group, for example oinstall

The -G option specifies the secondary groups, which can include the OSASM, OSDBA, OSDBA for ASM, and OSOPER or OSOPER for ASM groups. For example:

A grid installation owner: OSASM (asmadmin), whose members are granted the SYSASM privilege.

An Oracle Database installation owner without SYSASM privileges access: OSDBA (dba), OSDBA for ASM (asmdba), OSOPER for ASM (asmoper).

Note:

If the user already exists, then use the usermod command to modify it if necessary. If you cannot use the same user ID for the user on every node, then view the /etc/passwd file on all nodes to identify a user ID that is available on every node. You must then specify that ID for the user on all of the nodes.

Set the password of the user. For example:

# passwd oracle

Complete user environment configuration tasks for each user as described in the section Configuring Grid Infrastructure Software Owner User Environments.

5.1.10 Example of Creating Standard Groups, Users, and Paths

This configuration example shows the following:

Creation of the Oracle Inventory group (oinstall)

Creation of a single group (dba) as the only system privileges group to assign for all Oracle Grid Infrastructure, Oracle ASM, and Oracle Database system privileges

Creation of the Oracle Grid Infrastructure software owner (grid), and one Oracle Database owner (oracle) with correct group memberships

Creation and configuration of an Oracle base path compliant with OFA structure with correct permissions

Enter the following commands to create a minimal operating system authentication configuration:

# groupadd -g 1000 oinstall
# groupadd -g 1031 dba
# useradd -u 1100 -g oinstall -G dba grid
# useradd -u 1101 -g oinstall -G dba oracle
# mkdir -p  /u01/app/11.2.0/grid
# mkdir -p /u01/app/grid
# chown -R grid:oinstall /u01
# mkdir /u01/app/oracle
# chown oracle:oinstall /u01/app/oracle
# chmod -R 775 /u01/

After running these commands, you have the following groups and users:

An Oracle central inventory group, or oraInventory group (oinstall). Members who have the central inventory group as their primary group, are granted the OINSTALL permission to write to the oraInventory directory.

One system privileges group, dba, for Oracle Grid Infrastructure, Oracle ASM and Oracle Database system privileges. Members who have the dba group as their primary or secondary group are granted operating system authentication for OSASM/SYSASM, OSDBA/SYSDBA, OSOPER/SYSOPER, OSBACKUPDBA/SYSBACKUP, OSDGDBA/SYSDG, OSKMDBA/SYSKM, OSDBA for ASM/SYSDBA for ASM, and OSOPER for ASM/SYSOPER for ASM to administer Oracle Clusterware, Oracle ASM, and Oracle Database, and are granted SYSASM and OSOPER for ASM access to the Oracle ASM storage.

An Oracle Grid Infrastructure for a cluster owner, or Grid user (grid), with the oraInventory group (oinstall) as its primary group, and with the OSASM group (dba) as the secondary group, with its Oracle base directory /u01/app/grid.

An Oracle Database owner (oracle) with the oraInventory group (oinstall) as its primary group, and the OSDBA group (dba) as its secondary group, with its Oracle base directory /u01/app/oracle.

/u01/app owned by grid:oinstall with 775 permissions before installation, and by root after the root.sh script is run during installation. This ownership and permissions enables OUI to create the Oracle Inventory directory, in the path /u01/app/oraInventory.

/u01 owned by grid:oinstall before installation, and by root after the root.sh script is run during installation.

/u01/app/12.1.0/grid owned by grid:oinstall with 775 permissions. These permissions are required for installation, and are changed during the installation process.

/u01/app/grid owned by grid:oinstall with 775 permissions before installation, and 755 permissions after installation.

/u01/app/oracle owned by oracle:oinstall with 775 permissions.

Note:

You can use one installation owner for both Oracle Grid Infrastructure and any other Oracle installations. However, Oracle recommends that you use separate installation owner accounts for each Oracle software installation.

5.1.11 Example of Creating Role-allocated Groups, Users, and Paths

This section contains an example of how to create role-allocated groups and users that is compliant with an Optimal Flexible Architecture (OFA) deployment.

This example illustrates the following scenario:

An Oracle Grid Infrastructure installation

Two separate Oracle Database installations planned for the cluster, DB1 and DB2

Separate installation owners for Oracle Grid Infrastructure, and for each Oracle Database

Full role allocation of system privileges for Oracle ASM, and for each Oracle Database

Oracle Database owner oracle1 granted the right to start up and shut down the Oracle ASM instance

Create groups and users for a role-allocated configuration for this scenario using the following commands:

# groupadd -g 1000 oinstall
# groupadd -g 1020 asmadmin
# groupadd -g 1021 asmdba
# groupadd -g 1031 dba1
# groupadd -g 1041 dba2
# groupadd -g 1022 asmoper
# useradd -u 1100 -g oinstall -G asmadmin,asmdba grid
# useradd -u 1101 -g oinstall -G dba1,asmdba oracle1
# useradd -u 1102 -g oinstall -G dba2,asmdba oracle2
# mkdir -p  /u01/app/11.2.0/grid
# mkdir -p /u01/app/grid
# chown -R grid:oinstall /u01
# mkdir -p /u01/app/oracle1
# chown oracle1:oinstall /u01/app/oracle1
# mkdir -p /u01/app/oracle2
# chown oracle2:oinstall /u01/app/oracle2
# chmod -R 775 /u01

After running these commands, you have a set of administrative privileges groups and users for Oracle Grid Infrastructure, and for two separate Oracle databases (DB1 and DB2):

Oracle Grid Infrastructure Groups and Users Example

Oracle Database DB1 Groups and Users Example

Oracle Database DB2 Groups and Users Example

5.1.11.1 Oracle Grid Infrastructure Groups and Users Example

An Oracle central inventory group, or oraInventory group (oinstall), whose members that have this group as their primary group. Members of this group are granted the OINSTALL system privileges, which grants permissions to write to the oraInventory directory, and other associated install binary privileges.

An OSASM group (asmadmin), associated with Oracle Grid Infrastructure during installation, whose members are granted the SYSASM privileges to administer Oracle ASM.

An OSDBA for ASM group (asmdba), associated with Oracle Grid Infrastructure storage during installation. Its members include grid and any database installation owners, such as oracle1 and oracle2, who are granted access to Oracle ASM. Any additional installation owners that use Oracle ASM for storage must also be made members of this group.

An OSOPER for ASM group for Oracle ASM (asmoper), associated with Oracle Grid Infrastructure during installation. Members of asmoper group are granted limited Oracle ASM administrator privileges, including the permissions to start and stop the Oracle ASM instance.

An Oracle Grid Infrastructure installation owner (grid), with the oraInventory group (oinstall) as its primary group, and with the OSASM (asmadmin) group and the OSDBA for ASM (asmdba) group as secondary groups.

/u01/app/oraInventory. The central inventory of Oracle installations on the cluster. This path remains owned by grid:oinstall, to enable other Oracle software owners to write to the central inventory.

An OFA-compliant mount point /u01 owned by grid:oinstall before installation, so that Oracle Universal Installer can write to that path.

An Oracle base for the grid installation owner /u01/app/grid owned by grid:oinstall with 775 permissions, and changed during the installation process to 755 permissions.

A Grid home /u01/app/12.1.0/grid owned by grid:oinstall with 775 (drwxdrwxr-x) permissions. These permissions are required for installation, and are changed during the installation process to root:oinstall with 755 permissions (drwxr-xr-x).

5.1.11.2 Oracle Database DB1 Groups and Users Example

An Oracle Database software owner (oracle1), which owns the Oracle Database binaries for DB1. The oracle1 user has the oraInventory group as its primary group, and the OSDBA group for its database (dba1) and the OSDBA for ASM group for Oracle Grid Infrastructure (asmdba) as secondary groups. In addition the oracle1 user is a member of asmoper, granting that user privileges to start up and shut down Oracle ASM.

An OSDBA group (dba1). During installation, you identify the group dba1 as the OSDBA group for the database installed by the user oracle1. Members of dba1 are granted the SYSDBA privileges for the Oracle Database DB1. Users who connect as SYSDBA are identified as user SYS on DB1.

An OSBACKUPDBA group (backupdba1). During installation, you identify the group backupdba1 as the OSDBA group for the database installed by the user oracle1. Members of backupdba1 are granted the SYSBACKUP privileges for the database installed by the user oracle1 to back up the database.

An OSDGDBA group (dgdba1). During installation, you identify the group dgdba1 as the OSDGDBA group for the database installed by the user oracle1. Members of dgdba1 are granted the SYSDG privileges to administer Oracle Data Guard for the database installed by the user oracle1.

An OSKMDBA group (kmdba1). During installation, you identify the group kmdba1 as the OSKMDBA group for the database installed by the user oracle1. Members of kmdba1 are granted the SYSKM privileges to administer encryption keys for the database installed by the user oracle1.

An OSOPER group (oper1). During installation, you identify the group oper1 as the OSOPER group for the database installed by the user oracle1. Members of oper1 are granted the SYSOPER privileges (a limited set of the SYSDBA privileges), including the right to start up and shut down the DB1 database. Users who connect as OSOPER privileges are identified as user PUBLIC on DB1.

An Oracle base /u01/app/oracle1 owned by oracle1:oinstall with 775 permissions. The user oracle1 has permissions to install software in this directory, but in no other directory in the /u01/app path.

5.1.11.3 Oracle Database DB2 Groups and Users Example

An Oracle Database software owner (oracle2), which owns the Oracle Database binaries for DB2. The oracle2 user has the oraInventory group as its primary group, and the OSDBA group for its database (dba2) and the OSDBA for ASM group for Oracle Grid Infrastructure (asmdba) as secondary groups. However, the oracle2 user is not a member of the asmoper group, so oracle2 cannot shut down or start up Oracle ASM.

An OSDBA group (dba2). During installation, you identify the group dba2 as the OSDBA group for the database installed by the user oracle2. Members of dba2 are granted the SYSDBA privileges for the Oracle Database DB2. Users who connect as SYSDBA are identified as user SYS on DB2.

An OSBACKUPDBA group (backupdba2). During installation, you identify the group backupdba2 as the OSDBA group for the database installed by the user oracle2. Members of backupdba2 are granted the SYSBACKUP privileges for the database installed by the user oracle2 to back up the database.

An OSDGDBA group (dgdba2). During installation, you identify the group dgdba2 as the OSDGDBA group for the database installed by the user oracle2. Members of dgdba2 are granted the SYSDG privileges to administer Oracle Data Guard for the database installed by the user oracle2.

An OSKMDBA group (kmdba2). During installation, you identify the group kmdba2 as the OSKMDBA group for the database installed by the user oracle2. Members of kmdba2 are granted the SYSKM privileges to administer encryption keys for the database installed by the user oracle2.

An OSOPER group (oper2). During installation, you identify the group oper2 as the OSOPER group for the database installed by the user oracle2. Members of oper2 are granted the SYSOPER privileges (a limited set of the SYSDBA privileges), including the right to start up and shut down the DB2 database. Users who connect as OSOPER privileges are identified as user PUBLIC on DB2.

An Oracle base /u01/app/oracle2 owned by oracle1:oinstall with 775 permissions. The user oracle2 has permissions to install software in this directory, but in no other directory in the /u01/app path.

5.1.12 Creating the External Jobs User Account for HP-UX

On the HP-UX platform, if you intend to install Oracle Database or Oracle Real Application Clusters on Oracle Grid Infrastructure, then use the following procedure to create an external jobs user account to provide a low-privilege user with which external jobs can be run:

Log in as root.

Create the unprivileged user extjob. For example:

# useradd extjob

5.2 Configuring Grid Infrastructure Software Owner User Environments

You run the installer software with the Oracle Grid Infrastructure installation owner user account (oracle or grid). However, before you start the installer, you must configure the environment of the installation owner user account. Also, create other required Oracle software owners, if needed.

This section contains the following topics:

Environment Requirements for Oracle Software Owner

Procedure for Configuring Oracle Software Owner Environments

Setting Remote Display and X11 Forwarding Configuration

Preventing Installation Errors Caused by Terminal Output Commands

5.2.1 Environment Requirements for Oracle Software Owner

You must make the following changes to configure the Oracle Grid Infrastructure software owner environment:

Set the installation software owner user (grid, oracle) default file mode creation mask (umask) to 022 in the shell startup file. Setting the mask to 022 ensures that the user performing the software installation creates files with 644 permissions.

Set ulimit settings for file descriptors and processes for the installation software owner (grid, oracle)

Set the software owner's environment variable DISPLAY environment variables in preparation for the Oracle Grid Infrastructure installation

Caution:

Use shell programs supported by your operating system vendor. If you use a shell program that is not supported by your operating system, then you can encounter errors during installation.

5.2.2 Procedure for Configuring Oracle Software Owner Environments

To set the Oracle software owners' environments, follow these steps, for each software owner (grid, oracle):

Start a new terminal session; for example, start an X terminal (xterm).

Enter the following command to ensure that X Window applications can display on this system:

$ xhost + hostname

The hostname is the name of the local host.

If you are not already logged in to the system where you want to install the software, then log in to that system as the software owner user.

If you are not logged in as the user, then switch to the software owner user you are configuring. For example, with the grid user:

$ su - grid

To determine the default shell for the user, enter the following command:

$ echo $SHELL

Open the user's shell startup file in any text editor:

Bourne shell (sh) or Korn shell (ksh):

$ vi .profile

C shell (csh or tcsh):

% vi .login

Enter or edit the following line, specifying a value of 022 for the default file mode creation mask:

umask 022

If the ORACLE_SID, ORACLE_HOME, or ORACLE_BASE environment variable is set in the file, then remove the appropriate lines from the file.

Save the file, and exit from the text editor.

To run the shell startup script, enter one of the following commands:

Bourne or Korn shell:

$ . ./.profile

C shell:

% source ./.login

Use the following command to check the PATH environment variable:

$ echo $PATH

Remove any Oracle environment variables.

If you are not installing the software on the local system, then enter a command similar to the following to direct X applications to display on the local system:

Bourne or Korn shell:

$ DISPLAY=local_host:0.0 ; export DISPLAY

C shell:

% setenv DISPLAY local_host:0.0

In this example, local_host is the host name or IP address of the system to use to display OUI (your workstation or PC).

If the /tmp directory has less than 7 GB of free disk space, then identify a file system with at least 7 GB of free space and set the TEMP and TMPDIR environment variables to specify a temporary directory on this file system:

Note:

You cannot use a shared file system as the location of the temporary file directory (typically /tmp) for Oracle RAC installation. If you place /tmp on a shared file system, then the installation fails.

Use the bdf command to identify a suitable file system with sufficient free space.

If necessary, enter commands similar to the following to create a temporary directory on the file system that you identified, and set the appropriate permissions on the directory:

$ su - root
# mkdir /mount_point/tmp
# chmod a+wr /mount_point/tmp
# exit

Enter commands similar to the following to set the TEMP and TMPDIR environment variables:

Bourne or Korn shell:

$ TEMP=/mount_point/tmp
$ TMPDIR=/mount_point/tmp
$ export TEMP TMPDIR

C shell:

% setenv TEMP /mount_point/tmp
% setenv TMPDIR /mount_point/tmp

Enter the following command to ensure that the ORACLE_HOME and TNS_ADMIN environment variables are not set:

Bourne or Korn shell:

$ unset ORACLE_HOME
$ unset TNS_ADMIN

C shell:

% unsetenv ORACLE_HOME
% unsetenv TNS_ADMIN

Note:

If the ORACLE_HOME environment variable is set, the Installer uses the value that it specifies as the default path for the Oracle home directory. However, if you set the ORACLE_BASE environment variable, Oracle recommends that you unset the ORACLE_HOME environment variable and choose the default path suggested by the Installer.

5.2.3 Setting Remote Display and X11 Forwarding Configuration

If you are on a remote terminal, and the local node has only one visual (which is typical), then use the following syntax to set the DISPLAY environment variable:

Bourne, Korn, and Bash shells

$ export DISPLAY=hostname:0

C shell:

$ setenv DISPLAY hostname:0

For example, if you are using the Bash shell, and if your host name is node1, then enter the following command:

$ export DISPLAY=node1:0

To ensure that X11 forwarding does not cause the installation to fail, create a user-level SSH client configuration file for the Oracle software owner user, as follows:

Using any text editor, edit or create the software installation owner's ~/.ssh/config file.

Ensure that the ForwardX11 attribute in the ~/.ssh/config file is set to no. For example:

Host * ForwardX11 no

Ensure that the permissions on the ~/.ssh are secured to the Grid user. For example:

$ ls -al .ssh
total 28
drwx------  2 grid oinstall 4096 Jun 21 2012
drwx------ 19 grid oinstall 4096 Jun 21 2012
-rw-r--r--  1 grid oinstall 1202 Jun 21 2012 authorized_keys
-rwx------  1 grid oinstall  668 Jun 21 2012 id_dsa
-rwx------  1 grid oinstall  601 Jun 21 2012 id_dsa.pub
-rwx------  1 grid oinstall 1610 Jun 21 2012 known_hosts

5.2.4 Preventing Installation Errors Caused by Terminal Output Commands

During an Oracle Grid Infrastructure installation, OUI uses SSH to run commands and copy files to the other nodes. During the installation, hidden files on the system (for example, .bashrc or .cshrc) will cause makefile and other installation errors if they contain stty commands.

To avoid this problem, you must modify these files in each Oracle installation owner user home directory to suppress all output on STDOUT or STDERR (for example, stty, xtitle, and other such commands) as in the following examples:

Bourne, Bash, or Korn shell:

if [ -t 0 ]; then
   stty intr ^C
fi

C shell:

test -t 0
if ($status == 0) then
   stty intr ^C
endif

Note:

When SSH is not available, the Installer uses the remsh commands instead of ssh and scp.

If there are hidden files that contain stty commands that are loaded by the remote shell, then OUI indicates an error and stops the installation.

5.3 Enabling Intelligent Platform Management Interface (IPMI)

Intelligent Platform Management Interface (IPMI) provides a set of common interfaces to computer hardware and firmware that system administrators can use to monitor system health and manage the system. Oracle Clusterware can integrate IPMI to provide failure isolation support and to ensure cluster integrity.

Oracle Clusterware does not currently support the native IPMI driver on HP-UX, so OUI does not collect the administrator credentials, and CSS is unable to obtain the IP address. You must configure failure isolation manually by configuring the BMC with a static IP address before installation, and using crsctl to store the IP address and IPMI credentials after installation.

This section contains the following topics:

Requirements for Enabling IPMI

Configuring the IPMI Management Network

Configuring the BMC

See Also:

Oracle Clusterware Administration and Deployment Guide for information about how to configure IPMI after installation

5.3.1 Requirements for Enabling IPMI

You must have the following hardware and software configured to enable cluster nodes to be managed with IPMI:

Each cluster member node requires a Baseboard Management Controller (BMC) running firmware compatible with IPMI version 1.5 or greater, which supports IPMI over LANs, and configured for remote control using LAN.

Each cluster member node requires an IPMI driver installed on each node.

The cluster requires a management network for IPMI. This can be a shared network, but Oracle recommends that you configure a dedicated network.

Each cluster member node's Ethernet port used by BMC must be connected to the IPMI management network.

Each cluster member must be connected to the management network.

Some server platforms put their network interfaces into a power saving mode when they are powered off. In this case, they may operate only at a lower link speed (for example, 100 MB, instead of 1 GB). For these platforms, the network switch port to which the BMC is connected must be able to auto-negotiate down to the lower speed, or IPMI cannot function properly.

Note:

IPMI operates on the physical hardware platform through the network interface of the baseboard management controller (BMC). Depending on your system configuration, an IPMI-initiated restart of a server can affect all virtual environments hosted on the server. Contact your hardware and OS vendor for more information.

5.3.2 Configuring the IPMI Management Network

On HP-UX platforms, the BMC shares configuration information with the management processor (iLO). For Oracle Clusterware, you must configure the ilO/BMC for static IP addresses. Configuring the BMC with dynamic addresses (DHCP) is not supported on HP-UX.

Note:

If you configure IPMI, and you use Grid Naming Service (GNS) you still must configure separate addresses for the IPMI interfaces. As the IPMI adapter is not seen directly by the host, the IPMI adapter is not visible to GNS as an address on the host.

5.3.3 Configuring the BMC

On each node, complete the following steps to configure the BMC to support IPMI-based node fencing:

Configure a static IP address for the BMC.

Set a password for the null (noname) account for the BMC.

On HP-UX, the BMC and the iLO share network configuration. They have the same IP address, the same hardware MAC address, and the same default gateway address.

If your iLO processor is already configured for network access using a static address, then you have already established the required BMC network configuration. If you have not set up a static address for the iLO, then you must set a static address, and note the address so that you can enter it into the Oracle Clusterware local registry after installation.

You must also set up a password for the null (noname) user account, as this is the single account that the BMC uses. Administration accounts in the iLO are unrelated to the BMC. For security reasons, Oracle requires that you set a password for the BMC account.

Refer to your HP-UX documentation for more information about how to configure the BMC. Ensure that the BMC is configured on each cluster member node.

5.3.3.1 Configuring the iLO Processor on HP-UX

To configure IPMI in the iLO processor on HP platforms, and to set a password for the null (noname user), complete the following procedure:

Log in to the iLO web interface, and configure the required network settings for the iLO and BMC under Administration, then Network Settings to obtain the IP address, and to check the netmask and default gateway.

Start a terminal session from a device with network connectivity to the BMC of the node to configure.

From the terminal session, set the IPMI password for the anonymous user (noname) over the network, using an IPMI administration tool, such as ipmitool from a client or server connected to the note whose user password you want to change. For example, where ipmiaddr is the IPMI address, and password is the password:

% ipmitool -H ipmiaddr -U "" user set password 1 "password"

Note that in this example, the anonymous username is being provided explicitly using -U "" for clarity, but it is implied if the username argument is missing. This command prompts for the current password, which can be the initial null password. If the password is successfully changed, then the command prints an error similar to: "Close session command failed." This message is printed because the command attempts to terminate the IPMI network session using the previous password.

Note:

It is not possible to set the password for the IPMI administrator account using the Local Accounts web interface page.

After you configure the BMC on each cluster member node, and have completed Oracle Grid Infrastructure installation, you must store the IPMI administrator credentials and the BMC static IP address in the Oracle Local Registry (OLR) on each cluster member node. Use crsctl to do this, as described in Section 8.2.1, "Configuring IPMI-based Failure Isolation Using Crsctl." However, when you store the IPMI credentials in the OLR, you must have the anonymous user specified explicitly, or a parsing error will be reported:

% crsctl set css ipmiadmin ""

When prompted, provide the password you set with the IPMI administrator tool.

5.4 Determining Root Script Execution Plan

During Oracle Grid Infrastructure installation, the installer requires you to run scripts with superuser (or root) privileges to complete a number of system configuration tasks.

You can continue to run scripts manually as root, or you can delegate to the installer the privilege to run configuration steps as root, using one of the following options:

Use the root password: Provide the password to the installer as you are providing other configuration information. The password is used during installation, and not stored. The root user password must be identical on each cluster member node.

To enable root command delegation, provide the root password to the installer when prompted.

Use Sudo: Sudo is a UNIX and Linux utility that allows members of the sudoers list privileges to run individual commands as root.

To enable Sudo, have a system administrator with the appropriate privileges configure a user that is a member of the sudoers list, and provide the username and password when prompted during installation.

5.5 Creating the Oracle Base Directory Path

The Oracle base directory for the grid installation owner is the location where diagnostic and administrative logs, and other logs associated with Oracle ASM and Oracle Clusterware are stored.

If you have created a path for the Oracle Clusterware home that is compliant with Oracle Optimal Flexible Architecture (OFA) guidelines for Oracle software paths then you do not need to create an Oracle base directory. When OUI finds an OFA-compliant path, it creates the Oracle base directory in that path.

For OUI to recognize the path as an Oracle software path, it must be in the form u[00-99]/app, and it must be writable by any member of the oraInventory (oinstall) group. The OFA path for the Oracle base is /u01/app/user, where user is the name of the software installation owner.

Oracle recommends that you create an Oracle Grid Infrastructure Grid home and Oracle base homes manually, particularly if you have separate Oracle Grid Infrastructure for a cluster and Oracle Database software owners, so that you can separate log files.

For example:

# mkdir -p  /u01/app/11.2.0/grid
# mkdir -p /u01/app/grid
# mkdir -p /u01/app/oracle
# chown grid:oinstall /u01/app/11.2.0/grid
# chown grid:oinstall /u01/app/grid
# chown oracle:oinstall /u01/app/oracle
# chmod -R 775 /u01/
# chown -R grid:oinstall /u01

Note:

Placing Oracle Grid Infrastructure for a Cluster binaries on a cluster file system is not supported.

6 Configuring Storage for Oracle Grid Infrastructure and Oracle RAC

This chapter describes the storage configuration tasks that you must complete before you start the installer to install Oracle Clusterware and Oracle Automatic Storage Management (Oracle ASM), and that you must complete before adding an Oracle Real Application Clusters (Oracle RAC) installation to the cluster.

This chapter contains the following topics:

Reviewing Oracle Grid Infrastructure Storage Options

About Shared File System Storage Configuration

Configuring Operating System and Direct NFS Client

Oracle Automatic Storage Management Storage Configuration

6.1 Reviewing Oracle Grid Infrastructure Storage Options

This section describes supported options for storing Oracle Grid Infrastructure for a cluster storage options. It contains the following sections:

Supported Storage Options

General Storage Considerations for Oracle Grid Infrastructure and Oracle RAC

Guidelines for Using Oracle ASM Disk Groups for Storage

Using Logical Volume Managers with Oracle Grid Infrastructure and Oracle RAC

After You Have Selected Disk Storage Options

See Also:

The Oracle Certification site on My Oracle Support for the most current information about certified storage options:

https://support.oracle.com

6.1.1 Supported Storage Options

The following table shows the storage options supported for storing Oracle Clusterware and Oracle RAC files.

Table 6-1 Supported Storage Options for Oracle Clusterware and Oracle RAC

Storage Option
OCR and Voting Disks
Oracle Clusterware binaries
Oracle RAC binaries
Oracle Database Files
Oracle Recovery Files

Oracle Automatic Storage Management

Note: Loopback devices are not supported for use with Oracle ASM

Yes

No

No

Yes

Yes

Local file system

No

Yes

Yes

No

No

NFS file system on a certified NAS filer

Note: Direct NFS Client does not support Oracle Clusterware files.

Yes

Yes

Yes

Yes

Yes

Shared disk partitions (block devices or raw devices)

No

No

No

No

No

Shared Logical Volume Manager

Not recommended. This is because raw and block devices for Oracle Clusterware files are desupported, starting with Oracle Grid Infrastructure 12c.

No

No

Not recommended. This is because raw and block devices for Oracle Database files are desupported, starting with Oracle Grid Infrastructure 12c.

No

Cluster File SystemFoot 1  Foot 2 

Yes

Yes

Yes

Yes

Yes

Footnote 1 Options listed are not applicable for Oracle ASM. For supported storage options for Oracle ASM, refer to the entry for Oracle ASM in this table.

Footnote 2 Shared Logical Volume Manager can be used with Cluster File System.

Use the following guidelines when choosing storage options:

You can choose any combination of the supported storage options for each file type provided that you satisfy all requirements listed for the chosen storage options.

You can use Oracle ASM to store Oracle Clusterware files.

Raw or block devices are not supported.

See Also:

Oracle Database Upgrade Guide for information about how to prepare for upgrading an existing database

If you do not have a storage option that provides external file redundancy, then you must configure at least three voting disk locations and at least two Oracle Cluster Registry locations to provide redundancy.

6.1.2 General Storage Considerations for Oracle Grid Infrastructure and Oracle RAC

For all installations, you must choose the storage option to use for Oracle Grid Infrastructure (Oracle Clusterware and Oracle ASM), and Oracle Real Application Clusters (Oracle RAC) databases.

6.1.2.1 General Storage Considerations for Oracle Clusterware

Oracle Clusterware voting disks are used to monitor cluster node status, and Oracle Cluster Registry (OCR) files contain configuration information about the cluster. You can place voting disks and OCR files either in an Oracle ASM disk group, or on a cluster file system or shared network file system. Storage must be shared; any node that does not have access to an absolute majority of voting disks (more than half) will be restarted.

6.1.2.2 General Storage Considerations for Oracle RAC

For Standard Edition and Standard Edition 2 (SE2) Oracle RAC installations, Oracle ASM is the only supported storage option for database and recovery files. For all installations, Oracle recommends that you create at least two separate Oracle ASM disk groups: One for Oracle Database data files, and one for recovery files. Oracle recommends that you place the Oracle Database disk group and the recovery files disk group in separate failure groups.

If you do not use Oracle ASM, then Oracle recommends that you place the data files and the Fast Recovery Area in shared storage located outside of the Oracle home, in separate locations, so that a hardware failure does not affect availability.

See Also:

Oracle Database 2 Day DBA for more information about using a Fast Recovery Area

Oracle Database Storage Administrator's Guide for information about failure groups and best practices for high availability and recovery

Note the following additional guidelines for supported storage options:

You can choose any combination of the supported storage options for each file type provided that you satisfy all requirements listed for the chosen storage options.

If you intend to use Oracle ASM with Oracle RAC, and you are configuring a new Oracle ASM instance, then your system must meet the following conditions:

All nodes on the cluster have Oracle Clusterware and Oracle ASM 12c Release 1 (12.1) installed as part of an Oracle Grid Infrastructure for a cluster installation.

Any existing Oracle ASM instance on any node in the cluster is shut down.

If you do not have a storage option that provides external file redundancy, then you must configure at least three voting disk areas to provide voting disk redundancy.

6.1.3 Guidelines for Using Oracle ASM Disk Groups for Storage

During Oracle Grid Infrastructure installation, you can create one disk group. After the Oracle Grid Infrastructure installation, you can create additional disk groups using Oracle Automatic Storage Management Configuration Assistant (ASMCA), SQL*Plus, or Automatic Storage Management Command-Line Utility (ASMCMD). Note that with Oracle Database 11g Release 2 (11.2) and later releases, Oracle Database Configuration Assistant (DBCA) does not have the functionality to create disk groups for Oracle ASM.

If you install Oracle Database or Oracle RAC after you install Oracle Grid Infrastructure, then you can either use the same disk group for database files, OCR, and voting disk files, or you can use different disk groups. If you create multiple disk groups before installing Oracle RAC or before creating a database, then you can do one of the following:

Place the data files in the same disk group as the Oracle Clusterware files.

Use the same Oracle ASM disk group for data files and recovery files.

Use different disk groups for each file type.

If you create only one disk group for storage, then the OCR and voting disk files, database files, and recovery files are contained in the one disk group. If you create multiple disk groups for storage, then you can place files in different disk groups.

Note:

The Oracle ASM instance that manages the existing disk group should be running in the Grid home.

See Also:

Oracle Database Storage Administrator's Guide for information about creating disk groups

6.1.4 Using Logical Volume Managers with Oracle Grid Infrastructure and Oracle RAC

Oracle Grid Infrastructure and Oracle RAC only support cluster-aware volume managers. Some third-party volume managers are not cluster-aware, and so are not supported. To confirm that a volume manager you want to use is supported, click Certifications on My Oracle Support to determine if your volume manager is certified for Oracle RAC. My Oracle Support is available at the following URL:

https://support.oracle.com

6.1.5 After You Have Selected Disk Storage Options

When you have determined your disk storage options, configure shared storage:

To use a file system, refer to Section 6.2, "About Shared File System Storage Configuration."

To use Oracle ASM, refer to Section 6.4, "Oracle Automatic Storage Management Storage Configuration."

6.2 About Shared File System Storage Configuration

The installer does not suggest a default location for the Oracle Cluster Registry (OCR) or the Oracle Clusterware voting disk. If you choose to create these files on a file system, then review the following sections to complete storage requirements for Oracle Clusterware files:

Requirements for Using a Shared File System

Deciding to Use a Cluster File System for Oracle Clusterware Files

Deciding to Use Direct NFS Client for Data Files

Deciding to Use NFS for Data Files

Configuring Storage NFS Mount and Buffer Size Parameters

Checking NFS Mount and Buffer Size Parameters for Oracle Clusterware

Checking NFS Mount and Buffer Size Parameters for Oracle RAC

Enabling Direct NFS Client Oracle Disk Manager Control of NFS

Creating Directories for Oracle Clusterware Files on Shared File Systems

Creating Directories for Oracle Database Files on Shared File Systems

Note:

The OCR is a file that contains the configuration information and status of the cluster. Oracle Universal Installer (OUI) automatically initializes the OCR during the Oracle Clusterware installation. Database Configuration Assistant uses the OCR for storing the configurations for the cluster databases that it creates.

6.2.1 Requirements for Using a Shared File System

To use a shared file system for Oracle Clusterware, Oracle ASM, and Oracle RAC, the file system must comply with the following requirements:

To use an NFS file system, it must be on a certified NAS device. Log in to My Oracle Support at the following URL, and click the Certify tab to find a list of certified NAS devices.

https://support.oracle.com/

If you choose to place your Oracle Cluster Registry (OCR) files on a shared file system, then Oracle recommends that one of the following is true:

The disks used for the file system are on a highly available storage device, (for example, a RAID device).

At least two file systems are mounted, and use the features of Oracle Clusterware 11g release 2 (11.2) to provide redundancy for the OCR.

If you choose to place your database files on a shared file system, then one of the following should be true:

The disks used for the file system are on a highly available storage device, (for example, a RAID device).

The file systems consist of at least two independent file systems, with the database files on one file system, and the recovery files on a different file system.

The user account with which you perform the installation (oracle or grid) must have write permissions to create the files in the path that you specify.

Note:

Upgrading from Oracle9i Release 2 using the raw device or shared file for the OCR that you used for the SRVM configuration repository is not supported.

If you are upgrading Oracle Clusterware, and your existing cluster uses 100 MB OCR and 20 MB voting disk partitions, then you must extend the OCR partition to at least 400 MB, and you should extend the voting disk partition to 300 MB. Oracle recommends that you do not use partitions, but instead place OCR and voting disks in disk groups marked as QUORUM disk groups.

All storage products must be supported by both your server and storage vendors.

6.2.2 Requirements for Oracle Grid Infrastructure Shared File System Volume Sizes

Use Table 6-2 and Table 6-3 to determine the minimum size for shared file systems:

Table 6-2 Oracle Clusterware Shared File System Volume Size Requirements

File Types Stored
Number of Volumes
Volume Size

Voting disks with external redundancy

1

At least 300 MB for each voting disk volume

Oracle Cluster Registry (OCR) with external redundancy

1

At least 400 MB for each OCR volume

Table 6-3 Oracle RAC Shared File System Volume Size Requirements

File Types Stored
Number of Volumes
Volume Size

Oracle Database files

1

At least 1.5 GB for each volume

Recovery files

Note: Recovery files must be on a different volume than database files

1

At least 2 GB for each volume

In Table 6-2 and Table 6-3, the total required volume size is cumulative. For example, to store all Oracle Clusterware files on the shared file system with normal redundancy, you should have at least 2 GB of storage available over a minimum of three volumes (three separate volume locations for the OCR and two OCR mirrors, and one voting disk on each volume). You should have a minimum of three physical disks, each at least 500 MB, to ensure that voting disks and OCR files are on separate physical disks. If you add Oracle RAC using one volume for database files and one volume for recovery files, then you should have at least 3.5 GB available storage over two volumes, and at least 6.9 GB available total for all volumes.

Note:

If you create partitions on shared partitions with fdisk by specifying a device size, such as +400M, then the actual device created may be smaller than the size requested, based on the cylinder geometry of the disk. This is due to current fdisk restrictions. Oracle recommends that you partition the entire disk that you allocate for use by Oracle ASM.

6.2.3 Deciding to Use a Cluster File System for Oracle Clusterware Files

For new installations, Oracle recommends that you use Oracle Automatic Storage Management (Oracle ASM) to store voting disk and OCR files.

6.2.4 Deciding to Use Direct NFS Client for Data Files

Direct NFS Client is an alternative to using kernel-managed NFS. This section contains the following information about Direct NFS Client:

About Direct NFS Client Storage

About the oranfstab File and Direct NFS Client

About Mounting NFS Storage Devices with Direct NFS Client

Specifying Network Paths with the oranfstab File

6.2.4.1 About Direct NFS Client Storage

With Oracle Database 11g release 2 (11.2), instead of using the operating system kernel NFS client, you can configure Oracle Database to access NFS V3 servers directly using an Oracle internal Direct NFS Client.

To enable Oracle Database to use Direct NFS Client, the NFS file systems must be mounted and available over regular NFS mounts before you start installation. Direct NFS Client manages settings after installation. You should still set the kernel mount options as a backup, but for normal operation, Direct NFS Client will manage NFS mounts.

Refer to your vendor documentation to complete NFS configuration and mounting.

Some NFS file servers require NFS clients to connect using reserved ports. If your filer is running with reserved port checking, then you must disable it for Direct NFS Client to operate. To disable reserved port checking, consult your NFS file server documentation.

For NFS servers that restrict port range, you can use the insecure option to enable clients other than root to connect to the NFS server. Alternatively, you can disable Direct NFS Client as described in Section 6.3.10, "Disabling Direct NFS Client Oracle Disk Management Control of NFS".

Note:

Use NFS servers supported for Oracle RAC. Refer to the following URL for certification information:

https://support.oracle.com

6.2.4.2 About the oranfstab File and Direct NFS Client

If you use Direct NFS Client, then you can use a new file specific for Oracle data file management, oranfstab, to specify additional options specific for Oracle Database to Direct NFS Client. For example, you can use oranfstab to specify additional paths for a mount point. You can add the oranfstab file either to /etc or to $ORACLE_HOME/dbs.

With shared Oracle homes, when the oranfstab file is placed in $ORACLE_HOME/dbs, the entries in the file are specific to a single database. In this case, all nodes running an Oracle RAC database use the same $ORACLE_HOME/dbs/oranfstab file. In non-shared Oracle RAC installs, oranfstab must be replicated on all nodes.

When the oranfstab file is placed in /etc, then it is globally available to all Oracle databases, and can contain mount points used by all Oracle databases running on nodes in the cluster, including standalone databases. However, on Oracle RAC systems, if the oranfstab file is placed in /etc, then you must replicate the file /etc/oranfstab file on all nodes, and keep each /etc/oranfstab file synchronized on all nodes, just as you must with the /etc/fstab file.

See Also:

Section 6.3.1, "Configuring Storage NFS Mount and Buffer Size Parameters" for information about configuring /etc/fstab

In all cases, mount points must be mounted by the kernel NFS system, even when they are being served using Direct NFS Client. Refer to your vendor documentation to complete operating system NFS configuration and mounting.

Caution:

Direct NFS Client cannot serve an NFS server with write size values (wtmax) less than 32768.

6.2.4.3 About Mounting NFS Storage Devices with Direct NFS Client

Direct NFS Client determines mount point settings to NFS storage devices based on the configurations in /etc/mnttab, which are changed with configuring the /etc/fstab file.

Direct NFS Client searches for mount entries in the following order and uses the first matching entry it finds:

$ORACLE_HOME/dbs/oranfstab

/etc/oranfstab

/etc/mnttab

Direct NFS Client uses the first matching entry as the mount point.

Oracle Database requires that mount points be mounted by the kernel NFS system even when served through Direct NFS Client.

Note:

You can have only one active Direct NFS Client implementation for each instance. Using Direct NFS Client on an instance will prevent another Direct NFS Client implementation.

If Oracle Database uses Direct NFS Client mount points configured using oranfstab, then it first verifies kernel NFS mounts by cross-checking entries in oranfstab with operating system NFS mount points. If a mismatch exists, then Direct NFS Client logs an informational message, and does not operate.

If Oracle Database cannot open an NFS server using Direct NFS Client, then Oracle Database uses the platform operating system kernel NFS client. In this case, the kernel NFS mount options must be set up as defined in Section 6.3.3, "Checking NFS Mount and Buffer Size Parameters for Oracle RAC". Additionally, an informational message is logged into the Oracle alert and trace files indicating that Direct NFS Client could not connect to an NFS server.

Section 6.1.1, "Supported Storage Options" lists the file types that are supported by Direct NFS Client.

The Oracle files resident on the NFS server that are served by Direct NFS Client are also accessible through the operating system kernel NFS client.

See Also:

Oracle Database Storage Administrator's Guide for guidelines to follow regarding managing Oracle database data files created with Direct NFS Client or kernel NFS

6.2.4.4 Specifying Network Paths with the oranfstab File

Direct NFS Client can use up to four network paths defined in the oranfstab file for an NFS server. Direct NFS Client performs load balancing across all specified paths. If a specified path fails, then Direct NFS Client reissues I/O commands over any remaining paths.

Use the following SQL*Plus views for managing Direct NFS Client in a cluster environment:

gv$dnfs_servers: Shows a table of servers accessed using Direct NFS Client.

gv$dnfs_files: Shows a table of files currently open using Direct NFS Client.

gv$dnfs_channels: Shows a table of open network paths (or channels) to servers for which Direct NFS Client is providing files.

gv$dnfs_stats: Shows a table of performance statistics for Direct NFS Client.

Note:

Use v$ views for single instances, and gv$ views for Oracle Clusterware and Oracle RAC storage.

6.2.5 Deciding to Use NFS for Data Files

Network-attached storage (NAS) systems use NFS to access data. You can store data files on a supported NFS system.

NFS file systems must be mounted and available over NFS mounts before you start installation. Refer to your vendor documentation to complete NFS configuration and mounting.

Be aware that the performance of Oracle software and databases stored on NAS devices depends on the performance of the network connection between the Oracle server and the NAS device.

For this reason, Oracle recommends that you connect the server to the NAS device using a private dedicated network connection, which should be Gigabit Ethernet or better.

6.3 Configuring Operating System and Direct NFS Client

Refer to the following sections to configure your operating system and Direct NFS Client:

Configuring Storage NFS Mount and Buffer Size Parameters

Checking NFS Mount and Buffer Size Parameters for Oracle Clusterware

Checking NFS Mount and Buffer Size Parameters for Oracle RAC

Checking TCP Network Protocol Buffer for Direct NFS Client

Enabling Direct NFS Client Oracle Disk Manager Control of NFS

Specifying Network Paths with the Oranfstab File

Creating Directories for Oracle Clusterware Files on Shared File Systems

Creating Directories for Oracle Database Files on Shared File Systems

Disabling Direct NFS Client Oracle Disk Management Control of NFS

6.3.1 Configuring Storage NFS Mount and Buffer Size Parameters

If you are using NFS for the Grid home or Oracle RAC home, then you must set up the NFS mounts on the storage to enable the following:

The root user on the clients mounting to the storage can be considered as the root user on the file server, instead of being mapped to an anonymous user.

The root user on the client server can create files on the NFS filesystem that are owned by root on the file server.

On NFS, you can obtain root access for clients writing to the storage by enabling root=access_list on the server side. For example, to set up Oracle Clusterware file storage in the path /vol/grid, with nodes node1, node 2, and node3 in the domain mycluster.example.com, add a line similar to the following to the /etc/dfs/dfstab file:

share -F nfs -o
rw=node1.mycluster.example.com,node2,mycluster.example.com,node3.mycluster.example
.com,root=node1.mycluster.example.com,node2.mycluster.example.com,node3.mycluster.
example.com /vol/grid

Note:

Enter share settings as a single line.

If the domain or DNS is secure so that no unauthorized system can obtain an IP address on it, then you can grant root access by domain, rather than specifying particular cluster member nodes:

For example:

/vol/grid/ *.mycluster.example.com

Oracle recommends that you use a secure DNS or domain, and grant root access to cluster member nodes using the domain, as using this syntax allows you to add or remove nodes without the need to reconfigure the NFS server.

If you use Grid Naming Service (GNS), then the subdomain allocated for resolution by GNS within the cluster is a secure domain. Any server without a correctly signed Grid Plug and Play (GPnP) profile cannot join the cluster, so an unauthorized system cannot obtain or use names inside the GNS subdomain.

Caution:

Granting root access by domain can be used to obtain unauthorized access to systems. System administrators should refer to their operating system documentation for the risks associated with using root=access.

After changing /etc/dfs/dfstab, reload the file system mount using the following command:

# /usr/sbin/shareall

6.3.2 Checking NFS Mount and Buffer Size Parameters for Oracle Clusterware

On the cluster member nodes, you must set the values for the NFS buffer size parameters rsize and wsize to 32768.

The NFS client-side mount options for data files are:

rw,bg,vers=3,proto=tcp,noac,forcedirectio,hard,nointr,timeo=600,rsize=32768,wsize=32768

The NFS client-side mount options for Oracle Clusterware files (OCR and voting disk files) are:

rw,bg,vers=3,proto=tcp,noac,
forcedirectio,hard,nointr,timeo=600,
rsize=32768,wsize=32768,suid

Update the /etc/fstab file on each node with an entry containing the NFS mount options for your platform. For example, if you are creating a mount point for Oracle Clusterware files, then update the /etc/fstab files with an entry similar to the following:

nfsserver:/vol/grid  /u02/oracle/cwfiles nfs \
rw,bg,vers=3,proto=tcp,noac,forcedirectio,hard,nointr,timeo=600,rsize=32768,wsize=32768,suid 0 0

Note that mount point options are different for Oracle software binaries, compared to Oracle Clusterware files (OCR and voting disks) and data files.

To create a mount point for binaries only, provide an entry similar to the following for a binaries mount point:

nfs-server:/vol/bin /u02/oracle/grid nfs \
rw,bg,vers=3,proto=tcp,noac,hard,nointr,timeo=600,rsize=32768,wsize=32768,suid

See Also:

My Oracle Support bulletin 359515.1, "Mount Options for Oracle Files When Used with NAS Devices" for the most current information about mount options, available from the following URL:

https://support.oracle.com

Note:

Refer to your storage vendor documentation for additional information about mount options.

6.3.3 Checking NFS Mount and Buffer Size Parameters for Oracle RAC

If you use NFS mounts, then you must mount NFS volumes used for storing database files with special mount options on each node that has an Oracle RAC instance. When mounting an NFS file system, Oracle recommends that you use the same mount point options that your NAS vendor used when certifying the device. Refer to your device documentation or contact your vendor for information about recommended mount-point options.

Update the /etc/fstab file on each node with an entry similar to the following:

nfs-server:/vol/DATA/oradata  /u02/oradata     nfs\
rw,bg,hard,nointr,noac,proto=tcp,vers=3,timeo=600,
rsize=32768,wsize=32768 0 0

The mandatory mount options comprise the minimum set of mount options that you must use while mounting the NFS volumes. These mount options are essential to protect the integrity of the data and to prevent any database corruption. Failure to use these mount options may result in the generation of file access errors. Refer to your operating system or NAS device documentation for more information about the specific options supported on your platform.

See Also:

My Oracle Support note 359515.1 for updated NAS mount option information, available at the following URL:

https://support.oracle.com/CSP/main/article?cmd=show&type=NOT&id=359515.1

6.3.4 Checking TCP Network Protocol Buffer for Direct NFS Client

By default, the network buffer size is set to 1 MB for TCP, and 2 MB for UDP. The TCP buffer size can set a limit on file transfers, which can negatively affect performance for Direct NFS Client users.

To check the current TCP buffer size, enter the following command:

bash-4.0$ ndd -get /dev/tcp tcp_xmit_hiwater_max
bash-4.0$ ndd -get /dev/tcp tcp_recv_hiwater_max

Oracle recommends that you set the value based on the link speed of your servers. For example:

bash-4.0# ndd -set /dev/tcp tcp_xmit_hiwater_max 10485760
bash-4.0# ndd -set /dev/tcp tcp_recv_hiwater_max 10485760

6.3.5 Enabling Direct NFS Client Oracle Disk Manager Control of NFS

By default, Direct NFS Client is installed in an enabled state. However, if Direct NFS Client is disabled and you want to enable it, complete the following procedure to enable Direct NFS Client:

Create an oranfstab file with the following attributes for each NFS server to be accessed using Direct NFS Client:

server: The NFS server name.

local: Up to four paths on the database host, specified by IP address or by name, as displayed using the ifconfig command run on the database host.

path: Up to four network paths to the NFS server, specified either by IP address, or by name, as displayed using the ifconfig command on the NFS server.

export: The exported path from the NFS server.

mount: The corresponding local mount point for the exported volume.

mnt_timeout: Specifies (in seconds) the time Direct NFS Client should wait for a successful mount before timing out. This parameter is optional. The default timeout is 10 minutes (600).

nfs_version: Specifies the NFS protocol version Direct NFS Client uses. Possible values are NFSv3, NFSv4 and NFSv4.1. The default version is NFSv3. If you select NFSv4.x, then you must configure the value in oranfstab for nfs_version.

dontroute: Specifies that outgoing messages should not be routed by the operating system, but instead sent using the IP address to which they are bound.

See Also:

Oracle Database Performance Tuning Guide for more information about limiting asynchronous I/O

The examples that follow show three possible NFS server entries in oranfstab. A single oranfstab can have multiple NFS server entries.

Example 6-1 Using Local and Path NFS Server Entries

The following example uses both local and path. Since they are in different subnets, we do not have to specify dontroute.

server: MyDataServer1
local: 192.0.2.0
path: 192.0.2.1
local: 192.0.100.0
path: 192.0.100.1
export: /vol/oradata1 mount: /mnt/oradata1

Example 6-2 Using Local and Path in the Same Subnet, with dontroute

The following example shows local and path in the same subnet. dontroute is specified in this case:

server: MyDataServer2
local: 192.0.2.0
path: 192.0.2.128
local: 192.0.2.1
path: 192.0.2.129
dontroute
export: /vol/oradata2 mount: /mnt/oradata2

Example 6-3 Using Names in Place of IP Addresses, with Multiple Exports

server: MyDataServer3
local: LocalPath1
path: NfsPath1
local: LocalPath2
path: NfsPath2
local: LocalPath3
path: NfsPath3
local: LocalPath4
path: NfsPath4
dontroute
export: /vol/oradata3 mount: /mnt/oradata3
export: /vol/oradata4 mount: /mnt/oradata4
export: /vol/oradata5 mount: /mnt/oradata5
export: /vol/oradata6 mount: /mnt/oradata6

Oracle Database uses an ODM library, libnfsodm11.so, to enable Direct NFS Client. To replace the standard ODM library, $ORACLE_HOME/lib/libodm11.so, with the ODM NFS library, libnfsodm11.so, complete the following steps on all nodes unless the Oracle home directory is shared:

Change directory to $ORACLE_HOME/lib.

Enter the following commands:

cp libodm11.so libodm11.so_stub
ln -s libnfsodm11.so libodm11.so

6.3.6 Specifying Network Paths with the Oranfstab File

Direct NFS Client can use up to four network paths defined in the oranfstab file for an NFS server. Direct NFS Client performs load balancing across all specified paths. If a specified path fails, then Direct NFS Client reissues I/O commands over any remaining paths.

Use the following SQL*Plus views for managing Direct NFS Client in a cluster environment:

gv$dnfs_servers: Shows a table of servers accessed using Direct NFS Client.

gv$dnfs_files: Shows a table of files currently open using Direct NFS Client.

gv$dnfs_channels: Shows a table of open network paths (or channels) to servers for which Direct NFS Client is providing files.

gv$dnfs_stats: Shows a table of performance statistics for Direct NFS Client.

Note:

Use v$ views for single instances, and gv$ views for Oracle Clusterware and Oracle RAC storage.

6.3.7 Enabling Hybrid Columnar Compression on Direct NFS Client

To enable Hybrid Columnar Compression (HCC) on Direct NFS Client, perform the following steps:

Ensure that SNMP is enabled on the ZFS Storage Server. For example:

$ snmpget -v1 -c public server_name .1.3.6.1.4.1.42.2.225.1.4.2.0
SNMPv2-SMI::enterprises.42.2.225.1.4.2.0 = STRING: "Sun Storage 7410"

If SNMP is enabled on an interface other than the NFS server, then configure oranfstab using the management parameter.

If SNMP is configured using a community string other than public, then configure oranfstab file using the community parameter.

Ensure that libnetsnmp.so is installed by checking if snmpget is available.

6.3.8 Creating Directories for Oracle Clusterware Files on Shared File Systems

Use the following instructions to create directories for Oracle Clusterware files. You can also configure shared file systems for the Oracle Database and recovery files.

Note:

For NFS storage, you must complete this procedure only if you want to place the Oracle Clusterware files on a separate file system from the Oracle base directory.

To create directories for the Oracle Clusterware files on separate file systems from the Oracle base directory, follow these steps:

If necessary, configure the shared file systems to use and mount them on each node.

Note:

The mount point that you use for the file system must be identical on each node. Ensure that the file systems are configured to mount automatically when a node restarts.

Use the bdf command to determine the free disk space on each mounted file system.

From the display, identify the file systems to use. Choose a file system with a minimum of 600 MB of free disk space (one OCR and one voting disk, with external redundancy).

If you are using the same file system for multiple file types, then add the disk space requirements for each type to determine the total disk space requirement.

Note the names of the mount point directories for the file systems that you identified.

If the user performing installation (typically, grid or oracle) has permissions to create directories on the storage location where you plan to install Oracle Clusterware files, then OUI creates the Oracle Clusterware file directory.

If the user performing installation does not have write access, then you must create these directories manually using commands similar to the following to create the recommended subdirectories in each of the mount point directories and set the appropriate owner, group, and permissions on the directory. For example, where the user is oracle, and the Oracle Clusterware file storage area is cluster:

# mkdir /mount_point/cluster
# chown oracle:oinstall /mount_point/cluster
# chmod 775 /mount_point/cluster

Note:

After installation, directories in the installation path for the Oracle Cluster Registry (OCR) files should be owned by root, and not writable by any account other than root.

When you have completed creating a subdirectory in the mount point directory, and set the appropriate owner, group, and permissions, you have completed NFS configuration for Oracle Grid Infrastructure.

6.3.9 Creating Directories for Oracle Database Files on Shared File Systems

Use the following instructions to create directories for shared file systems for Oracle Database and recovery files (for example, for an Oracle RAC database).

If necessary, configure the shared file systems and mount them on each node.

Note:

The mount point that you use for the file system must be identical on each node. Ensure that the file systems are configured to mount automatically when a node restarts.

Use the bdf command to determine the free disk space on each mounted file system.

From the display, identify the file systems:

File Type
File System Requirements

Database files
Choose either:

A single file system with at least 1.5 GB of free disk space.

Two or more file systems with at least 1.5 GB of free disk space in total.

Recovery files
Choose a file system with at least 2 GB of free disk space.

If you are using the same file system for multiple file types, then add the disk space requirements for each type to determine the total disk space requirement.

Note the names of the mount point directories for the file systems that you identified.

If the user performing installation (typically, oracle) has permissions to create directories on the disks where you plan to install Oracle Database, then DBCA creates the Oracle Database file directory, and the Recovery file directory.

If the user performing installation does not have write access, then you must create these directories manually using commands similar to the following to create the recommended subdirectories in each of the mount point directories and set the appropriate owner, group, and permissions on them:

Database file directory:

# mkdir /mount_point/oradata
# chown oracle:oinstall /mount_point/oradata
# chmod 775 /mount_point/oradata

Recovery file directory (Fast Recovery Area):

# mkdir /mount_point/fast_recovery_area
# chown oracle:oinstall /mount_point/fast_recovery_area
# chmod 775 /mount_point/fast_recovery_area

By making members of the oinstall group owners of these directories, this permits them to be read by multiple Oracle homes, including those with different OSDBA groups.

When you have completed creating subdirectories in each of the mount point directories, and set the appropriate owner, group, and permissions, you have completed NFS configuration for Oracle Database shared storage.

6.3.10 Disabling Direct NFS Client Oracle Disk Management Control of NFS

Complete the following steps to disable Direct NFS Client:

Log in as the Oracle Grid Infrastructure installation owner, and disable Direct NFS Client using the following commands, where Grid_home is the path to the Oracle Grid Infrastructure home:

$ cd Grid_home/rdbms/lib
$ make -f ins_rdbms.mk dnfs_off

Enter these commands on each node in the cluster, or on the shared Grid home if you are using a shared home for the Oracle Grid Infrastructure installation.

Remove the oranfstab file.

Note:

If you remove an NFS path that Oracle Database is using, then you must restart the database for the change to be effective.

6.4 Oracle Automatic Storage Management Storage Configuration

Review the following sections to configure storage for Oracle Automatic Storage Management (Oracle ASM):

Configuring Storage for Oracle Automatic Storage Management

Using Disk Groups with Oracle Database Files on Oracle ASM

6.4.1 Configuring Storage for Oracle Automatic Storage Management

This section describes how to configure storage for use with Oracle Automatic Storage Management (Oracle ASM).

Identifying Storage Requirements for Oracle ASM

Creating Files on a NAS Device for Use with Oracle ASM

Using an Existing Oracle ASM Disk Group

Configuring Disk Devices for Oracle ASM

6.4.1.1 Identifying Storage Requirements for Oracle ASM

To identify the storage requirements for using Oracle ASM, you must determine how many devices and the amount of free disk space that you require. To complete this task, follow these steps:

Determine whether you want to use Oracle ASM for Oracle Clusterware files (OCR and voting disks), Oracle Database files, recovery files, or all files except for Oracle Clusterware or Oracle Database binaries. Oracle Database files include data files, control files, redo log files, the server parameter file, and the password file.

Note:

You do not have to use the same storage mechanism for Oracle Clusterware, Oracle Database files and recovery files. You can use a shared file system for one file type and Oracle ASM for the other.

If you choose to enable automated backups and you do not have a shared file system available, then you must choose Oracle ASM for recovery file storage.

If you enable automated backups during the installation, then you can select Oracle ASM as the storage mechanism for recovery files by specifying an Oracle Automatic Storage Management disk group for the Fast Recovery Area. If you select a noninteractive installation mode, then by default it creates one disk group and stores the OCR and voting disk files there. If you want to have any other disk groups for use in a subsequent database install, then you can choose interactive mode, or run ASMCA (or a command line tool) to create the appropriate disk groups before starting the database install.

Choose the Oracle ASM redundancy level to use for the Oracle ASM disk group.

The redundancy level that you choose for the Oracle ASM disk group determines how Oracle ASM mirrors files in the disk group and determines the number of disks and amount of free disk space that you require, as follows:

External redundancy

An external redundancy disk group requires a minimum of one disk device. The effective disk space in an external redundancy disk group is the sum of the disk space in all of its devices.

For Oracle Clusterware files, External redundancy disk groups provide 1 voting disk file, and 1 OCR, with no copies. You must use an external technology to provide mirroring for high availability.

Because Oracle ASM does not mirror data in an external redundancy disk group, Oracle recommends that you use external redundancy with storage devices such as RAID, or other similar devices that provide their own data protection mechanisms.

Normal redundancy

In a normal redundancy disk group, to increase performance and reliability, Oracle ASM by default uses two-way mirroring. A normal redundancy disk group requires a minimum of two disk devices (or two failure groups). The effective disk space in a normal redundancy disk group is half the sum of the disk space in all of its devices.

For Oracle Clusterware files, Normal redundancy disk groups provide 3 voting disk files, 1 OCR and 2 copies (one primary and one secondary mirror). With normal redundancy, the cluster can survive the loss of one failure group.

For most installations, Oracle recommends that you select normal redundancy.

High redundancy

In a high redundancy disk group, Oracle ASM uses three-way mirroring to increase performance and provide the highest level of reliability. A high redundancy disk group requires a minimum of three disk devices (or three failure groups). The effective disk space in a high redundancy disk group is one-third the sum of the disk space in all of its devices.

For Oracle Clusterware files, High redundancy disk groups provide 5 voting disk files, 1 OCR and 3 copies (one primary and two secondary mirrors). With high redundancy, the cluster can survive the loss of two failure groups.

While high redundancy disk groups do provide a high level of data protection, you should consider the greater cost of additional storage devices before deciding to select high redundancy disk groups.

Determine the total amount of disk space that you require for Oracle Clusterware files, and for the database files and recovery files.

Use Table 6-4 and Table 6-5 to determine the minimum number of disks and the minimum disk space requirements for installing Oracle Clusterware files, and installing the starter database, where you have voting disks in a separate disk group:

Table 6-4 Total Oracle Clusterware Storage Space Required by Redundancy Type

Redundancy Level
Minimum Number of Disks
Oracle Cluster Registry (OCR) Files
Voting Disk Files
Both File Types

External

1

300 MB

300 MB

600 MB

Normal

3

600 MB

900 MB

1.5 GBFoot 1 

High

5

840 MB

1.4 GB

4 GB

Footnote 1 If you create a disk group during installation, then it must be at least 2 GB.

Note:

If the voting disk files are in a disk group, be aware that disk groups with Oracle Clusterware files (OCR and voting disk files) have a higher minimum number of failure groups than other disk groups.

If you create a disk group as part of the installation in order to install the OCR and voting disk files, then the installer requires that you create these files on a disk group with at least 2 GB of available space.

A quorum failure group is a special type of failure group and disks in these failure groups do not contain user data. A quorum failure group is not considered when determining redundancy requirements in respect to storing user data. However, a quorum failure group counts when mounting a disk group.

Table 6-5 Total Oracle Database Storage Space Required by Redundancy Type

Redundancy Level
Minimum Number of Disks
Database Files
Recovery Files
Both File Types

External

1

1.5 GB

3 GB

4.5 GB

Normal

2

3 GB

6 GB

9 GB

High

3

4.5 GB

9 GB

13.5 GB

For Oracle Clusterware installations, you must also add additional disk space for the Oracle ASM metadata. You can use the following formula to calculate the additional disk space requirements (in MB) for OCR and voting disk files, and the Oracle ASM metadata:

total = [2 * ausize * disks] + [redundancy * (ausize * (nodes * (clients + 1) + 30) + (64 * nodes) + 533)]

Where:

redundancy = Number of mirrors: external = 1, normal = 2, high = 3.

ausize = Metadata AU size in megabytes.

nodes = Number of nodes in cluster.

clients - Number of database instances for each node.

disks - Number of disks in disk group.

For example, for a four-node Oracle RAC installation, using three disks in a normal redundancy disk group, you require an additional X MB of space:

[2 * 1 * 3] + [2 * (1 * (4 * (4 + 1)+ 30)+ (64 * 4)+ 533)] = 1684 MB

To ensure high availability of Oracle Clusterware files on Oracle ASM, you must have at least 2 GB of disk space for Oracle Clusterware files in three separate failure groups, with at least three physical disks. Each disk must have at least 1 GB of capacity to ensure that there is sufficient space to create Oracle Clusterware files.

Optionally, identify failure groups for the Oracle ASM disk group devices.

If you intend to use a normal or high redundancy disk group, then you can further protect your database against hardware failure by associating a set of disk devices in a custom failure group. By default, each device comprises its own failure group. However, if two disk devices in a normal redundancy disk group are attached to the same SCSI controller, then the disk group becomes unavailable if the controller fails. The controller in this example is a single point of failure.

To protect against failures of this type, you could use two SCSI controllers, each with two disks, and define a failure group for the disks attached to each controller. This configuration would enable the disk group to tolerate the failure of one SCSI controller.

Note:

Define custom failure groups after installation, using the GUI tool ASMCA, the command line tool asmcmd, or SQL commands.

If you define custom failure groups, then for failure groups containing database files only, you must specify a minimum of two failure groups for normal redundancy disk groups and three failure groups for high redundancy disk groups.

For failure groups containing database files and clusterware files, including voting disks, you must specify a minimum of three failure groups for normal redundancy disk groups, and five failure groups for high redundancy disk groups.

Disk groups containing voting files must have at least 3 failure groups for normal redundancy or at least 5 failure groups for high redundancy. Otherwise, the minimum is 2 and 3 respectively. The minimum number of failure groups applies whether or not they are custom failure groups.

If you are sure that a suitable disk group does not exist on the system, then install or identify appropriate disk devices to add to a new disk group. Use the following guidelines when identifying appropriate disk devices:

All of the devices in an Oracle ASM disk group should be the same size and have the same performance characteristics.

Do not specify multiple partitions on a single physical disk as a disk group device. Oracle ASM expects each disk group device to be on a separate physical disk.

Although you can specify a logical volume as a device in an Oracle ASM disk group, Oracle does not recommend their use because it adds a layer of complexity that is unnecessary with Oracle ASM. In addition, Oracle RAC requires a cluster logical volume manager in case you decide to use a logical volume with Oracle ASM and Oracle RAC.

Oracle recommends that if you choose to use a logical volume manager, then use the logical volume manager to represent a single LUN without striping or mirroring, so that you can minimize the impact of the additional storage layer.

6.4.1.2 Creating Files on a NAS Device for Use with Oracle ASM

If you have a certified NAS storage device, then you can create zero-padded files in an NFS mounted directory and use those files as disk devices in an Oracle ASM disk group.

To create these files, follow these steps:

If necessary, create an exported directory for the disk group files on the NAS device.

Refer to the NAS device documentation for more information about completing this step.

Switch user to root.

Create a mount point directory on the local system.

To ensure that the NFS file system is mounted when the system restarts, add an entry for the file system in the mount file /etc/fstab.

See Also:

My Oracle Support note 359515.1 for updated NAS mount option information, available at the following URL:

https://support.oracle.com

For more information about editing the mount file for the operating system, refer to the man pages. For more information about recommended mount options, refer to the section Section 6.3.3, "Checking NFS Mount and Buffer Size Parameters for Oracle RAC."

Mount the NFS file system on the local system

Choose a name for the disk group to create. For example: sales1.

Create a directory for the files on the NFS file system, using the disk group name as the directory name.

Use commands similar to the following to create the required number of zero-padded files in this directory:

# dd if=/dev/zero of=/mnt/nfsdg/disk1 bs=1024k count=1000

This example creates 1 GB files on the NFS file system. You must create one, two, or three files respectively to create an external, normal, or high redundancy disk group.

Enter commands similar to the following to change the owner, group, and permissions on the directory and files that you created, where the installation owner is grid, and the OSASM group is asmadmin:

# chown -R grid:asmadmin /mnt/nfsdg
# chmod -R 660 /mnt/nfsdg

If you plan to install Oracle RAC or a standalone Oracle Database, then during installation, edit the Oracle ASM disk discovery string to specify a regular expression that matches the file names you created. For example:

/mnt/nfsdg/sales1/

6.4.1.3 Using an Existing Oracle ASM Disk Group

Select from the following choices to store either database or recovery files in an existing Oracle ASM disk group, depending on installation method:

If you select an installation method that runs Database Configuration Assistant in interactive mode, then you can decide whether you want to create a disk group, or to use an existing one.

The same choice is available to you if you use Database Configuration Assistant after the installation to create a database.

If you select an installation method that runs Database Configuration Assistant in noninteractive mode, then you must choose an existing disk group for the new database; you cannot create a disk group. However, you can add disk devices to an existing disk group if it has insufficient free space for your requirements.

Note:

The Oracle ASM instance that manages the existing disk group can be running in a different Oracle home directory.

To determine if an existing Oracle ASM disk group exists, or to determine if there is sufficient disk space in a disk group, you can use Oracle Enterprise Manager Cloud Control or the Oracle ASM command line tool (asmcmd) as follows:

Connect to the Oracle ASM instance and start the instance if necessary:

$ $ORACLE_HOME/bin/asmcmd
ASMCMD> startup

Enter one of the following commands to view the existing disk groups, their redundancy level, and the amount of free disk space in each one:

ASMCMD> lsdb

or:

$ORACLE_HOME/bin/asmcmd -p lsdg

From the output, identify a disk group with the appropriate redundancy level and note the free space that it contains.

If necessary, install or identify the additional disk devices required to meet the storage requirements listed in the previous section.

Note:

If you are adding devices to an existing disk group, then Oracle recommends that you use devices that have the same size and performance characteristics as the existing devices in that disk group.

6.4.1.4 Configuring Disk Devices for Oracle ASM

To configure disks for use with Oracle ASM on HP-UX, follow these steps:

If necessary, install the shared disks that you intend to use for the Oracle ASM disk group.

To make sure that the disks are available, enter the following command on every node:

# /usr/sbin/ioscan -fun -C disk

The output from this command is similar to the following:

Class  I  H/W Path    Driver S/W State   H/W Type     Description
==========================================================================
disk    0  0/0/1/0.6.0 sdisk  CLAIMED     DEVICE       HP   DVD-ROM 6x/32x
                       /dev/rdsk/c0t6d0   /dev/rdsk/c0t6d0
disk    1  0/0/1/1.2.0 sdisk  CLAIMED     DEVICE      SEAGATE ST39103LC
                       /dev/rdsk/c1t2d0   /dev/rdsk/c1t2d0

This command displays information about each disk attached to the system, including character raw device names (/dev/rdsk/).

Note:

On HP-UX 11i v.3, you can also use agile view to review mass storage devices, including character raw devices (/dev/rdisk/diskxyz). For example:

#>ioscan -funN -C disk
Class     I  H/W Path  Driver S/W State   H/W Type     Description
===================================================================
disk      4  64000/0xfa00/0x1   esdisk   CLAIMED     DEVICE       HP 73.4GST373454LC
                 /dev/disk/disk4   /dev/rdisk/disk4
disk    907  64000/0xfa00/0x2f  esdisk   CLAIMED     DEVICE       COMPAQ  MSA1000 VOLUME
                 /dev/disk/disk907   /dev/rdisk/disk907

If the ioscan command does not display device name information for a device, enter the following command to install the special device files for any new devices:

# /usr/sbin/insf -e

For each disk to add to a disk group, enter the following command on any node to verify that it is not already part of an LVM volume group:

# /sbin/pvdisplay /dev/dsk/cxtydz

If this command displays volume group information, the disk is already part of a volume group. The disks that you choose must not be part of an LVM volume group.

Note:

If you are using different volume management software, for example VERITAS Volume Manager, refer to the appropriate documentation for information about verifying that a disk is not in use.

Enter commands similar to the following on every node to change the owner, group, and permissions on the character raw device file for each disk to add to a disk group, so that the owner is the Oracle Grid Infrastructure owner (in this example, grid), and the group that has access is the OSASM group (in this example, asmadmin):

# chown grid:asmadmin /dev/rdsk/cxtydz
# chmod 660 /dev/rdsk/cxtydz

Note:

If you are using a multi-pathing disk driver with ASM, make sure that you set the permissions only on the correct logical device name for the disk.

If the nodes are configured differently, the device name for a particular device might be different on some nodes. Make sure that you specify the correct device names on each node.

6.4.2 Using Disk Groups with Oracle Database Files on Oracle ASM

Review the following sections to configure Oracle ASM storage for Oracle Clusterware and Oracle Database Files:

Identifying and Using Existing Oracle Database Disk Groups on ASM

Creating Disk Groups for Oracle Database Data Files

6.4.2.1 Identifying and Using Existing Oracle Database Disk Groups on ASM

The following section describes how to identify existing disk groups and determine the free disk space that they contain.

Optionally, identify failure groups for the Oracle ASM disk group devices.

If you intend to use a normal or high redundancy disk group, then you can further protect your database against hardware failure by associating a set of disk devices in a custom failure group. By default, each device comprises its own failure group. However, if two disk devices in a normal redundancy disk group are attached to the same SCSI controller, then the disk group becomes unavailable if the controller fails. The controller in this example is a single point of failure.

To protect against failures of this type, you could use two SCSI controllers, each with two disks, and define a failure group for the disks attached to each controller. This configuration would enable the disk group to tolerate the failure of one SCSI controller.

Note:

If you define custom failure groups, then you must specify a minimum of two failure groups for normal redundancy and three failure groups for high redundancy.

6.4.2.2 Creating Disk Groups for Oracle Database Data Files

If you are sure that a suitable disk group does not exist on the system, then install or identify appropriate disk devices to add to a new disk group. Use the following guidelines when identifying appropriate disk devices:

All of the devices in an Oracle ASM disk group should be the same size and have the same performance characteristics.

Do not specify multiple partitions on a single physical disk as a disk group device. Oracle ASM expects each disk group device to be on a separate physical disk.

6.4.2.3 Creating and Using Oracle ASM Credentials File

An Oracle ASM Storage Client does not have Oracle ASM running on the nodes and uses Oracle ASM storage services in a different client cluster.

To create Oracle ASM credentials file, from the Grid_home/bin directory on the Storage Server, run the following command on one of the member nodes, where credential_file is the name and path location of the Oracle ASM credentials file you create:

Grid_home/bin/asmcmd mkcc client_cluster_name credential_file

For example:

Grid_home/bin/asmcmd mkcc clientcluster1 /home/grid/clientcluster1_credentials.xml

Copy the Oracle ASM credentials file to a secure path on the client cluster node where you run the client cluster installation. The Oracle Installation user must have permissions to access that file. Oracle recommends that no other user is granted permissions to access the Oracle ASM credentials file. During installation, you are prompted to provide a path to the file.

Note:

The Oracle ASM credentials file can be used only once. If an Oracle ASM client is configured and deconfigured, you must create a new Oracle ASM credentials file.

If the Oracle ASM credentials file is used to configure the client cluster, then it cannot be shared or reused to configure another client cluster.

See Also:

Oracle Automatic Storage Management Administrator's Guide for ASMCMD client cluster management commands

6.4.3 Upgrading Existing Oracle ASM Instances

If you have an Oracle ASM installation from a prior release installed on your server, or in an existing Oracle Clusterware installation, then you can use Oracle Automatic Storage Management Configuration Assistant (ASMCA, located in the path Grid_home/bin) to upgrade the existing Oracle ASM instance to 12c Release 1 (12.1), and subsequently configure failure groups, and Oracle ASM volumes.

Note:

You must first shut down all database instances and applications on the node with the existing Oracle ASM instance before upgrading it.

During installation, if you are upgrading from an Oracle ASM release before 11.2, and you chose to use Oracle ASM and ASMCA detects that there is a prior Oracle ASM version installed in another Oracle ASM home, then after installing the Oracle ASM 12c Release 1 (12.1) binaries, you can start ASMCA to upgrade the existing Oracle ASM instance.

If you are upgrading from Oracle ASM 11g Release 2 (11.2.0.1) or later, then Oracle ASM is always upgraded with Oracle Grid Infrastructure as part of the rolling upgrade, and ASMCA is started by the root scripts during upgrade. ASMCA cannot perform a separate upgrade of Oracle ASM from a prior release to the current release.

On an existing Oracle Clusterware or Oracle RAC installation, if the prior version of Oracle ASM instances on all nodes is 11g Release 1 or later, then you are provided with the option to perform a rolling upgrade of Oracle ASM instances. If the earlier version of Oracle ASM instances on an Oracle RAC installation are from a release before 11g Release 1, then rolling upgrades cannot be performed. In that case, Oracle ASM on all nodes are upgraded to 12c Release 1 (12.1).

7 Installing Oracle Grid Infrastructure for a Cluster

This chapter describes the procedures for installing Oracle Grid Infrastructure for a cluster. Oracle Grid Infrastructure consists of Oracle Clusterware and Oracle Automatic Storage Management (Oracle ASM). If you plan afterward to install Oracle Database with Oracle Real Application Clusters (Oracle RAC), then this is phase one of a two-phase installation.

This chapter contains the following topics:

Installing Grid Infrastructure

Installing Grid Infrastructure Using a Software-Only Installation

Confirming Oracle Clusterware Function

Confirming Oracle ASM Function for Oracle Clusterware Files

Understanding Offline Processes in Oracle Grid Infrastructure

7.1 Installing Grid Infrastructure

This section provides you with information about how to use the installer to install Oracle Grid Infrastructure. It contains the following sections:

Running OUI to Install Grid Infrastructure

Installing Grid Infrastructure Using a Cluster Configuration File

7.1.1 Running OUI to Install Grid Infrastructure

Complete the following steps to install Oracle Grid Infrastructure (Oracle Clusterware and Oracle Automatic Storage Management) on your cluster. At any time during installation, if you have a question about what you are being asked to do, click the Help button on the OUI page.

On the installation media, or where you have downloaded the installation binaries, run the runInstaller command. For example:

$ cd /home/grid/oracle_sw/
$ ./runInstaller

Select one of the following installation options:

Install and Configure Oracle Grid Infrastructure for a Cluster

Select this option to install either a standard cluster, or to install an Oracle Flex Cluster with Hub and Leaf Nodes.

Install and Configure Oracle Grid Infrastructure for a Standalone Server

Select this option to install Oracle Grid Infrastructure in an Oracle Restart configuration. Use this option for single servers supporting Oracle Database and other applications.

See Also:

Oracle Database Installation Guide for your platform for information about standalone server installations, as that installation option is not discussed in this document

Upgrade Oracle Grid Infrastructure or Oracle Automatic Storage Management

Select this option to upgrade Oracle Grid Infrastructure (Oracle Clusterware and Oracle Grid Infrastructure), or to upgrade Oracle ASM.

Note:

Oracle Clusterware must always be the later release, so you cannot upgrade Oracle ASM to a release that is more recent than Oracle Clusterware.

Install Oracle Grid Infrastructure Software Only

Select this option to install Oracle Grid Infrastructure in a Grid home, without configuring the software.

Installation screens vary depending on the installation option you select. Respond to the configuration prompts as needed to configure your cluster.

Note:

Click Help if you have any questions about the information you are asked to submit during installation.

For cluster member node public and VIP network addresses, provide the information required depending on the kind of cluster you are configuring:

If you plan to use automatic cluster configuration with DHCP addresses configured and resolved through GNS, then you only need to provide the GNS VIP names as configured on your DNS.

If you plan to use manual cluster configuration, with fixed IP addresses configured and resolved on your DNS, then be prepared to provide the SCAN names for the cluster, the public names, and VIP names for each cluster member node, and optionally a GNS VIP for the cluster.

The following is a list of additional information about node IP addresses:

For the local node only, OUI automatically fills in public and VIP fields. If your system uses vendor clusterware, then OUI may fill additional fields.

Host names and virtual host names are not domain-qualified. If you provide a domain in the address field during installation, then OUI removes the domain from the address.

Interfaces identified as private for private IP addresses should not be accessible as public interfaces. Using public interfaces for Cache Fusion cancause performance problems.

You can choose to configure the Hub and Leaf Node types manually, or you can choose to set a target size for the number of Hub Nodes in your cluster, and allow Oracle Grid Infrastructure to maintain the number of Hub Nodes required for your cluster automatically.

When you enter the public node name, use the primary host name of each node. In other words, use the name displayed by the hostname command.

Provide information to automate root scripts, or run scripts as root when prompted by OUI. Click Details to see the log file. If root.sh fails on any of the nodes, then you can fix the problem and follow the steps in Section 9.5, "Unconfiguring Oracle Clusterware Without Removing Binaries," rerun root.sh on that node, and continue.

If you configure automation for running root scripts, and a root script fails, then you can fix the problem manually, and click Retry to run the root script again on nodes that failed to run the script.

Note:

You must run the root.sh script on the first node and wait for it to finish. If your cluster has three or more nodes, then root.sh can be run concurrently on all nodes but the first. Node numbers are assigned according to the order of running root.sh. If a particular node number assignment is desired, you should run the root scripts in that order, waiting for the script to finish running on each node.

After root.sh runs on all the nodes, OUI runs Net Configuration Assistant (netca) and Cluster Verification Utility. These programs run without user intervention.

Oracle Automatic Storage Management Configuration Assistant (asmca) configures Oracle ASM during the installation.

When you run root.sh during Oracle Grid Infrastructure installation, the Trace File Analyzer (TFA) Collector is also installed in the directory grid_home/tfa.

See Also:

Oracle Clusterware Administration and Deployment Guide for information about using Trace File Analyzer Collector

When you have verified that your Oracle Grid Infrastructure installation is completed successfully, you can either use it to maintain high availability for other applications, or you can install an Oracle database.

The following is a list of additional information to note about installation:

If you intend to install Oracle Database 12c Release 1 (12.1) with Oracle RAC, then see Oracle Real Application Clusters Installation Guide for Linux and UNIX.

See Also:

Oracle Clusterware Administration and Deployment Guide for cloning Oracle Grid Infrastructure, and Oracle Real Application Clusters Administration and Deployment Guide for information about using cloning and node addition procedures for adding Oracle RAC nodes

7.1.2 Installing Grid Infrastructure Using a Cluster Configuration File

During installation of Oracle Grid Infrastructure, you are given the option either of providing cluster configuration information manually, or of using a cluster configuration file. A cluster configuration file is a text file that you can create before starting OUI, which provides OUI with cluster node addresses that it requires to configure the cluster.

Oracle recommends that you consider using a cluster configuration file if you intend to perform repeated installations on a test cluster, or if you intend to perform an installation on many nodes.

To create a cluster configuration file manually, start a text editor, and create a file that provides the name of the public and virtual IP addresses for each cluster member node, in the following format:

node1 node1-vip
node2 node2-vip
.
.
.

For example:

mynode1 mynode1-vip
mynode2 mynode2-vip

7.2 Installing Grid Infrastructure Using a Software-Only Installation

This section contains the following tasks:

Installing the Software Binaries

Configuring the Software Binaries

Configuring the Software Binaries Using a Response File

Note:

Oracle recommends that only advanced users should perform the software-only installation, as this installation option requires manual postinstallation steps to enable the Oracle Grid Infrastructure software.

A software-only installation consists of installing Oracle Grid Infrastructure for a cluster on one node.

If you use the Install Grid Infrastructure Software Only option during installation, then this installs the software binaries on the local node. To complete the installation for your cluster, you must perform the additional steps of configuring Oracle Clusterware and Oracle ASM, creating a clone of the local installation, deploying this clone on other nodes, and then adding the other nodes to the cluster.

See Also:

Oracle Clusterware Administration and Deployment Guide for information about how to clone an Oracle Grid Infrastructure installation to other nodes, and then adding them to the cluster

7.2.1 Installing the Software Binaries

To perform a software-only installation:

Run the runInstaller command from the relevant directory on the Oracle Database 12c Release 1 (12.1) installation media or download directory. For example:

$ cd /home/grid/oracle_sw
$ ./runInstaller

Complete a software-only installation of Oracle Grid Infrastructure on the first node.

When the software has been installed, run the orainstRoot.sh script when prompted.

The root.sh script output provides information about how to proceed, depending on the configuration you plan to complete in this installation. Make note of this information.

However, ignore the instruction to run the roothas.pl script, unless you intend to install Oracle Grid Infrastructure on a standalone server (Oracle Restart).

Verify that all of the cluster nodes meet the installation requirements using the command runcluvfy.sh stage -pre crsinst -n node_list. Ensure that you have completed all storage and server preinstallation requirements.

Use Oracle Universal Installer as described in steps 1 through 4 to install the Oracle Grid Infrastructure software on every remaining node that you want to include in the cluster, and complete a software-only installation of Oracle Grid Infrastructure on every node.

Configure the cluster using the full OUI configuration wizard GUI as described in Section 7.2.2, "Configuring the Software Binaries," or configure the cluster using a response file as described in section Section 7.2.3, "Configuring the Software Binaries Using a Response File."

7.2.2 Configuring the Software Binaries

Configure the software binaries by starting Oracle Grid Infrastructure configuration wizard in GUI mode:

Log in to a terminal as the Grid infrastructure installation owner, and change directory to grid_home/crs/config.

Enter the following command:

$ ./config.sh

The configuration script starts OUI in Configuration Wizard mode. Provide information as needed for configuration. Each page shows the same user interface and performs the same validation checks that OUI normally does. However, instead of running an installation, the configuration wizard mode validates inputs and configures the installation on all cluster nodes.

When you complete inputs, OUI shows you the Summary page, listing all inputs you have provided for the cluster. Verify that the summary has the correct information for your cluster, and click Install to start configuration of the local node.

When configuration of the local node is complete, OUI copies the Oracle Grid Infrastructure configuration file to other cluster member nodes.

When prompted, run root scripts.

When you confirm that all root scripts are run, OUI checks the cluster configuration status, and starts other configuration tools as needed.

7.2.3 Configuring the Software Binaries Using a Response File

When you install or copy Oracle Grid Infrastructure software on any node, you can defer configuration for a later time. This section provides the procedure for completing configuration after the software is installed or copied on nodes, using the configuration wizard utility (config.sh).

See Also:

Oracle Clusterware Administration and Deployment Guide for more information about the configuration wizard.

To configure the Oracle Grid Infrastructure software binaries using a response file:

As the Oracle Grid Infrastructure installation owner (grid) start OUI in Oracle Grid Infrastructure configuration wizard mode from the Oracle Grid Infrastructure software-only home using the following syntax, where Grid_home is the Oracle Grid Infrastructure home, and filename is the response file name:

Grid_home/crs/config/config.sh [-debug] [-silent -responseFile filename]

For example:

$ cd /u01/app/12.1.0/grid/crs/config/
$ ./config.sh -responseFile /u01/app/grid/response/response_file.rsp

The configuration script starts OUI in Configuration Wizard mode. Each page shows the same user interface and performs the same validation checks that OUI normally does. However, instead of running an installation, The configuration wizard mode validates inputs and configures the installation on all cluster nodes.

When you complete inputs, OUI shows you the Summary page, listing all inputs you have provided for the cluster. Verify that the summary has the correct information for your cluster, and click Install to start configuration of the local node.

When configuration of the local node is complete, OUI copies the Oracle Grid Infrastructure configuration file to other cluster member nodes.

When prompted, run root scripts.

When you confirm that all root scripts are run, OUI checks the cluster configuration status, and starts other configuration tools as needed.

7.2.4 Setting Ping Targets for Network Checks

For environments where the network link status is not correctly returned when the network cable is disconnected, for example, in a virtual machine, you can receive notification about network status by setting the Ping_Targets parameter during the Oracle Grid Infrastructure installation, using the installer as follows:

./runInstaller oracle_install_crs_Ping_Targets=Host1/IP1,Host2/IP2

The ping utility contacts the comma-separated list of host names or IP addresses Host1/IP1,Host2/IP2 to determine whether the public network is available. If none of them respond, then the network is considered to be offline. Addresses outside the cluster, like of a switch or router, should be used.

For example:

./runInstaller oracle_install_crs_Ping_Targets=192.0.2.1,192.0.2.2

7.3 Confirming Oracle Clusterware Function

After installation, log in as root, and use the following command syntax on each node to confirm that your Oracle Clusterware installation is installed and running correctly:

crsctl check cluster

For example:

$ crsctl check cluster

CRS-4537 Cluster Ready Services is onlineCRS-4529 Cluster Synchronization Services is onlineCRS-4533 Event Manager is online

Caution:

After installation is complete, do not remove manually or run cron jobs that remove /tmp/.oracle or /var/tmp/.oracle or its files while Oracle Clusterware is up. If you remove these files, then Oracle Clusterware could encounter intermittent hangs, and you will encounter error CRS-0184: Cannot communicate with the CRS daemon.

7.4 Confirming Oracle ASM Function for Oracle Clusterware Files

If you installed the OCR and voting disk files on Oracle ASM, then use the following command syntax as the Oracle Grid Infrastructure installation owner to confirm that your Oracle ASM installation is running:

srvctl status asm

For example:

$ srvctl status asm
ASM is running on node1,node2

Oracle ASM is running only if it is needed for Oracle Clusterware files. If you have not installed OCR and voting disks files on Oracle ASM, then the Oracle ASM instance should be down.

Note:

To manage Oracle ASM or Oracle Net 11g Release 2 (11.2) or later installations, use the srvctl binary in the Oracle Grid Infrastructure home for a cluster (Grid home). If you have Oracle Real Application Clusters or Oracle Database installed, then you cannot use the srvctl binary in the database home to manage Oracle ASM or Oracle Net.

7.5 Understanding Offline Processes in Oracle Grid Infrastructure

Oracle Grid Infrastructure provides required resources for various Oracle products and components. Some of those products and components are optional, so you can install and enable them after installing Oracle Grid Infrastructure. To simplify postinstall additions, Oracle Grid Infrastructure preconfigures and registers all required resources for all products available for these products and components, but only activates them when you choose to add them. As a result, some components may be listed as OFFLINE after the installation of Oracle Grid Infrastructure.

Resources listed as TARGET:OFFLINE and STATE:OFFLINE do not need to be monitored. They represent components that are registered, but not enabled, so they do not use any system resources. If an Oracle product or component is installed on the system, and it requires a particular resource to be online, then the software will prompt you to activate the required offline resource.

8 Oracle Grid Infrastructure Postinstallation Procedures

This chapter describes how to complete the postinstallation tasks after you have installed the Oracle Grid Infrastructure software.

This chapter contains the following topics:

Required Postinstallation Tasks

Recommended Postinstallation Tasks

Using Earlier Oracle Database Releases with Oracle Grid Infrastructure

Modifying Oracle Clusterware Binaries After Installation

8.1 Required Postinstallation Tasks

Download and install patch updates. Refer to the My Oracle Support web site for required patch updates for your installation.

Note:

Browsers require an Adobe Flash plug-in, version 9.0.115 or higher to use My Oracle Support. Check your browser for the correct version of Flash plug-in by going to the Adobe Flash checker page, and installing the latest version of Adobe Flash.

If you do not have Flash installed, then download the latest version of the Flash Player from the Adobe web site:

http://www.adobe.com/go/getflashplayer

To download required patch updates:

Use a Web browser to view the My Oracle Support website:

https://support.oracle.com

Log in to My Oracle Support website.

Note:

If you are not a My Oracle Support registered user, then click Register for My Oracle Support and register.

On the main My Oracle Support page, click Patches & Updates.

On the Patches & Update page, click Advanced Search.

On the Advanced Search page, click the search icon next to the Product or Product Family field.

In the Search and Select: Product Family field, select Database and Tools in the Search list field, enter RDBMS Server in the text field, and click Go.

RDBMS Server appears in the Product or Product Family field. The current release appears in the Release field.

Select your platform from the list in the Platform field, and at the bottom of the selection list, click Go.

Any available patch updates appear under the Results heading.

Click the patch number to download the patch.

On the Patch Set page, click View README and read the page that appears. The README page contains information about the patch set and how to apply the patches to your installation.

Return to the Patch Set page, click Download, and save the file on your system.

Use the unzip utility provided with Oracle Database 12c Release 1 (12.1) to uncompress the Oracle patch updates that you downloaded from My Oracle Support. The unzip utility is located in the $ORACLE_HOME/bin directory.

See Appendix B, "How to Upgrade to Oracle Grid Infrastructure 12c Release 1" for information about how to stop database processes in preparation for installing patches.

8.2 Recommended Postinstallation Tasks

Oracle recommends that you complete the following tasks as needed after installing Oracle Grid Infrastructure:

Configuring IPMI-based Failure Isolation Using Crsctl

Tuning Semaphore Parameters

Create a Fast Recovery Area Disk Group

Checking the SCAN Configuration

Running Oracle RAC Configuration Audit Tool

Setting Resource Limits for Oracle Clusterware and Associated Databases and Applications

8.2.1 Configuring IPMI-based Failure Isolation Using Crsctl

On HP-UX platforms, where Oracle does not currently support the native IPMI driver, DHCP addressing is not supported and manual configuration is required for IPMI support. OUI will not collect the administrator credentials, the BMC must be configured with a static IP address, and the address must be manually stored in the OLR.

To configure Failure Isolation using IPMI, complete the following steps on each cluster member node:

If necessary, start Oracle Clusterware using the following command:

$ crsctl start crs

Use the BMC management utility to obtain the BMC's IP address and then use the cluster control utility crsctl to store the BMC's IP address in the Oracle Local Registry (OLR) by issuing the crsctl set css ipmiaddr address command. For example:

$ crsctl set css ipmiaddr 192.168.10.45

Enter the following crsctl command to store the user ID and password for the resident BMC in the OLR, where the noname user is the IPMI administrator user account, and provide the password when prompted:

$ crsctl set css ipmiadmin ""
IPMI BMC Password:

This command attempts to validate the credentials you enter by sending them to another cluster node. The command fails if that cluster node is unable to access the local BMC using the credentials.

When you store the IPMI credentials in the OLR, you must have the anonymous user specified explicitly, or a parsing error will be reported.

8.2.2 Tuning Semaphore Parameters

Refer to the following guidelines only if the default semaphore parameter values are too low to accommodate all Oracle processes:

Note:

Oracle recommends that you refer to the operating system documentation for more information about setting semaphore parameters.

Calculate the minimum total semaphore requirements using the following formula:

2 * sum (process parameters of all database instances on the system) + overhead for background processes + system and other application requirements

Set semmns (total semaphores systemwide) to this total.

Set semmsl (semaphores for each set) to 250.

Set semmni (total semaphores sets) to semmns divided by semmsl, rounded up to the nearest multiple of 1024.

8.2.3 Create a Fast Recovery Area Disk Group

During installation, by default you can create one disk group. If you plan to add an Oracle Database for a standalone server or an Oracle RAC database, then you should create the Fast Recovery Area for database files.

8.2.3.1 About the Fast Recovery Area and the Fast Recovery Area Disk Group

The Fast Recovery Area is a unified storage location for all Oracle Database files related to recovery. Database administrators can define the DB_RECOVERY_FILE_DEST parameter to the path for the Fast Recovery Area to enable on-disk backups, and rapid recovery of data. Enabling rapid backups for recent data can reduce requests to system administrators to retrieve backup tapes for recovery operations.

When you enable Fast Recovery in the init.ora file, all RMAN backups, archive logs, control file automatic backups, and database copies are written to the Fast Recovery Area. RMAN automatically manages files in the Fast Recovery Area by deleting obsolete backups and archive files no longer required for recovery.

Oracle recommends that you create a Fast Recovery Area disk group. Oracle Clusterware files and Oracle Database files can be placed on the same disk group, and you can also place Fast Recovery files in the same disk group. However, Oracle recommends that you create a separate Fast Recovery disk group to reduce storage device contention.

The Fast Recovery Area is enabled by setting DB_RECOVERY_FILE_DEST. The size of the Fast Recovery Area is set with DB _RECOVERY_FILE_DEST_SIZE. As a general rule, the larger the Fast Recovery Area, the more useful it becomes. For ease of use, Oracle recommends that you create a Fast Recovery Area disk group on storage devices that can contain at least three days of recovery information. Ideally, the Fast Recovery Area should be large enough to hold a copy of all of your data files and control files, the online redo logs, and the archived redo log files needed to recover your database using the data file backups kept under your retention policy.

Multiple databases can use the same Fast Recovery Area. For example, assume you have created one Fast Recovery Area disk group on disks with 150 gigabyte (GB) of storage, shared by three different databases. You can set the size of the Fast Recovery Area for each database depending on the importance of each database. For example, if database1 is your least important database, database 2 is of greater importance and database 3 is of greatest importance, then you can set different DB_RECOVERY_FILE_DEST_SIZE settings for each database to meet your retention target for each database: 30 GB for database 1, 50 GB for database 2, and 70 GB for database 3.

See Also:

Oracle Database Storage Administrator's Guide

8.2.3.2 Creating the Fast Recovery Area Disk Group

To create a Fast Recovery file disk group:

Navigate to the Grid home bin directory, and start Oracle ASM Configuration Assistant (asmca). For example:

$ cd /u01/app/12.1.0/grid/bin
$ ./asmca

ASMCA opens at the Disk Groups tab. Click Create to create a new disk group

The Create Disk Groups window opens.

In the Disk Group Name field, enter a descriptive name for the Fast Recovery Area group. For example: FRA.

In the Redundancy section, select the level of redundancy you want to use.

In the Select Member Disks field, select eligible disks to be added to the Fast Recovery Area, and click OK.

The Diskgroup Creation window opens to inform you when disk group creation is complete. Click OK.

Click Exit.

8.2.4 Checking the SCAN Configuration

The Single Client Access Name (SCAN) is a name that is used to provide service access for clients to the cluster. Because the SCAN is associated with the cluster as a whole, rather than to a particular node, the SCAN makes it possible to add or remove nodes from the cluster without needing to reconfigure clients. It also adds location independence for the databases, so that client configuration does not have to depend on which nodes are running a particular database instance. Clients can continue to access the cluster in the same way as with previous releases, but Oracle recommends that clients accessing the cluster use the SCAN.

You can use the command cluvfy comp scan (located in Grid home/bin) to confirm that the DNS is correctly associating the SCAN with the addresses. For example:

$ cluvfy comp scan

Verifying scan

Checking Single Client Access Name (SCAN)...

Checking TCP connectivity to SCAN Listeners...
TCP connectivity to SCAN Listeners exists on all cluster nodes

Checking name resolution setup for ”node1.example.com”...

Verification of SCAN VIP and Listener setup passed

Verification of scan was successful.

After installation, when a client sends a request to the cluster, the Oracle Clusterware SCAN listeners redirect client requests to servers in the cluster.

See Also:

Oracle Clusterware Administration and Deployment Guide for more information about system checks and configurations

8.2.5 Running Oracle RAC Configuration Audit Tool

Oracle recommends that you run the Oracle RAC configuration audit tool (ORAchk) to check your Oracle RAC installation. ORAchk is an Oracle RAC auditing tool that checks various important configuration settings within Oracle Real Application Clusters, Oracle Clusterware, Oracle Automatic Storage Management and the Oracle Grid Infrastructure environment.

For information about configuring and running ORAchk utility, refer to My Oracle Support note 1268927.1, which is available at the following URL:

https://support.oracle.com/CSP/main/article?cmd=show&type=NOT&id=1268927.1

8.2.6 Setting Resource Limits for Oracle Clusterware and Associated Databases and Applications

After you have completed Oracle Grid Infrastructure installation, you can set resource limits in the Grid_home/crs/install/s_crsconfig_nodename_env.txt file. These resource limits apply to all Oracle Clusterware processes and Oracle databases managed by Oracle Clusterware. For example, to set a higher number of processes limit, edit the file and set CRS_LIMIT_NPROC parameter to a high value.

8.3 Using Earlier Oracle Database Releases with Oracle Grid Infrastructure

Review the following sections for information about using earlier Oracle Database releases with Oracle Grid Infrastructure 12c Release 1 (12.1) installations:

General Restrictions for Using Earlier Oracle Database Versions

Managing Server Pools with Earlier Database Versions

Using ASMCA to Administer Disk Groups for Earlier Database Versions

Pinning Cluster Nodes for Oracle Database Release 10.x or 11.x

Using the Correct LSNRCTL Commands

8.3.1 General Restrictions for Using Earlier Oracle Database Versions

You can use Oracle Database 10g Release 2 and Oracle Database 11g Release 1 and 2 with Oracle Clusterware 12c Release 1 (12.1).

Do not use the versions of srvctl, lsnrctl, or other Oracle Grid infrastructure home tools to administer earlier version databases. Only administer earlier Oracle Database releases using the tools in the earlier Oracle Database homes. To ensure that the versions of the tools you are using are the correct tools for those earlier release databases, run the tools from the Oracle home of the database or object you are managing.

If you upgrade an existing version of Oracle Clusterware and Oracle ASM to Oracle Grid Infrastructure 11g or later (which includes Oracle Clusterware and Oracle ASM), and you also plan to upgrade your Oracle RAC database to 12c Release 1 (12.1), then the required configuration of existing databases is completed automatically when you complete the Oracle RAC upgrade, and this section does not concern you.

Note:

Before you start an Oracle RAC or Oracle Database installation on an Oracle Clusterware 12c Release 1 (12.1) installation, if you are upgrading from Oracle Database 11g Release 1 (11.1.0.7 or 11.1.0.6), or Oracle Database 10g Release 2 (10.2.0.4), then Oracle recommends that you check for the latest recommended patches for the release you are upgrading from, and install those patches as needed on your existing database installations before upgrading.

For more information on recommended patches, see Oracle 12c Upgrade Companion (My Oracle Support Note 1462240.1):

https://support.oracle.com/CSP/main/article?cmd=show&type=NOT&id=1462240.1

8.3.2 Managing Server Pools with Earlier Database Versions

Starting with Oracle Grid Infrastructure 12c, Oracle Database server categories include roles such as Hub and Leaf that were not present in earlier releases. For this reason, you cannot create server pools using the Oracle RAC 11g version of Database Configuration Assistant (DBCA). To create server pools for earlier release Oracle RAC installations, use the following procedure:

Log in as the Oracle Grid Infrastructure installation owner (Grid user)

Change directory to the 12.1 Oracle Grid Infrastructure binaries directory in the Grid home. For example:

# cd /u01/app/12.1.0/grid/bin

Use the Oracle Grid Infrastructure 12c version of srvctl to create a server pool consisting of Hub Node roles. For example, to create a server pool called p_hub with a maximum size of one cluster node, enter the following command:

srvctl add serverpool -serverpool p_hub -min 0 -max 1 -category hub;

Log in as the Oracle RAC installation owner, start DBCA from the Oracle RAC Oracle home. For example:

$ cd /u01/app/oracle/product/11.2.0/dbhome_1/bin
$ dbca

DBCA discovers the server pool that you created with the Oracle Grid Infrastructure 12c srvctl command. Configure the server pool as required for your services.

See Also:

Oracle Clusterware Administration and Deployment Guide for more information about managing resources using policies

8.3.3 Using ASMCA to Administer Disk Groups for Earlier Database Versions

Use Oracle ASM Configuration Assistant (ASMCA) to create and modify disk groups when you install earlier Oracle databases and Oracle RAC databases on Oracle Grid Infrastructure installations. Starting with Oracle Database 11g Release 2 (11.2), Oracle ASM is installed as part of an Oracle Grid Infrastructure installation, with Oracle Clusterware. You can no longer use Database Configuration Assistant (DBCA) to perform administrative tasks on Oracle ASM.

See Also:

Oracle Database Storage Administrator's Guide for details about configuring disk group compatibility for databases using Oracle Database 11g or earlier software with Oracle Grid Infrastructure 12c (12.1)

8.3.4 Pinning Cluster Nodes for Oracle Database Release 10.x or 11.x

When Oracle Clusterware 12c Release 1 (12.1) is installed on a cluster with no previous Oracle software version, it configures the cluster nodes dynamically, which is compatible with Oracle Database Release 11.2 and later, but Oracle Database 10g and 11.1 require a persistent configuration. This process of association of a node name with a node number is called pinning.

Note:

During an upgrade, all cluster member nodes are pinned automatically, and no manual pinning is required for existing databases. This procedure is required only if you install earlier database versions after installing Oracle Grid Infrastructure 12c Release 1 (12.1) software.

To pin a node in preparation for installing or using an earlier Oracle Database version, use Grid_home/bin/crsctl with the following command syntax, where nodes is a space-delimited list of one or more nodes in the cluster whose configuration you want to pin:

crsctl pin css -n nodes

For example, to pin nodes node3 and node4, log in as root and enter the following command:

$ crsctl pin css -n node3 node4

To determine if a node is in a pinned or unpinned state, use Grid_home/bin/olsnodes with the following command syntax:

To list all pinned nodes:

olsnodes -t -n

For example:

# /u01/app/12.1.0/grid/bin/olsnodes -t -n
node1 1       Pinned
node2 2       Pinned
node3 3       Pinned
node4 4       Pinned

To list the state of a particular node:

olsnodes -t -n node3

For example:

# /u01/app/12.1.0/grid/bin/olsnodes -t -n node3
node3 3       Pinned

See Also:

Oracle Clusterware Administration and Deployment Guide for more information about pinning and unpinning nodes

8.3.5 Using the Correct LSNRCTL Commands

To administer local and SCAN listeners using the lsnrctl command, set your $ORACLE_HOME environment variable to the path for the Oracle Grid Infrastructure home (Grid home). Do not attempt to use the lsnrctl commands from Oracle home locations for previous releases, as they cannot be used with the new release.

8.4 Modifying Oracle Clusterware Binaries After Installation

After installation, if you need to modify the Oracle Clusterware configuration, then you must unlock the Grid home.

For example, if you want to apply a one-off patch, or if you want to modify an Oracle Exadata configuration to run IPC traffic over RDS on the interconnect instead of using the default UDP, then you must unlock the Grid home.

Caution:

Before relinking executables, you must shut down all executables that run in the Oracle home directory that you are unlocking and relinking. In addition, shut down applications linked with Oracle shared libraries.

Unlock the home using the following procedure:

Log in as root, and change directory to the path Grid_home/crs/install, where Grid_home is the path to the Grid home, and unlock the Grid home using the command rootcrs.sh -unlock -crshome Grid_home, where Grid_home is the path to your Grid infrastructure home. For example, with the Grid home /u01/app/12.1.0/grid, enter the following command:

# cd /u01/app/12.1.0/grid/crs/install
# perl rootcrs.sh -unlock -crshome /u01/app/12.1.0/grid

Change user to the Oracle Grid Infrastructure software owner, and relink binaries using the command syntax make -f Grid_home/rdbms/lib/ins_rdbms.mk target, where Grid_home is the Grid home, and target is the binaries that you want to relink. For example, where the Grid user is grid, $ORACLE_HOME is set to the Grid home, and where you are updating the interconnect protocol from UDP to IPC, enter the following command:

# su grid
$ make -f $ORACLE_HOME/rdbms/lib/ins_rdbms.mk ipc_rds ioracle

Note:

To relink binaries, you can also change to the Oracle Grid Infrastructure installation owner and run the command Grid_home/bin/relink.

Relock the Grid home and restart the cluster using the following command:

# perl rootcrs.sh -patch

Repeat steps 1 through 3 on each cluster member node.

Note:

Do not delete directories in the Grid home. For example, do not delete the directory Grid_home/Opatch. If you delete the directory, then the Grid infrastructure installation owner cannot use Opatch to patch the grid home, and Opatch displays the error message "'checkdir' error: cannot create Grid_home/OPatch".

9 How to Modify or Deinstall Oracle Grid Infrastructure

This chapter describes how to remove Oracle Clusterware and Oracle ASM.

Starting with Oracle Database 11g Release 2 (11.2), Oracle recommends that you use the deinstallation tool to remove the entire Oracle home associated with the Oracle Database, Oracle Clusterware, Oracle ASM, Oracle RAC, or Oracle Database client installation. Oracle does not support the removal of individual products or components.

This chapter contains the following topics:

Deciding When to Deinstall Oracle Clusterware

Migrating Standalone Grid Infrastructure Servers to a Cluster

Relinking Oracle Grid Infrastructure for a Cluster Binaries

Changing the Oracle Grid Infrastructure Home Path

Unconfiguring Oracle Clusterware Without Removing Binaries

Removing Oracle Clusterware and ASM

See Also:

Product-specific documentation for requirements and restrictions to remove an individual product

9.1 Deciding When to Deinstall Oracle Clusterware

Remove installed components in the following situations:

You have successfully installed Oracle Clusterware, and you want to remove the Oracle Clusterware installation, either in an educational environment, or a test environment.

You have encountered errors during or after installing or upgrading Oracle Clusterware, and you want to reattempt an installation.

Your installation or upgrade stopped because of a hardware or operating system failure.

You are advised by Oracle Support to reinstall Oracle Clusterware.

9.2 Migrating Standalone Grid Infrastructure Servers to a Cluster

If you have an Oracle Database installation using Oracle Restart (that is, an Oracle Grid Infrastructure installation for a standalone server), and you want to configure that server as a cluster member node, then complete the following tasks:

See Also:

Oracle Clusterware Administration and Deployment Guide for more information about the configuration wizard.

Inspect the Oracle Restart configuration with srvctl using the following syntax, where db_unique_name is the unique name for the database, and lsnrname is the name of the listeners:

srvctl config database -db db_unique_name

srvctl config service -db db_unique_name

srvctl config listener -listener lsnrname

Write down the configuration information for the server.

Log in as root, and change directory to Grid home/crs/install. For example:

# cd /u01/app/12.1.0/grid/crs/install

Stop all of the databases, services, and listeners that you discovered in step 1.

Unconfigure the Oracle Grid Infrastructure installation for a standalone server (Oracle Restart), using the following command:

# roothas.sh -deconfig -force

Prepare the server for Oracle Clusterware configuration, as described in this document. In addition, choose if you want to install Oracle Grid Infrastructure for a cluster in the same location as Oracle Restart, or in a different location:

Installing in the Same Location as Oracle Restart

Use the deinstallation tool to remove the Oracle Restart software, but with all disk groups intact.

Proceed to step 6.

Installing in a Different Location than Oracle Restart

Install Oracle Grid Infrastructure for a cluster in the new Grid home software location.

As the Oracle Grid Infrastructure installation owner, run Oracle Clusterware Configuration Wizard, and save and stage the response file. For example:

$ Grid_home/crs/config/config.sh -silent -responseFile $HOME/GI.rsp

Run root.sh for the Oracle Clusterware Configuration Wizard.

Mount the Oracle Restart disk group.

Enter the volenable command to enable all Oracle Restart disk group volumes.

Add back Oracle Clusterware services to the Oracle Clusterware home, using the information you wrote down in step 1. For example:

/u01/app/grid/product/11.2.0/grid/bin/srvctl add filesystem -device
/dev/asm/db1  -diskgroup ORestartData -volume db1 -mountpointpath
/u01/app/grid/product/11.2.0/db1 -user grid

Add the Oracle Database for support by Oracle Grid Infrastructure for a cluster, using the configuration information you recorded in step 1. Use the following command syntax, where db_unique_name is the unique name of the database on the node, and nodename is the name of the node:

srvctl add database -db db_unique_name -oraclehome $ORACLE_HOME -node nodename

For example, first verify that the ORACLE_HOME environment variable is set to the location of the database home directory.

Next, to add the database name mydb, and the service myservice, enter the following commands:

srvctl add database -db mydb -oraclehome $ORACLE_HOME -node node1

Add each service to the database, using the command srvctl add service. For example:

srvctl add service -db mydb -service myservice

9.3 Relinking Oracle Grid Infrastructure for a Cluster Binaries

After installing Oracle Grid Infrastructure for a cluster (Oracle Clusterware and Oracle ASM configured for a cluster), if you need to modify the binaries, then use the following procedure, where Grid_home is the Oracle Grid Infrastructure for a cluster home:

Caution:

Before relinking executables, you must shut down all executables that run in the Oracle home directory that you are relinking. In addition, shut down applications linked with Oracle shared libraries.

As root:

# cd Grid_home/crs/install
# perl rootcrs.sh -unlock

As the Oracle Grid Infrastructure for a cluster owner:

$ export ORACLE_HOME=Grid_home
$ Grid_home/bin/relink

As root again:

# cd Grid_home/rdbms/install/
# ./rootadd_rdbms.sh
# cd Grid_home/crs/install
# perl rootcrs.sh -patch

You must relink the Oracle Clusterware and Oracle ASM binaries every time you apply an operating system patch or after an operating system upgrade.

For upgrades from previous releases, if you want to deinstall the prior release Grid home, then you must first unlock the prior release Grid home. Unlock the previous release Grid home by running the command rootcrs.sh -unlock from the previous release home. After the script has completed, you can run the deinstallation tool.

9.4 Changing the Oracle Grid Infrastructure Home Path

After installing Oracle Grid Infrastructure for a cluster (Oracle Clusterware and Oracle ASM configured for a cluster), if you need to change the Grid home path, then use the following example as a guide to detach the existing Grid home, and to attach a new Grid home:

Caution:

Before changing the Grid home, you must shut down all executables that run in the Grid home directory that you are relinking. In addition, shut down applications linked with Oracle shared libraries.

Log in as the Oracle Grid Infrastructure installation owner (grid).

Change directory to Grid_home/bin and enter the command crsctl stop crs. For example:

$ cd /u01/app/12.1.0/grid/bin
$ ./crsctl stop crs

Detach the existing Grid home by running the following command, where /u01/app/12.1.0/grid is the existing Grid home location:

$ /u01/app/12.1.0/grid/oui/bin/runInstaller -silent -waitforcompletion\
-detachHome ORACLE_HOME='/u01/app/12.1.0/grid' -local

As root, move the Grid binaries from the old Grid home location to the new Grid home location. For example, where the old Grid home is /u01/app/12.1.0/grid and the new Grid home is /u01/app/12c/:

# mkdir /u01/app/12c
# mv /u01/app/12.1.0/grid /u01/app/12c

Clone the Oracle Grid Infrastructure installation, using the instructions provided in Oracle Clusterware Administration and Deployment Guide.

When you navigate to the Grid home/clone/bin directory and run the clone.pl script, provide values for the input parameters that provide the path information for the new Grid home.

As root again, enter the following command to start up in the new home location:

# cd /u01/app/12c/crs/install
# perl rootcrs.sh -patch -dstcrshome /u01/app/12c/

Repeat steps 1 through 4 on each cluster member node.

You must relink the Oracle Clusterware and Oracle ASM binaries every time you move the Grid home.

9.5 Unconfiguring Oracle Clusterware Without Removing Binaries

Running the rootcrs.sh command flags -deconfig -force enables you to unconfigure Oracle Clusterware on one or more nodes without removing installed binaries. This feature is useful if you encounter an error on one or more cluster nodes during installation when running the root.sh command, such as a missing operating system package on one node. By running rootcrs.sh -deconfig -force on nodes where you encounter an installation error, you can unconfigure Oracle Clusterware on those nodes, correct the cause of the error, and then run root.sh again.

Note:

Stop any databases, services, and listeners that may be installed and running before deconfiguring Oracle Clusterware.

Caution:

Commands used in this section remove the Oracle Grid infrastructure installation for the entire cluster. If you want to remove the installation from an individual node, then see Oracle Clusterware Administration and Deployment Guide.

To unconfigure Oracle Clusterware:

Log in as the root user on a node where you encountered an error.

Change directory to Grid_home/crs/install. For example:

# cd /u01/app/12.1.0/grid/crs/install

Run rootcrs.sh with the -deconfig and -force flags. For example:

# perl rootcrs.sh -deconfig -force

Repeat on other nodes as required.

If you are deconfiguring Oracle Clusterware on all nodes in the cluster, then on the last node, enter the following command:

# perl rootcrs.sh -deconfig -force -lastnode

The -lastnode flag completes deconfiguration of the cluster, including the OCR and voting disks.

Caution:

Run the rootcrs.sh -deconfig -force -lastnode command on a Hub Node. Deconfigure all Leaf Nodes before you run the command with the -lastnode flag.

9.6 Removing Oracle Clusterware and ASM

The deinstall command removes Oracle Clusterware and Oracle ASM from your server. The following sections describe the command, and provide information about additional options to use the command:

About the Deinstallation Tool

Deinstallation Tool Command Example for Oracle Grid Infrastructure

Deinstallation Response File Example for Grid Infrastructure for a Cluster

Caution:

You must use the deinstallation tool from the same release to remove Oracle software. Do not run the deinstallation tool from a later release to remove Oracle software from an earlier release. For example, do not run the deinstallation tool from the 12.1.0.1 installation media to remove Oracle software from an existing 11.2.0.4 Oracle home.

9.6.1 About the Deinstallation Tool

Starting with Oracle Database 12c, the deinstallation tool is integrated with the database installation media. You can run the deinstallation tool using the runInstaller command with the -deinstall and -home options from the base directory of the Oracle Database, Oracle Database Client, or Oracle Grid Infrastructure installation media.

The deinstallation tool is also available as a separate command (deinstall) in Oracle home directories after installation. It is located in the $ORACLE_HOME/deinstall directory.

The deinstallation tool uses the information you provide, plus information gathered from the software home to create a response file. You can alternatively supply a response file generated previously by the deinstall command using the -checkonly option, or by editing the response file template.

The deinstallation tool stops Oracle software, and removes Oracle software and configuration files on the operating system for a specific Oracle home. If you run the deinstallation tool to remove Oracle Grid Infrastructure, then the deinstaller prompts you to run the rootcrs.sh script, as the root user, to deconfigure Oracle Grid Infrastructure or roothas.sh script to deconfigure Oracle Grid Infrastructure for standalone server.

If the software in the Oracle home is not running (for example, after an unsuccessful installation), then the deinstallation tool cannot determine the configuration, and you must provide all the configuration details either interactively or in a response file.

Caution:

When you run the deinstallation tool, if the central inventory (oraInventory) contains no other registered homes besides the home that you are deconfiguring and removing, then the deinstallation tool removes the following files and directory contents in the Oracle base directory of the Oracle Database installation owner:

admin

cfgtoollogs

checkpoints

diag

oradata

flash_recovery_area

Oracle strongly recommends that you configure your installations using an Optimal Flexible Architecture (OFA) configuration, and that you reserve Oracle base and Oracle home paths for exclusive use of Oracle software. If you have any user data in these locations in the Oracle base that is owned by the user account that owns the Oracle software, then the deinstallation tool deletes this data.

In addition, for Oracle Grid Infrastructure installations:

If Grid Naming Service (GNS) is in use, then the entry for the subdomain needs to be deleted from DNS by your DNS administrator.

The default method for running the deinstallation tool is from the deinstall directory in the Oracle home as the installation owner:

$ $ORACLE_HOME/deinstall/deinstall

The deinstall command uses the following syntax, where variable content is indicated in italics:

deinstall [-silent] [-checkonly] [-local] [-paramfile complete path of input response file]
[-params name1=value name2=value . . .] [-o complete path of directory for saving files] [-help]

To run the deinstallation tool from the database installation media, use the runInstaller command with the -deinstall option, followed by the -home option to specify the path of the Oracle home you want to remove using the following syntax, where variable content is indicated in italics:

runInstaller -deinstall -home complete path of Oracle home [-silent] [-checkonly] [-local] [-paramfile complete path of input response file] [-params name1=value
name2=value . . .] [-o complete path of directory for saving files] [-help]

Provide information about your servers as prompted or accept the defaults.

The deinstallation tool stops Oracle software, and removes Oracle software and configuration files on the operating system.

In addition, you can run the deinstallation tool with a response file, or select the following options to run the tool:

-home

Use this flag to indicate the home path of the Oracle home to check or deinstall.

If you run deinstall from the $ORACLE_HOME/deinstall path, then the -home flag is not required because the tool identifies the location of the home where it is run. If you use runInstaller -deinstall from the installation media, then -home is mandatory.

To deinstall Oracle software using the deinstall command in the Oracle home you plan to deinstall, provide a parameter file located outside the Oracle home, and do not use the -home flag.

-silent

Use this flag to run the deinstallation tool in noninteractive mode.

A working system that it can access to determine the installation and configuration information. The -silent flag does not work with failed installations.

A response file that contains the configuration values for the Oracle home that is being deinstalled or deconfigured.

You can generate a response file to use or modify by running the tool with the -checkonly flag. The tool then discovers information from the Oracle home to deinstall and deconfigure. It generates the response file that you can then use with the -silent flag. The -silent flag does not work with failed installations

-checkonly

Use this flag to check the status of the Oracle software home configuration. Running the deinstall command with the -checkonly flag does not remove the Oracle configuration. The -checkonly flag generates a response file that you can use with the deinstall command and -silent option.

-local

Use this flag on a multinode environment to deinstall Oracle software in a cluster.

When you run deinstall with this flag, it deconfigures and deinstalls the Oracle software on the local node (the node where deinstall is run). It does not deinstall or deconfigure Oracle software on remote nodes.

-paramfile complete path of input response file

Use this flag to run deinstall with a response file in a location other than the default. When you use this flag, provide the complete path where the response file is located.

The default location of the response file depends on the location of deinstall:

From the installation media or stage location: stagelocation/response

where stagelocation is the path of the base directory in the installation media, or in the staged files location.

After installation from the installed Oracle home: $ORACLE_HOME/deinstall/response

-params [name1=value name2=value name3=value . . .]

Use this flag with a response file to override one or more values to change in a response file you have created.

-o complete path of directory for saving response files

Use this flag to provide a path other than the default location where the response file (deinstall.rsp.tmpl) is saved.

The default location of the response file depends on the location of deinstall:

From the installation media or stage location: stagelocation/response

where stagelocation is the path of the base directory in the installation media, or in the staged files location.

After installation from the installed Oracle home: $ORACLE_HOME/deinstall/response

-help

Use the help option (-help) to get additional information about the deinstallation tool option flags.

9.6.1.1 Deinstalling Previous Release Grid Home

For upgrades from previous releases, if you want to deinstall the previous release Grid home, then as the root user, you must manually change the permissions of the previous release Grid home, and then run the deinstallation tool.

For example:

# chown -R grid:oinstall /u01/app/grid/11.2.0
# chmod -R 775 /u01/app/grid/11.2.0

In this example, /u01/app/grid/11.2.0 is the previous release Grid home.

9.6.2 Deinstallation Tool Command Example for Oracle Grid Infrastructure

If you run the deinstallation tool using the deinstallation tool from the $ORACLE_HOME/deinstall folder, then the deinstallation starts without prompting you for an ORACLE_HOME.

Use the optional flag -paramfile to provide a path to a response file.

In the following example, the runInstaller command is in the path /directory_path, where directory_path is the path to the database directory on the installation media, and /u01/app/12.1.0/grid/ is the path to the Grid home that you want to remove:

$ cd /directory_path/
$ ./runInstaller -deinstall -home /u01/app/12.1.0/grid

The following example uses a response file in the software owner location /home/usr/grid:

$ cd /directory_path/runInstaller
$ ./runInstaller -deinstall -paramfile /home/usr/grid/my_db_paramfile.tmpl

9.6.3 Deinstallation Response File Example for Grid Infrastructure for a Cluster

You can run the deinstallation tool with the -paramfile option to use the values you specify in the response file. The following is an example of a response file for a cluster on nodes node1 and node2, in which the Oracle Grid Infrastructure for a cluster software binary owner is grid, the Oracle Grid Infrastructure home (Grid home) is in the path /u01/app/12.1.0/grid, the Oracle base (the Oracle base for Oracle Grid Infrastructure, containing Oracle ASM log files, Oracle Clusterware logs, and other administrative files) is /u01/app/grid/, the central Oracle Inventory home (oraInventory) is /u01/app/oraInventory, the virtual IP addresses (VIP) are 192.0.2.2 and 192.0.2.4, the local node (the node where you run the deinstallation session from) is node1:

#Copyright (c) 2005, 2006 Oracle Corporation.  All rights reserved.
#Fri Feb 06 00:08:58 PST 2009
LOCAL_NODE=node1
HOME_TYPE=CRS
ASM_REDUNDANCY=\
ORACLE_BASE=/u01/app/12.1.0/grid/
VIP1_MASK=255.255.252.0
VOTING_DISKS=/u02/storage/grid/vdsk
SCAN_PORT=1522
silent=true
ASM_UPGRADE=false
ORA_CRS_HOME=/u01/app/12.1.0/grid
GPNPCONFIGDIR=$ORACLE_HOME
LOGDIR=/home/grid/SH/deinstall/logs/
GPNPGCONFIGDIR=$ORACLE_HOME
ORACLE_OWNER=grid
NODELIST=node1,node2
CRS_STORAGE_OPTION=2
NETWORKS="eth0"/192.0.2.1\:public,"lan1"/10.0.0.1\:cluster_interconnect
VIP1_IP=192.0.2.2
NETCFGJAR_NAME=netcfg.jar
ORA_DBA_GROUP=dba
CLUSTER_NODES=node1,node2
JREDIR=/u01/app/12.1.0/grid/jdk/jre
VIP1_IF=eth0
REMOTE_NODES=node2
VIP2_MASK=255.255.252.0
ORA_ASM_GROUP=asm
LANGUAGE_ID=AMERICAN_AMERICA.WE8ISO8859P1
CSS_LEASEDURATION=400
NODE_NAME_LIST=node1,node2
SCAN_NAME=node1scn
SHAREJAR_NAME=share.jar
HELPJAR_NAME=help4.jar
SILENT=false
local=false
INVENTORY_LOCATION=/u01/app/oraInventory
GNS_CONF=false
JEWTJAR_NAME=jewt4.jar
OCR_LOCATIONS=/u02/storage/grid/ocr
EMBASEJAR_NAME=oemlt.jar
ORACLE_HOME=/u01/app/12.1.0/grid
CRS_HOME=true
VIP2_IP=192.0.2.4
ASM_IN_HOME=n
EWTJAR_NAME=ewt3.jar
HOST_NAME_LIST=node1,node2
JLIBDIR=/u01/app/12.1.0/grid/jlib
VIP2_IF=eth0
VNDR_CLUSTER=false
CRS_NODEVIPS='node1-vip/255.255.252.0/eth0,node2-vip/255.255.252.0/eth0'
CLUSTER_NAME=node1-cluster

Note:

Do not use quotation marks with variables except in the following cases:

Around addresses in CRS_NODEVIPS:

CRS_NODEVIPS='n1-vip/255.255.252.0/lan0,n2-vip/255.255.252.0/eth0'

Around interface names in NETWORKS:

NETWORKS="eth0"/192.0.2.1:public,"lan1"/10.0.0.1:cluster_interconnect "eth2"/192.0.2.2:vip1_ip

A Troubleshooting the Oracle Grid Infrastructure Installation Process

This appendix provides troubleshooting information for installing Oracle Grid Infrastructure.

See Also:

The Oracle Database 12c Release 1 (12.1) Oracle RAC documentation set in the Documentation directory:

Oracle Clusterware Administration and Deployment Guide

Oracle Real Application Clusters Administration and Deployment Guide

This appendix contains the following topics:

Best Practices for Contacting Oracle Support

General Installation Issues

Interpreting CVU "Unknown" Output Messages Using Verbose Mode

Interpreting CVU Messages About Oracle Grid Infrastructure Setup

About the Oracle Grid Infrastructure Alert Log

Performing Cluster Diagnostics During Oracle Grid Infrastructure Installations

About Using CVU Cluster Healthchecks After Installation

Interconnect Configuration Issues

SCAN VIP and SCAN Listener Issues

Storage Configuration Issues

Failed or Incomplete Installations and Upgrades

Completing Failed or Interrupted Installations and Upgrades

A.1 Best Practices for Contacting Oracle Support

If you find that it is necessary for you to contact Oracle Support to report an issue, then Oracle recommends that you follow these guidelines when you enter your service request:

Provide a clear explanation of the problem, including exact error messages.

Provide an explanation of any steps you have taken to troubleshoot issues, and the results of these steps.

Provide exact versions (major release and patch release) of the affected software.

Provide a step-by-step procedure of what actions you carried out when you encountered the problem, so that Oracle Support can reproduce the problem.

Provide an evaluation of the effect of the issue, including affected deadlines and costs.

Provide screen shots, logs, Remote Diagnostic Agent (RDA) output, or other relevant information.

A.2 General Installation Issues

The following is a list of examples of types of errors that can occur during installation. It contains the following issues:

root.sh failed to complete with error messages such as: Start of resource "ora.cluster_interconnect.haip" failed...

An error occurred while trying to get the disks

CRS-5823:Could not initialize agent framework.

Failed to connect to server, Connection refused by server, or Can't open display

Failed to initialize ocrconfig

INS-32026 INSTALL_COMMON_HINT_DATABASE_LOCATION_ERROR

Nodes unavailable for selection from the OUI Node Selection screen

Node nodename is unreachable

PROT-8: Failed to import data from specified file to the cluster registry

PRVE-0038 : The SSH LoginGraceTime setting, or fatal: Timeout before authentication

Time stamp is in the future

Timed out waiting for the CRS stack to start

Other Installation Issues and Errors

root.sh failed to complete with error messages such as: Start of resource "ora.cluster_interconnect.haip" failed...

Cause: When configuring public and private network interfaces for Oracle RAC, you must enable ARP. Highly Available IP (HAIP) addresses do not require ARP on the public network, but for VIP failover, you will need to enable ARP. Do not configure NOARP.

Action: Configure the hsi0 (or eth) device to use ARP protocol by running the following command:

# ifconfig lan(n) arp

An error occurred while trying to get the disks

Cause: There is an entry in /etc/oratab pointing to a non-existent Oracle home. The OUI log file should show the following error: "java.io.IOException: /home/oracle/OraHome//bin/kfod: not found"

Action: Remove the entry in /etc/oratab pointing to a non-existing Oracle home.

Could not execute auto check for display colors using command /usr/X11R6/bin/xdpyinfo

Cause: Either the DISPLAY variable is not set, or the user running the installation is not authorized to open an X window. This can occur if you run the installation from a remote terminal, or if you use an su command to change from a user that is authorized to open an X window to a user account that is not authorized to open an X window on the display, such as a lower-privileged user opening windows on the root user's console display.

Action: Run the command echo $DISPLAY to ensure that the variable is set to the correct visual or to the correct host. If the display variable is set correctly then either ensure that you are logged in as the user authorized to open an X window, or run the command xhost + to allow any user to open an X window.

If you are logged in locally on the server console as root, and used the su - command to change to the Oracle Grid Infrastructure installation owner, then log out of the server, and log back in as the grid installation owner.

CRS-5823:Could not initialize agent framework.

Cause: Installation of Oracle Grid Infrastructure fails when you run root.sh. Oracle Grid Infrastructure fails to start because the local host entry is missing from the hosts file.

The Oracle Grid Infrastructure alert.log file shows the following:

[/oracle/app/grid/bin/orarootagent.bin(11392)]CRS-5823:Could not initialize
agent framework. Details at (:CRSAGF00120:) in
/oracle/app/grid/log/node01/agent/crsd/orarootagent_root/orarootagent_root.log
2010-10-04 12:46:25.857
[ohasd(2401)]CRS-2765:Resource 'ora.crsd' has failed on server 'node01'.

You can verify this as the cause by checking crsdOUT.log file, and finding the following:

Unable to resolve address for localhost:2016
ONS runtime exiting
Fatal error: eONS: eonsapi.c: Aug 6 2009 02:53:02

Action: Add the local host entry in the hosts file.

Failed to connect to server, Connection refused by server, or Can't open display

Cause: These are typical of X Window display errors on Windows or UNIX systems, where xhost is not properly configured, or where you are running as a user account that is different from the account you used with the startx command to start the X server.

Action: In a local terminal window, log in as the user that started the X Window session, and enter the following command:

$ xhost fullyqualifiedRemoteHostname

For example:

$ xhost somehost.example.com

Then, enter the following commands, where workstationname is the host name or IP address of your workstation.

Bourne, Bash, or Korn shell:

$ DISPLAY=workstation_name:0.0
$ export DISPLAY

To determine whether X Window applications display correctly on the local system, enter the following command:

$ xclock

The X clock should appear on your monitor. If xclock is not available, then install it on your system and repeat the test. If xclock is installed on your system, but the X clock fails to open on your display, then use of the xhost command may be restricted.

If you are using a VNC client to access the server, then ensure that you are accessing the visual that is assigned to the user that you are trying to use for the installation. For example, if you used the su command to become the installation owner on another user visual, and the xhost command use is restricted, then you cannot use the xhost command to change the display. If you use the visual assigned to the installation owner, then the correct display is available, and entering the xclock command results in the X clock starting on your display.

When the X clock appears, close the X clock, and start the installer again.

Failed to initialize ocrconfig

Cause: You have the wrong options configured for NFS in the /etc/fstab file.

You can confirm this by checking ocrconfig.log files located in the path Grid_home/log/nodenumber/client and finding the following:

/u02/app/crs/clusterregistry, ret -1, errno 75, os err string Value too large
for defined data type
2007-10-30 11:23:52.101: [ OCROSD][3085960896]utopen:6'': OCR location

Action: For file systems mounted on NFS, provide the correct mount configuration for NFS mounts in the /etc/fstab file. For example:

rw,sync,bg,hard,nointr,tcp,vers=3,timeo=300,rsize=32768,wsize=32768,actimeo=0

Note:

You should not have netdev in the mount instructions, or vers=2. The netdev option is only required for OCFS file systems, and vers=2 forces the kernel to mount NFS using the older version 2 protocol.

After correcting the NFS mount information, remount the NFS mount point, and run the root.sh script again. For example, with the mount point /u02:

#umount /u02
#mount -a -t nfs
#cd $GRID_HOME
#sh root.sh

INS-32026 INSTALL_COMMON_HINT_DATABASE_LOCATION_ERROR

Cause: The location selected for the Grid home for a cluster installation is located under an Oracle base directory.

Action: For Oracle Grid Infrastructure for a Cluster installations, the Grid home must not be placed under one of the Oracle base directories, or under Oracle home directories of Oracle Database installation owners, or in the home directory of an installation owner. During installation, ownership of the path to the Grid home is changed to root. This change causes permission errors for other installations. In addition, the Oracle Clusterware software stack may not come up under an Oracle base path.

LSRSC-444: Run root.sh command on the Node with OUI session

Cause: If this message appears listing a node that is not the one where you are running OUI, then the likely cause is that the named node shut down during or before the root.sh script completed its run.

Action: Complete running the root.sh script on all other cluster member nodes, and do not attempt to run the root script on the node named in the error message. After you complete Oracle Grid Infrastructure on all or part of the set of planned cluster member nodes, start OUI and deinstall the failed Oracle Grid Infrastructure installation on the node named in the error. When you have deinstalled the failed installation on the node, add that node manually to the cluster.

See Also:

Oracle Clusterware Administration and Deployment Guide for information about how to add a node

Nodes unavailable for selection from the OUI Node Selection screen

Cause: Oracle Grid Infrastructure is either not installed, or the Oracle Grid Infrastructure services are not up and running.

Action: Install Oracle Grid Infrastructure, or review the status of your Oracle Grid Infrastructure installation. Consider restarting the nodes, as doing so may resolve the problem.

Node nodename is unreachable

Cause: Unavailable IP host

Action: Attempt the following:

Run the shell command netstat -in. Compare the output of this command with the contents of the /etc/hosts file to ensure that the node IP is listed.

Run the shell command nslookup to see if the host is reachable.

As the oracle user, attempt to connect to the node with ssh or rsh. If you are prompted for a password, then user equivalence is not set up properly. The installer should configure SSH for you. If you are unable to use automatic SSH configuration, then review the section Appendix E, "Configuring SSH Manually on All Cluster Nodes."

PROT-8: Failed to import data from specified file to the cluster registry

Cause: Insufficient space in an existing Oracle Cluster Registry device partition, which causes a migration failure while running rootupgrade. To confirm, look for the error "utopen:12:Not enough space in the backing store" in the log file Grid_home/log/hostname/client/ocrconfig_pid.log.

Action: Identify a storage device that has 280 MB or more available space. Locate the existing raw device name from /var/opt/oracle/srvConfig.loc, and copy the contents of this raw device to the new device using the command dd.

PRVE-0038 : The SSH LoginGraceTime setting, or fatal: Timeout before authentication

Cause: PRVE-0038: The SSH LoginGraceTime setting on node "nodename" may result in users being disconnected before login is completed. This error may because the default timeout value for SSH connections is too low, or if the LoginGraceTime parameter is commented out.

Action: Oracle recommends uncommenting the LoginGraceTime parameter in the OpenSSH configuration file opt/ssh/etc/sshd_config, and setting it to a value of 0 (unlimited).

Time stamp is in the future

Cause: One or more nodes has a different clock time than the local node. If this is the case, then you may see output similar to the following:

time stamp 2005-04-04 14:49:49 is 106 s in the future

Action: Ensure that all member nodes of the cluster have the same clock time.

Timed out waiting for the CRS stack to start

Cause: If a configuration issue prevents the Oracle Grid Infrastructure software from installing successfully on all nodes, then you may see error messages such as "Timed out waiting for the CRS stack to start," or you may notice that Oracle Grid Infrastructure-managed resources were not create on some nodes after you exit the installer. You also may notice that resources have a status other than ONLINE.

Action: Deconfigure the Oracle Grid Infrastructure installation without removing binaries, and review log files to determine the cause of the configuration issue. After you have fixed the configuration issue, rerun the scripts used during installation to configure Oracle Grid Infrastructure.

See Also:

Section 9.5, "Unconfiguring Oracle Clusterware Without Removing Binaries"

YPBINDPROC_DOMAIN: Domain not bound

Cause: This error can occur during postinstallation testing when the public network interconnect for a node is pulled out, and the VIP does not fail over. Instead, the node hangs, and users are unable to log in to the system. This error occurs when the Oracle home, listener.ora, Oracle log files, or any action scripts are located on an NAS device or NFS mount, and the name service cache daemon nscd has not been activated.

Action: To allow Oracle Clusterware to better tolerate network failures with NAS devices or NFS mounts, enable the Name Service Cache Daemon (nscd). The nscd provides a caching mechanism for most common name service requests. It is automatically started when the system starts in a multiuser state. Oracle software requires that the server is started with multiuser run level (3), which is the default for HP-UX. To check to see if the server is set to 3, enter the command who -r. For example:

# who -r
. run-level 3 Jan 4 14:04 3 0 S

See Also:

Section 3.13, "Checking the Run Level and Name Service Cache Daemon"

A.2.1 Other Installation Issues and Errors

For additional help in resolving error messages, refer to My Oracle Support. For example, the note with Doc ID 1367631.1 contains some of the most common installation issues for Oracle Grid Infrastructure and Oracle Clusterware.

A.3 Interpreting CVU "Unknown" Output Messages Using Verbose Mode

If you run Cluster Verification Utility using the -verbose argument, and a Cluster Verification Utility command responds with UNKNOWN for a particular node, then this is because Cluster Verification Utility cannot determine if a check passed or failed. The following is a list of possible causes for an "Unknown" response:

The node is down

Common operating system command binaries required by Cluster Verification Utility are missing in the /bin directory in the Oracle Grid Infrastructure home or Oracle home directory

The user account starting Cluster Verification Utility does not have privileges to run common operating system commands on the node

The node is missing an operating system patch, or a required package

The node has exceeded the maximum number of processes or maximum number of open files, or there is a problem with IPC segments, such as shared memory or semaphores

A.4 Interpreting CVU Messages About Oracle Grid Infrastructure Setup

If the Cluster Verification Utility report indicates that your system fails to meet the requirements for Oracle Grid Infrastructure installation, then use the topics in this section to correct the problem or problems indicated in the report, and run Cluster Verification Utility again.

User Equivalence Check Failed

Node Reachability Check or Node Connectivity Check Failed

User Existence Check or User-Group Relationship Check Failed

User Equivalence Check Failed

Cause: Failure to establish user equivalency across all nodes. This can be due to not creating the required users, or failing to complete secure shell (SSH) configuration properly.

Action: Cluster Verification Utility provides a list of nodes on which user equivalence failed.

For each node listed as a failure node, review the installation owner user configuration to ensure that the user configuration is properly completed, and that SSH configuration is properly completed. The user that runs the Oracle Grid Infrastructure installation must have permissions to create SSH connections.

Oracle recommends that you use the SSH configuration option in OUI to configure SSH. You can use Cluster Verification Utility before installation if you configure SSH manually, or after installation, when SSH has been configured for installation.

For example, to check user equivalency for the user account oracle, use the command su - oracle and check user equivalence manually by running the ssh command on the local node with the date command argument using the following syntax:

$ ssh nodename date

The output from this command should be the timestamp of the remote node identified by the value that you use for nodename. If you are prompted for a password, then you must configure SSH. If ssh is in the default location, the /usr/bin directory, then use ssh to configure user equivalence. You can also use rsh to confirm user equivalence.

If you see a message similar to the following when entering the date command with SSH, then this is the probable cause of the user equivalence error:

The authenticity of host 'node1 (140.87.152.153)' can't be established.
RSA key fingerprint is 7z:ez:e7:f6:f4:f2:4f:8f:9z:79:85:62:20:90:92:z9.
Are you sure you want to continue connecting (yes/no)?

Enter yes, and then run Cluster Verification Utility to determine if the user equivalency error is resolved.

If ssh is in a location other than the default, /usr/bin, then Cluster Verification Utility reports a user equivalence check failure. To avoid this error, navigate to the directory Grid_home/cv/admin, open the file cvu_config with a text editor, and add or update the key ORACLE_SRVM_REMOTESHELL to indicate the ssh path location on your system. For example:

# Locations for ssh and scp commands
ORACLE_SRVM_REMOTESHELL=/usr/local/bin/ssh
ORACLE_SRVM_REMOTECOPY=/usr/local/bin/scp

Note the following rules for modifying the cvu_config file:

Key entries have the syntax name=value

Each key entry and the value assigned to the key defines one property only

Lines beginning with the number sign (#) are comment lines, and are ignored

Lines that do not follow the syntax name=value are ignored

When you have changed the path configuration, run Cluster Verification Utility again. If ssh is in another location than the default, you also must start OUI with additional arguments to specify a different location for the remote shell and remote copy commands. Enter runInstaller -help to obtain information about how to use these arguments.

Note:

When you or OUI run ssh or rsh commands, including any login or other shell scripts they start, you may see errors about invalid arguments or standard input if the scripts generate any output. You should correct the cause of these errors.

To stop the errors, remove all commands from the oracle user's login scripts that generate output when you run ssh or rsh commands.

If you see messages about X11 forwarding, then complete the task

Section 5.2.3, "Setting Remote Display and X11 Forwarding Configuration" to resolve this issue.

If you see errors similar to the following:

stty: standard input: Invalid argument
stty: standard input: Invalid argument

These errors are produced if hidden files on the system (for example, .bashrc or .cshrc) contain stty commands. If you see these errors, then refer to Section 5.2.4, "Preventing Installation Errors Caused by Terminal Output Commands" to correct the cause of these errors.

Node Reachability Check or Node Connectivity Check Failed

Cause: One or more nodes in the cluster cannot be reached using TCP/IP protocol, through either the public or private interconnects.

Action: Use the command /bin/ping address to check each node address. When you find an address that cannot be reached, check your list of public and private addresses to make sure that you have them correctly configured. If you use third-party vendor clusterware, then refer to the vendor documentation for assistance. Ensure that the public and private network interfaces have the same interface names on each node of your cluster.

User Existence Check or User-Group Relationship Check Failed

Cause: The administrative privileges for users and groups required for installation are missing or incorrect.

Action: Use the id command on each node to confirm that the installation owner user (for example, grid or oracle) is created with the correct group membership. Ensure that you have created the required groups, and create or modify the user account on affected nodes to establish required group membership.

See Also:

Chapter 5, "Configuring Users, Groups and Environments for Oracle Grid Infrastructure and Oracle RAC" for instructions about how to create required groups, and how to configure the installation owner user

A.5 About the Oracle Grid Infrastructure Alert Log

The Oracle Grid Infrastructure alert log is the first place to look for serious errors. In the event of an error, it can contain path information to diagnostic logs that can provide specific information about the cause of errors.

After installation, Oracle Grid Infrastructure posts alert messages when important events occur. For example, you might see alert messages from the Cluster Ready Services (CRS) daemon process when it starts, if it aborts, if the failover process fails, or if automatic restart of a CRS resource failed.

Oracle Enterprise Manager monitors the Clusterware log file and posts an alert on the Cluster Home page if an error is detected. For example, if a voting disk is not available, a CRS-1604 error is raised, and a critical alert is posted on the Cluster Home page. You can customize the error detection and alert settings on the Metric and Policy Settings page.

The location of the Oracle Grid Infrastructure log file is Grid_home/log/hostname/alerthostname.log, where Grid_home is the directory in which Oracle Grid Infrastructure was installed and hostname is the host name of the local node.

See Also:

Oracle Real Application Clusters Administration and Deployment Guide

A.6 Performing Cluster Diagnostics During Oracle Grid Infrastructure Installations

If Oracle Universal Installer (OUI) does not display the Node Selection page, then use the following command syntax to check the integrity of the Cluster Manager:

cluvfy comp clumgr -n node_list -verbose

In the preceding syntax example, the variable node_list is the list of nodes in your cluster, separated by commas.

Note:

If you encounter unexplained installation errors during or after a period when cron jobs are run, then your cron job may have deleted temporary files before the installation is finished. Oracle recommends that you complete installation before daily cron jobs are run, or disable daily cron jobs that perform cleanup until after the installation is completed.

A.7 About Using CVU Cluster Healthchecks After Installation

Starting with Oracle Grid Infrastructure 11g release 2 (11.2.0.3) and later, you can use the CVU healthcheck command option to check your Oracle Grid Infrastructure and Oracle Database installations for their compliance with mandatory requirements and best practices guidelines, and to check to ensure that they are functioning properly.

Use the following syntax to run the healthcheck command option:

cluvfy comp healthcheck [-collect {cluster|database}] [-db db_unique_name] [-bestpractice|-mandatory] [-deviations] [-html] [-save [-savedir directory_path]

For example:

$ cd /home/grid/cvu_home/bin
$ ./cluvfy comp healthcheck -collect cluster -bestpractice -deviations -html

The options are:

-collect [cluster|database]

Use this flag to specify that you want to perform checks for Oracle Grid Infrastructure (cluster) or Oracle Database (database). If you do not use the collect flag with the healthcheck option, then cluvfy comp healthcheck performs checks for both Oracle Grid Infrastructure and Oracle Database.

-db db_unique_name

Use this flag to specify checks on the database unique name that you enter after the db flag.

CVU uses JDBC to connect to the database as the user cvusys to verify various database parameters. For this reason, if you want checks to be performed for the database you specify with the -db flag, then you must first create the cvusys user on that database, and grant that user the CVU-specific role, cvusapp. You must also grant members of the cvusapp role select permissions on system tables.

A SQL script is included in CVU_home/cv/admin/cvusys.sql to facilitate the creation of this user. Use this SQL script to create the cvusys user on all the databases that you want to verify using CVU.

If you use the db flag but do not provide a database unique name, then CVU discovers all the Oracle Databases on the cluster. If you want to perform best practices checks on these databases, then you must create the cvusys user on each database, and grant that user the cvusapp role with the select privileges needed to perform the best practice checks.

[-bestpractice | -mandatory] [-deviations]

Use the bestpractice flag to specify best practice checks, and the mandatory flag to specify mandatory checks. Add the deviations flag to specify that you want to see only the deviations from either the best practice recommendations or the mandatory requirements. You can specify either the -bestpractice or -mandatory flag, but not both flags. If you specify neither -bestpractice or -mandatory, then both best practices and mandatory requirements are displayed.

-html

Use the html flag to generate a detailed report in HTML format.

If you specify the html flag, and a browser CVU recognizes is available on the system, then the browser is started and the report is displayed on the browser when the checks are complete.

If you do not specify the html flag, then the detailed report is generated in a text file.

-save [-savedir dir_path]

Use the save or -save -savedir flags to save validation reports (cvuchecdkreport_timestamp.txt and cvucheckreport_timestamp.htm), where timestamp is the time and date of the validation report.

If you use the save flag by itself, then the reports are saved in the path CVU_home/cv/report, where CVU_home is the location of the CVU binaries.

If you use the flags -save -savedir, and enter a path where you want the CVU reports saved, then the CVU reports are saved in the path you specify.

A.8 Interconnect Configuration Issues

If you plan to use multiple network interface cards (NICs) for the interconnect, and you do not configure them during installation or after installation with Redundant Interconnect Usage, then you should use a third party solution to aggregate the interfaces at the operating system level. Otherwise, the failure of a single NIC will affect the availability of the cluster node.

If you use aggregated NIC cards, and use the Oracle Clusterware Redundant Interconnect Usage feature, then they should be on different subnets. If you use a third-party vendor method of aggregation, then follow the directions for that vendor's product.

If you encounter errors, then carry out the following system checks:

Verify with your network providers that they are using correct cables (length, type) and software on their switches. In some cases, to avoid bugs that cause disconnects under loads, or to support additional features such as Jumbo Frames, you may need a firmware upgrade on interconnect switches, or you may need newer NIC driver or firmware at the operating system level. Running without such fixes can cause later instabilities to Oracle RAC databases, even though the initial installation seems to work.

Review VLAN configurations, duplex settings, and auto-negotiation in accordance with vendor and Oracle recommendations.

A.9 SCAN VIP and SCAN Listener Issues

If your installation reports errors related to the SCAN VIP addresses or listeners, then check the following items to make sure your network is configured correctly:

Check the file /etc/resolv.conf - verify the contents are the same on each node

Verify that there is a DNS entry for the SCAN, and that it resolves to three valid IP addresses. Use the command nslookup scan-name; this command should return the DNS server name and the three IP addresses configured for the SCAN.

Use the ping command to test the IP addresses assigned to the SCAN; you should receive a response for each IP address.

Note:

If you do not have a DNS configured for your cluster environment, then you can create an entry for the SCAN in the /etc/hosts file on each node. However, using the /etc/hosts file to resolve the SCAN results in having only one SCAN available for the entire cluster instead of three. Only the first entry for SCAN in the hosts file is used.

Ensure the SCAN VIP uses the same netmask that is used by the public interface.

If you need additional assistance troubleshooting errors related to the SCAN, SCAN VIP or listeners, then refer to My Oracle Support. For example, the note with Doc ID 1373350.1 contains some of the most common issues for the SCAN VIPs and listeners.

A.10 Storage Configuration Issues

The following is a list of issues involving storage configuration:

Recovery from Losing a Node File System or Grid Home

A.10.1 Recovery from Losing a Node File System or Grid Home

With Oracle Grid Infrastructure release 11.2 and later, if you remove a file system by mistake, or encounter another storage configuration issue that results in losing the Oracle Local Registry or otherwise corrupting a node, you can recover the node in one of two ways:

Restore the node from an operating system level backup (preferred)

Remove the node, and then add the node. With 11.2 and later clusters, profile information for is copied to the node, and the node is restored.

Using addnode.sh enables cluster nodes to be removed and added again, so that they can be restored from the remaining nodes in the cluster. If you add nodes in a GNS configuration, then that is called Grid Plug and Play (GPnP). GPnP uses profiles to configure nodes, which eliminates configuration data requirements for nodes and the need for explicit add and delete nodes steps. GPnP allows a system administrator to take a template system image and run it on a new node with no further configuration. GPnP removes many manual operations, reduces the opportunity for errors, and encourages configurations that can be changed easily. Removal of individual node configuration makes the nodes easier to replace, because nodes do not need to contain individually-managed states.

GPnP reduces the cost of installing, configuring, and managing database nodes by making their node state disposable. It allows nodes to be easily replaced with a regenerated state.

See Also:

Oracle Clusterware Administration and Deployment Guide for information about how to add nodes manually or with GNS

A.11 Failed or Incomplete Installations and Upgrades

During installations of Oracle Grid Infrastructure, the following actions take place:

Oracle Universal Installer (OUI) accepts inputs to configure Oracle Grid Infrastructure software on your system.

You are instructed to run the scripts orainstRoot.sh and root.sh.

You run the scripts, and then click OK in OUI.

OUI runs configuration assistants. The Oracle Grid Infrastructure software installation completes successfully.

If OUI exits before the root.sh script runs, or if OUI exits before the installation session is completed successfully, then the Oracle Grid Infrastructure installation is incomplete. If your installation does not complete, then Oracle Clusterware does not work correctly. If you are performing an upgrade, then an incomplete installation can result in some nodes being upgraded to the latest software and others nodes not upgraded at all.

To resolve this error, you must reboot the server, and then follow the steps for completing an incomplete installation as documented in Section A.12, "Completing Failed or Interrupted Installations and Upgrades".

A.12 Completing Failed or Interrupted Installations and Upgrades

If OUI exits on the node from which you started the installation, or the node reboots before you confirm that the root.sh or rootupgrade.sh scripts were run on nodes, the installation remains incomplete. In an incomplete installation, configuration assistants still need to run, and the new Grid home still needs to be marked as active in the central Oracle inventory. You must complete the installation.

This section contains the following tasks:

Failed or Incomplete Installations and Upgrades

Completing Failed or Interrupted Installations and Upgrades

A.12.1 Continuing Incomplete Installations on First Nodes

To continue an incomplete installation on the First Node:

Complete the upgrade of all other nodes in the cluster.

Reboot the First node (the node where the installation was started).

Log in as root, and run the orainstRoot.sh script. For example:

$ sudo -s
[root@node1]# cd /u01/app/oraInventory
[root@node1]# ./orainstRoot.sh

Change directory to the Grid home on the First node, and run the root script on that node again. For example:

[root@node1]# cd /u01/app/12.1.0/grid
[root@node1]# ./root.sh

Configure a response file, and provide passwords for the installation. See Section C.5, "Postinstallation Configuration Using a Response File" for information about how to create the response file.

To complete the upgrade or installation, log in as the Grid installation owner, and run the script configToolAllCommands, located in the path Gridhome/cfgtoollogs/configToolAllCommands, specifying the response file that you created. For example, where the response file is gridinstall.rsp:

[grid@node1]$ cd /u01/app/12.1.0/grid/cfgtoollogs
[grid@node1]$ ./configToolAllCommands RESPONSE_FILE=gridinstall.rsp

A.12.2 Continuing Installations on Nodes Other Than the First Node

For nodes other than the First node (the node on which the installation is started):

Reboot the node where the error occurs.

Log in as root, and run the orainstRoot.sh script. For example:

$ sudo -s
[root@node6]# cd /u01/app/oraInventory
[root@node6]# ./orainstRoot.sh

Change directory to the Grid home, and run the root script on that node. For example:

[root@node6]# cd /u01/app/12.1.0/grid
[root@node6]# ./root.sh

B How to Upgrade to Oracle Grid Infrastructure 12c Release 1

This appendix describes how to perform Oracle Clusterware and Oracle Automatic Storage Management upgrades.

Oracle Clusterware upgrades can be rolling upgrades, in which a subset of nodes are brought down and upgraded while other nodes remain active. Oracle Automatic Storage Management 11g release 2 (11.2) upgrades can be rolling upgrades. If you upgrade a subset of nodes, then a software-only installation is performed on the existing cluster nodes that you do not select for upgrade.

This appendix contains the following topics:

Back Up the Oracle Software Before Upgrades

Unset Oracle Environment Variables

About Oracle Grid Infrastructure and Oracle ASM Upgrade and Downgrade

Options for Clusterware and Oracle ASM Upgrades and Downgrades

Restrictions for Clusterware and Oracle ASM Upgrades

Preparing to Upgrade an Existing Oracle Clusterware Installation

Using CVU to Validate Readiness for Oracle Clusterware Upgrades

Performing Rolling Upgrade of Oracle Grid Infrastructure

Updating Oracle Enterprise Manager Cloud Control Target Parameters

Unlocking the Existing Oracle Clusterware Installation

Downgrading Oracle Clusterware After an Upgrade

B.1 Back Up the Oracle Software Before Upgrades

Before you make any changes to the Oracle software, Oracle recommends that you create a backup of the Oracle software and databases.

B.2 Unset Oracle Environment Variables

Unset Oracle environment variables.

If you have set ORA_CRS_HOME as an environment variable, following instructions from Oracle Support, then unset it before starting an installation or upgrade. You should never use ORA_CRS_HOME as an environment variable except under explicit direction from Oracle Support.

Check to ensure that installation owner login shell profiles (for example,.profile or .cshrc) do not have ORA_CRS_HOME set.

If you have had an existing installation on your system, and you are using the same user account to install this installation, then unset the following environment variables: ORA_CRS_HOME; ORACLE_HOME; ORA_NLS10; TNS_ADMIN; and any other environment variable set for the Oracle installation user that is connected with Oracle software homes.

Also, ensure that the $ORACLE_HOME/bin path is removed from your PATH environment variable.

B.3 About Oracle Grid Infrastructure and Oracle ASM Upgrade and Downgrade

You can upgrade Oracle Grid Infrastructure in any of the following ways:

Rolling Upgrade which involves upgrading individual nodes without stopping Oracle Grid Infrastructure on other nodes in the cluster

Non-rolling Upgrade which involves bringing down all the nodes except one. A complete cluster outage occurs while the root script stops the old Oracle Clusterware stack and starts the new Oracle Clusterware stack on the node where you initiate the upgrade. After upgrade is completed, the new Oracle Clusterware is started on all the nodes.

Note that some services are disabled when one or more nodes are in the process of being upgraded. All upgrades are out-of-place upgrades, meaning that the software binaries are placed in a different Grid home from the Grid home used for the prior release.

You can downgrade from Oracle Grid Infrastructure 12c Release 1 (12.1) to prior releases of Oracle Grid Infrastructure. Be aware that if you downgrade to a prior release, then your cluster must conform with the configuration requirements for that prior release, and the features available for the cluster consist only of the features available for that prior release of Oracle Clusterware and Oracle ASM.

If you have an existing Oracle ASM 11g Release 1 (11.1) or 10g release instance, with Oracle ASM in a separate home, then you can either upgrade it at the time that you install Oracle Grid Infrastructure, or you can upgrade it after the installation, using Oracle ASM Configuration Assistant (ASMCA). However, be aware that a number of Oracle ASM features are disabled until you upgrade Oracle ASM, and Oracle Clusterware management of Oracle ASM does not function correctly until Oracle ASM is upgraded, because Oracle Clusterware only manages Oracle ASM when it is running in the Oracle Grid Infrastructure home. For this reason, Oracle recommends that if you do not upgrade Oracle ASM at the same time as you upgrade Oracle Clusterware, then you should upgrade Oracle ASM immediately afterward. This issue does not apply to Oracle ASM 11g Release 2 (11.2) and later, as the Oracle Grid Infrastructure home contains Oracle ASM binaries as well.

You can perform out-of-place upgrades to an Oracle ASM instance using Oracle ASM Configuration Assistant (ASMCA). In addition to running ASMCA using the graphical user interface, you can run ASMCA in non-interactive (silent) mode.

Note:

You must complete an upgrade before attempting to use cluster backup files. You cannot use backups for a cluster that has not completed upgrade.

See Also:

Oracle Database Upgrade Guide and Oracle Database Storage Administrator's Guide for additional information about upgrading existing Oracle ASM installations

B.4 Options for Clusterware and Oracle ASM Upgrades and Downgrades

Upgrade options from Oracle Grid Infrastructure 11g to Oracle Grid Infrastructure 12c include the following:

Oracle Grid Infrastructure rolling upgrade which involves upgrading individual nodes without stopping Oracle Grid Infrastructure on other nodes in the cluster

Oracle Grid Infrastructure non-rolling upgrade by bringing the cluster down and upgrading the complete cluster

Upgrade options from releases before Oracle Grid Infrastructure 11g Release 2 (11.2) to Oracle Grid Infrastructure 12c include the following:

Oracle Grid Infrastructure rolling upgrade, with OCR and voting disks on storage other than Oracle ASM

Oracle Grid Infrastructure complete cluster upgrade (downtime, non-rolling), with OCR and voting disks on storage other than Oracle ASM

Upgrade options from Oracle Grid Infrastructure 11g Release 2 (11.2) to Oracle Grid Infrastructure 12c include the following:

Oracle Grid Infrastructure rolling upgrade, with OCR and voting disks on Oracle ASM or shared file system

Oracle Grid Infrastructure complete cluster upgrade (downtime, non-rolling), with OCR and voting disks on Oracle ASM or shared file system

Downgrade options from Oracle Grid Infrastructure 12c to earlier releases include the following:

Oracle Grid Infrastructure downgrade to Oracle Grid Infrastructure 11g Release 2 (11.2)

Oracle Grid Infrastructure downgrades to releases before Oracle Grid Infrastructure 11g Release 2 (11.2), Oracle Grid Infrastructure 11g Release 1 (11.1), Oracle Clusterware and Oracle ASM 10g, if storage for OCR and voting files is on storage other than Oracle ASM

B.5 Restrictions for Clusterware and Oracle ASM Upgrades

Oracle recommends that you use the Cluster Verification Utility tool (CVU) to check if there are any patches required for upgrading your existing Oracle Grid Infrastructure 11g Release 2 (11.2) or Oracle RAC database 11g Release 2 (11.2) installations.

See Also:

Section B.7, "Using CVU to Validate Readiness for Oracle Clusterware Upgrades"

Be aware of the following restrictions and changes for upgrades to Oracle Grid Infrastructure installations, which consists of Oracle Clusterware and Oracle Automatic Storage Management (Oracle ASM):

Upgrade from a standard cluster to an Oracle Grid Infrastructure 12c Release 1 (12.1) Oracle Flex Cluster configuration from Oracle Grid Infrastructure 11g or Oracle Clusterware and Oracle ASM 10g releases is not supported.

If the Oracle Cluster Registry (OCR) and voting file locations for your current installation are on raw or block devices, then you must migrate them to Oracle ASM disk groups or shared file systems before upgrading to Oracle Grid Infrastructure 12c.

Downgrades from an Oracle Grid Infrastructure 12c Release 1 (12.1) Oracle Flex Cluster configuration to a Standard cluster configuration are not supported. All cluster configurations in releases earlier than Oracle Grid Infrastructure 12c are Standard cluster configurations. This downgrade restriction includes downgrades from an Oracle Flex Cluster to Oracle Grid Infrastructure 11g cluster, or to Oracle Clusterware and Oracle ASM 10g clusters.

You can downgrade to the Oracle Grid Infrastructure release you upgraded from. For example, if you upgraded from Oracle Grid Infrastructure 11g Release 2 (11.2) to Oracle Grid Infrastructure 12c Release 1 (12.1), you can only downgrade to Oracle Grid Infrastructure 11g Release 2 (11.2).

Upgrades always result in a standard cluster. To change a cluster member node role to Leaf, all Oracle Grid Infrastructure nodes must be upgraded to Oracle Grid Infrastructure 12c Release 1 (12.1) or later, and the active release must be upgraded to Oracle Grid Infrastructure 12c Release 1 (12.1) or later.

If you want to upgrade Oracle Grid Infrastructure releases before Oracle Grid Infrastructure 11g Release 2 (11.2), where the OCR and voting disk files are on raw or block devices, and you want to migrate these files to Oracle ASM rather than to a shared file system, then you must upgrade to Oracle Grid Infrastructure 11g Release 2 (11.2) before you upgraded to Oracle Grid Infrastructure 12c.

To upgrade existing Oracle Clusterware installations to a standard configuration Oracle Grid Infrastructure 12c cluster, your release must be greater than or equal to Oracle Clusterware 10g Release 1 (10.1.0.5), Oracle Clusterware 10g Release 2 (10.2.0.3), Oracle Grid Infrastructure 11g Release 1 (11.1.0.6), or Oracle Grid Infrastructure 11g Release 2 (11.2).

To upgrade existing Oracle Grid Infrastructure installations from Oracle Grid Infrastructure 11g Release 2 (11.2.0.2) to a later release, you must apply patch 11.2.0.2.3 (11.2.0.2 PSU 3) or later.

To upgrade existing Oracle Grid Infrastructure installations to Oracle Grid Infrastructure 12c Release 1 (12.1), you must first verify if you need to apply any mandatory patches for upgrade to succeed. See Section B.6.1 for steps to check readiness.

See Also:

Oracle 12c Upgrade Companion (My Oracle Support Note 1462240.1):

https://support.oracle.com/oip/faces/secure/km/DocumentDisplay.jspx?id=1462240.1

Oracle Clusterware and Oracle ASM upgrades are always out-of-place upgrades. You cannot perform an in-place upgrade of Oracle Clusterware and Oracle ASM to existing homes.

If the existing Oracle Clusterware home is a shared home, note that you can use a non-shared home for the Oracle Grid Infrastructure for a cluster home for Oracle Clusterware and Oracle ASM 12c Release 1 (12.1).

The same user that owned the earlier release Oracle Grid Infrastructure software must perform the Oracle Grid Infrastructure 12c Release 1 (12.1) upgrade. Before Oracle Database 11g, either all Oracle software installations were owned by the Oracle user, typically oracle, or Oracle Database software was owned by oracle, and Oracle Clusterware software was owned by a separate user, typically crs.

Oracle ASM and Oracle Clusterware both run in the Oracle Grid Infrastructure home.

During a major release upgrade to Oracle Grid Infrastructure 12c Release 1 (12.1), the software in the 12c Release 1 (12.1) Oracle Grid Infrastructure home is not fully functional until the upgrade is completed. Running srvctl, crsctl, and other commands from the new Grid homes are not supported until the final rootupgrade.sh script is run and the upgrade is complete across all nodes.

To manage databases in existing earlier release database homes during the Oracle Grid Infrastructure upgrade, use the srvctl from the existing database homes.

You can perform upgrades on a shared Oracle Clusterware home.

During Oracle Clusterware installation, if there is a single instance Oracle ASM release on the local node, then it is converted to a clustered Oracle ASM 12c Release 1 (12.1) installation, and Oracle ASM runs in the Oracle Grid Infrastructure home on all nodes.

If a single instance (non-clustered) Oracle ASM installation is on a remote node, which is a node other than the local node (the node on which the Oracle Grid Infrastructure installation is being performed), then it will remain a single instance Oracle ASM installation. However, during installation, if you select to place the Oracle Cluster Registry (OCR) and voting disk files on Oracle ASM, then a clustered Oracle ASM installation is created on all nodes in the cluster, and the single instance Oracle ASM installation on the remote node will become nonfunctional.

See Also:

Oracle Database Upgrade Guide for additional information about preparing for upgrades

B.6 Preparing to Upgrade an Existing Oracle Clusterware Installation

If you have an existing Oracle Clusterware installation, then you upgrade your existing cluster by performing an out-of-place upgrade. You cannot perform an in-place upgrade.

B.6.1 Checks to Complete Before Upgrade an Existing Oracle Clusterware Installation

Complete the following tasks before starting an upgrade:

For each node, use Cluster Verification Utility to ensure that you have completed preinstallation steps. It can generate Fixup scripts to help you to prepare servers. In addition, the installer will help you to ensure all required prerequisites are met.

Ensure that you have information you will need during installation, including the following:

An Oracle base location for Oracle Clusterware.

An Oracle Grid Infrastructure home location that is different from your existing Oracle Clusterware location.

SCAN name and addresses, and other network addresses, as described in Chapter 4.

Privileged user operating system groups, as described in Chapter 5.

root user access, to run scripts as root during installation, using one of the options described in Section 7.1.1.

For the installation owner running the installation, if you have environment variables set for the existing installation, then unset the environment variables $ORACLE_HOME and $ORACLE_SID, as these environment variables are used during upgrade. For example:

$ unset ORACLE_BASE
$ unset ORACLE_HOME
$ unset ORACLE_SID

See Also:

Section B.2, "Unset Oracle Environment Variables"

B.6.2 Running the ORAchk Upgrade Readiness Assessment

The ORAchk (Oracle RAC Configuration Audit Tool) Upgrade Readiness Assessment can be used to obtain an automated upgrade-specific health check for upgrades to Oracle Grid Infrastructure 11.2.0.3, 11.2.0.4, and 12.1.0.1. You can run the ORAchk Upgrade Readiness Assessment tool and automate many of the manual pre-upgrade and post upgrade checks.

Oracle recommends that you download and run the latest version of ORAchk from My Oracle Support. For information about downloading, configuring, and running ORAchk configuration audit tool, refer to My Oracle Support note 1457357.1, which is available at the following URL:

https://support.oracle.com/CSP/main/article?cmd=show&type=NOT&id=1457357.1

B.7 Using CVU to Validate Readiness for Oracle Clusterware Upgrades

Review the contents in this section to validate that your cluster is ready for upgrades.

B.7.1 About the CVU Grid Upgrade Validation Command Options

Navigate to the staging area for the upgrade, where the runcluvfy.sh command is located, and run the command runcluvfy.sh stage -pre crsinst -upgrade to check the readiness of your Oracle Clusterware installation for upgrades. Running runcluvfy.sh with the -pre crsinst -upgrade flags performs system checks to confirm if the cluster is in a correct state for upgrading from an existing clusterware installation.

The command uses the following syntax, where variable content is indicated by italics:

runcluvfy.sh stage -pre crsinst -upgrade [-rolling] -src_crshome src_Gridhome -dest_crshome dest_Gridhome -dest_version dest_release
[-fixup][-method {sudo|root} [-location dir_path] [-user user_name]] [-verbose]

The options are:

-rolling

Use this flag to verify readiness for rolling upgrades.

-src_crshome src_Gridhome

Use this flag to indicate the location of the source Oracle Clusterware or Grid home that you are upgrading, where src_Gridhome is the path to the home to upgrade.

-dest_crshome dest_Gridhome

Use this flag to indicate the location of the upgrade Grid home, where dest_ Gridhome is the path to the Grid home.

-dest_version dest_version

Use the dest_version flag to indicate the release number of the upgrade, including any patchset. The release number must include the five digits designating the release to the level of the platform-specific patch. For example: 11.2.0.2.0.

-fixup [-fixupdir fixupdirpath]

Use the -fixup flag to indicate that you want to generate instructions for any required steps you must complete to ensure that your cluster is ready for an upgrade. The default location is the CVU work directory. If you want to place the fixup instructions in a different directory, then add the flag -fixupdir, and provide the path to the directory where you want to put the instructions for required fixes.

-verbose

Use the -verbose flag to produce detailed output of individual checks

B.7.2 Example of Verifying System Upgrade Readiness for Grid Infrastructure

You can verify that the permissions required for installing Oracle Clusterware have been configured by running the following command:

$ ./runcluvfy.sh stage -pre crsinst -upgrade -rolling -src_crshome
/u01/app/grid/11.2.0.1 -dest_crshome /u01/app/grid/11.2.0.2 -dest_version 11.2.0.3.0 -fixup -fixupdir /home/grid/fixup -verbose

B.7.3 Verifying System Readiness for Oracle Database Upgrades

Use Cluster Verification Utility to assist you with system checks in preparation for starting a database upgrade. The installer runs the appropriate CVU checks automatically, and either prompts you to fix problems, or provides a fixup script to be run on all nodes in the cluster before proceeding with the upgrade.

See Also:

Oracle Database Upgrade Guide

B.8 Understanding Rolling Upgrades Using Batches

Upgrades from earlier releases require that you upgrade the entire cluster. You cannot select or de-select individual nodes for upgrade. Oracle does not support attempting to add additional nodes to a cluster during a rolling upgrade.

Oracle recommends that you leave Oracle RAC instances running when upgrading Oracle Clusterware. When you start the root script on each node, the database instances on that node are shut down and then the rootupgrade.sh script starts the instances again. If you upgrade from Oracle Grid Infrastructure 11g Release 11.2.0.2 and later to any later release of Oracle Grid Infrastructure, then all nodes are selected for upgrade by default.

You can use root user automation to automate running the rootupgrade.sh script during the upgrade. When you use root automation, you can divide the nodes into groups, or batches, and start upgrades of these batches. Between batches, you can move services from nodes running the previous release to the upgraded nodes, so that services are not affected by the upgrade. Oracle recommends that you use root automation, and allow the rootupgrade.sh script to stop and start instances automatically. You can also continue to run root scripts manually.

B.9 Performing Rolling Upgrade of Oracle Grid Infrastructure

Use the following procedures to upgrade Oracle Clusterware or Oracle Automatic Storage Management:

Performing a Standard Upgrade from an Earlier Release

Completing an Oracle Clusterware Upgrade when Nodes Become Unreachable

Note:

When you upgrade to Oracle Clusterware 11g release 2 (11.2), Oracle Automatic Storage Management (Oracle ASM) is installed in the same home as Oracle Clusterware. In Oracle documentation, this home is called the Oracle Grid Infrastructure home, or Grid home. Also note that Oracle does not support attempting to add additional nodes to a cluster during a rolling upgrade.

B.9.1 Performing a Standard Upgrade from an Earlier Release

Use the following procedure to upgrade the cluster from an earlier release:

Start the installer, and select the option to upgrade an existing Oracle Clusterware and Oracle ASM installation.

On the node selection page, select all nodes.

Select installation options as prompted. Oracle recommends that you configure root script automation, so that the rootupgrade.sh script can be run automatically during the upgrade.

Run root scripts, using either automatically or manually:

Running root scripts automatically

If you have configured root script automation, then use the pause between batches to relocate services from the nodes running the previous release to the new release.

Running root scripts manually

If you have not configured root script automation, then when prompted, run the rootupgrade.sh script on each node in the cluster that you want to upgrade.

If you run root scripts manually, then run the script on the local node first. The script shuts down the earlier release installation, replaces it with the new Oracle Clusterware release, and starts the new Oracle Clusterware installation.

After the script completes successfully, you can run the script in parallel on all nodes except for one, which you select as the last node. When the script is run successfully on all the nodes except the last node, run the script on the last node.

After running the rootupgrade.sh script on the last node in the cluster, if you are upgrading from a release earlier than Oracle Grid Infrastructure 11g Release 2 (11.2.0.1), and left the check box labeled ASMCA checked, as is the default, then Oracle Automatic Storage Management Configuration Assistant ASMCA runs automatically, and the Oracle Grid Infrastructure upgrade is complete. If you unchecked the box during the interview stage of the upgrade, then ASMCA is not run automatically.

If an earlier release of Oracle Automatic Storage Management (Oracle ASM) is installed, then the installer starts ASMCA to upgrade Oracle ASM to 12c Release 1 (12.1). You can choose to upgrade Oracle ASM at this time, or upgrade it later.

Oracle recommends that you upgrade Oracle ASM at the same time that you upgrade the Oracle Clusterware binaries. Until Oracle ASM is upgraded, Oracle Database installations that use Oracle ASM cannot be installed. Until Oracle ASM is upgraded, the 12c Release 1 (12.1) Oracle ASM management tools in the Grid home (for example, srvctl) do not work.

Because the Oracle Grid Infrastructure home is in a different location than the former Oracle Clusterware and Oracle ASM homes, update any scripts or applications that use utilities, libraries, or other files that reside in the Oracle Clusterware and Oracle ASM homes.

Note:

At the end of the upgrade, if you set the Oracle Cluster Registry (OCR) backup location manually to the earlier release Oracle Clusterware home (CRS home), then you must change the OCR backup location to the new Oracle Grid Infrastructure home (Grid home). If you did not set the OCR backup location manually, then the backup location is changed for you during the upgrade.

Because upgrades of Oracle Clusterware are out-of-place upgrades, the previous release Oracle Clusterware home cannot be the location of the current release OCR backups. Backups in the old Oracle Clusterware home can be deleted.

B.9.2 Completing an Oracle Clusterware Upgrade when Nodes Become Unreachable

If some nodes become unreachable in the middle of an upgrade, then you cannot complete the upgrade, because the upgrade script (rootupgrade.sh) did not run on the unreachable nodes. Because the upgrade is incomplete, Oracle Clusterware remains in the previous release. You can confirm that the upgrade is incomplete by entering the command crsctl query crs activeversion.

To resolve this problem, run the rootupgrade.sh command with the -force flag on any of the nodes where the rootupgrade.sh script has already completed as follows:

Grid_home/rootupgrade -force

For example:

# /u01/app/12.1.0/grid/rootupgrade -force

This command forces the upgrade to complete. Verify that the upgrade has completed by using the command crsctl query crs activeversion. The active release should be the upgrade release.

The force cluster upgrade command has the following limitations:

All active nodes must be upgraded to the newer release

All inactive nodes (accessible or inaccessible) may be either upgraded or not upgraded

Inaccessible nodes have the following restrictions after you run the force command:

After patch set upgrades, you can delete the node from the cluster. If the node becomes accessible later, and the patch release upgrade path is supported, then you can upgrade it to the new patch release.

B.9.3 Upgrading Inaccessible Nodes After Forcing an Upgrade

Starting with Oracle Grid Infrastructure 12c, after you compete a force cluster upgrade command, you can join inaccessible nodes to the cluster as an alternative to deleting the nodes, which was required in earlier releases. To use this option, Oracle Grid Infrastructure 12c Release 1 (12.1) software must already be installed on the nodes.

To complete the upgrade of inaccessible or unreachable nodes:

Log in as the Grid user on the node that is to be joined to the cluster.

Change directory to the /crs/install directory in the Oracle Grid Infrastructure 12c Release 1 (12.1) Grid home. For example:

$ cd /u01/12.1.0/grid/crs/install

Run the following PERL command, where existingnode is the node in the cluster on which you are running the command, and upgraded_node is the inaccessible or unreachable node that you want to join to the cluster:

$ rootcrs.sh -join -existingnode upgraded_node

Note:

The -join operation is not supported for Oracle Clusterware releases earlier than 11.2.0.1.0. In such cases, delete the node and add it to the clusterware using the addNode command.

B.9.4 Changing the First Node for Install and Upgrade

If the first node becomes inaccessible, you can force another node to be the first node for installation or upgrade. During installation, if root.sh fails to complete on the first node, run the following command on another node using the -force option:

root.sh -force -first

For upgrade, run the following command:

rootupgrade.sh -force -first

B.9.5 Performing Rolling Upgrades of Oracle Automatic Storage Management

Review the following sections for information about Oracle ASM rolling upgrade options:

About Full Release Rolling Upgrades of Oracle ASM

About Individual (One-Off) Oracle ASM Patches

About Oracle Grid Infrastructure Software Patch Levels

B.9.5.1 About Full Release Rolling Upgrades of Oracle ASM

After you have completed the Oracle Clusterware portion of Oracle Grid Infrastructure 12c Release 1 (12.1) upgrade, you may need to upgrade Oracle ASM separately under the following conditions:

If you are upgrading from a release in which Oracle ASM was in a separate Oracle home, such as Oracle ASM 10g Release 2 (10.2) or Oracle ASM 11g Release 1 (11.1)

If the Oracle ASM portion of the Oracle Grid Infrastructure upgrade failed, or for some other reason Automatic Storage Management Configuration assistant (asmca) did not run.

You can use asmca to complete the upgrade separately, but you should do it soon after you upgrade Oracle Clusterware, as Oracle ASM management tools such as srvctl do not work until Oracle ASM is upgraded.

Note:

ASMCA performs a rolling upgrade only if the earlier release of Oracle ASM is either 11.1.0.6 or 11.1.0.7. Otherwise, ASMCA performs a normal upgrade, in which ASMCA brings down all Oracle ASM instances on all nodes of the cluster, and then brings them all up in the new Grid home.

After you have upgraded Oracle ASM with Oracle Grid Infrastructure 12c Release 1, you can install individual patches for Oracle ASM by downloading them from the Oracle Automated Release Update site.

B.9.5.2 About Individual (One-Off) Oracle ASM Patches

Individual patches are called one-off patches. An Oracle ASM one-off patches is available for a specific released release of Oracle ASM. If a patch you want is available, then you can download the patch and apply it to Oracle ASM using the OPatch Utility. The OPatch inventory keeps track of the patches you have installed for your release of Oracle ASM. if there is a conflict between the patches you have installed and patches you want to apply, then the OPatch Utility advises you of these conflicts.

B.9.5.3 About Oracle Grid Infrastructure Software Patch Levels

The software patch level for Oracle Grid Infrastructure represents the set of all one-off patches applied to the Oracle Grid Infrastructure software release, including Oracle ASM. The release is the release number, in the format of major, minor, and patch set release format. For example, with the release number 12.1.0.1, the major release is 12, the minor release is 1, and 0.0 is the patch set number. With one-off patches, the major and minor release remains the same, though the patch levels change each time you apply or roll back an interim patch.

As with standard upgrades to Oracle Grid Infrastructure, at any given point in time for normal operation of the cluster, all the nodes in the cluster must have the same software release and patch level. Because one-off patches can be applied as rolling upgrades, all possible patch levels on a particular software release are compatible with each other.

B.9.6 Preparing to Complete a Separate Upgrade of Oracle ASM

If you must complete upgrade of Oracle ASM separately, then note the following requirements

The active release of Oracle Clusterware must be 12c Release 1 (12.1). To determine the active release, enter the following command:

$ crsctl query crs activeversion

You can upgrade a single instance Oracle ASM installation to a clustered Oracle ASM installation. However, you can only upgrade an existing single instance Oracle ASM installation if you run the installation from the node on which the Oracle ASM installation is installed. You cannot upgrade a single instance Oracle ASM installation on a remote node.

You must ensure that any rebalance operations on your existing Oracle ASM installation are completed before starting the upgrade process.

During the upgrade process, you alter the Oracle ASM instances to an upgrade state. You do not need to shut down database clients unless they are on Oracle ACFS. However, because this upgrade state limits Oracle ASM operations, you should complete the upgrade process soon after you begin. The following are the operations allowed when an Oracle ASM instance is in the upgrade state:

Diskgroup mounts and dismounts

Opening, closing, resizing, or deleting database files

Recovering instances

Queries of fixed views and packages: Users are allowed to query fixed views and run anonymous PL/SQL blocks using fixed packages, such as dbms_diskgroup)

B.9.7 Patching Oracle ASM Separately from an Oracle Grid Infrastructure Upgrade

Complete the following tasks if you must upgrade from an Oracle ASM release where Oracle ASM was installed in a separate Oracle home, or if the Oracle ASM portion of Oracle Grid Infrastructure failed to complete:

On the node you plan to start the upgrade, set the environment variable ASMCA_ROLLING_UPGRADE as true. For example:

$ export ASMCA_ROLLING_UPGRADE=true

From the Oracle Grid Infrastructure 12c Release 1 (12.1) home, start ASMCA. For example:

$ cd /u01/12.1/grid/bin
$ ./asmca

Select Upgrade.

ASM Configuration Assistant upgrades Oracle ASM in succession for all nodes in the cluster.

After you complete the upgrade, run the command to unset the ASMCA_ROLLING_UPGRADE environment variable.

See Also:

Oracle Database Upgrade Guide and Oracle Database Storage Administrator's Guide for additional information about preparing an upgrade plan for Oracle ASM, and for starting, completing, and stopping Oracle ASM upgrades

B.9.8 Upgrading Oracle ASM to a Software Patch Level

Starting with Oracle Grid Infrastructure 12c Release 1 (12.1), a new cluster state called "Rolling Patch" is available. This mode is similar to the existing "Rolling Upgrade" mode in terms of the Oracle ASM operations allowed in this quiesce state.

Download patches you want to apply from My Oracle Support:

https://support.oracle.com

Select the Patches and Updates tab to locate the patch.

Oracle recommends that you select Recommended Patch Advisor, and enter the product group, release, and platform for your software. My Oracle Support provides you with a list of the most recent patch set updates (PSUs) and critical patch updates (CPUs).

Place the patches in an accessible directory, such as /tmp.

Change directory to the /opatch directory in the Grid home. For example:

$ cd /u01/app/12.1.0/grid/opatch

Review the patch documentation for the patch you want to apply, and complete all required steps before starting the patch upgrade.

B.10 Updating Oracle Enterprise Manager Cloud Control Target Parameters

Because Oracle Clusterware 12c Release 1 (12.1) is an out-of-place upgrade of the Oracle Clusterware home in a new location (the Oracle Grid Infrastructure for a cluster home, or Grid home), the path for the CRS_HOME parameter in some parameter files must be changed. If you do not change the parameter, then you encounter errors such as "cluster target broken" on Oracle Enterprise Manager Cloud Control.

To resolve the issue, upgrade the Enterprise Manager Cloud Control target, and then update the Enterprise Manager Agent Base Directory on each cluster member node running an agent, as described in the following sections:

Updating the Enterprise Manager Cloud Control Target After Upgrades

Updating the Enterprise Manager Agent Base Directory After Upgrades

B.10.1 Updating the Enterprise Manager Cloud Control Target After Upgrades

Log in to Enterprise Manager Cloud Control.

Navigate to the Targets menu, and then to the Cluster page.

Click a cluster target that was upgraded.

Click Cluster, then Target Setup, and then Monitoring Configuration from the menu.

Update the value for Oracle Home with the new Grid home path.

Save the updates.

B.10.2 Updating the Enterprise Manager Agent Base Directory After Upgrades

Navigate to the bin directory in the Agent Base Directory.

The Agent Base Directory is a directory where the Management Agent home is created. It is in the path EMAgent_home/core/EMAgent_Version/bin. For example, if the Agent Base Directory is /u01/app/grid, then the Management Agent home is created as /u01/app/emagent/core/12.1.0.1.0/bin

In the bin directory, open the file emctl with a text editor.

Locate the parameter CRS_HOME, and update the parameter to the new Grid home path.

Repeat steps 1-3 on each node of the cluster with an Enterprise Manager agent.

B.11 Unlocking the Existing Oracle Clusterware Installation

After upgrade from previous releases, if you want to deinstall the previous release Oracle Grid Infrastructure Grid home, then you must first change the permission and ownership of the previous release Grid home. Complete this task using the following procedure:

Log in as root, and change the permission and ownership of the previous release Grid home using the following command syntax, where oldGH is the previous release Grid home, swowner is the Oracle Grid Infrastructure installation owner, and oldGHParent is the parent directory of the previous release Grid home:

#chmod -R 755 oldGH
#chown -R swowner oldGH
#chown swowner oldGHParent

For example:

#chmod -R 755 /u01/app/11.2.0/grid
#chown -R grid /u01/app/11.2.0/grid
#chown grid /u01/app/11.2.0

After you change the permissions and ownership of the previous release Grid home, log in as the Oracle Grid Infrastructure Installation owner (grid, in the preceding example), and use the Oracle Grid Infrastructure 12c standalone deinstallation tool to remove the previous release Grid home (oldGH).

You can obtain the standalone deinstallation tool from the following URL:

http://www.oracle.com/technetwork/database/enterprise-edition/downloads/index.html

Click the See All link for the downloads for your operating system platform, and scan the list of downloads for the deinstall utility.

B.12 Downgrading Oracle Clusterware After an Upgrade

After a successful or a failed upgrade to Oracle Clusterware 12c Release 1 (12.1), you can restore Oracle Clusterware to the previous release. This section contains the following topics:

About Downgrading Oracle Clusterware After an Upgrade

Downgrading to Releases Before 11g Release 2 (11.2.0.2)

Downgrading to 11g Release 2 (11.2.0.2) or Later Release

B.12.1 About Downgrading Oracle Clusterware After an Upgrade

Downgrading Oracle Clusterware restores the Oracle Clusterware configuration to the state it was in before the Oracle Clusterware 12c Release 1 (12.1) upgrade. Any configuration changes you performed during or after the Oracle Grid Infrastructure 12c Release 1 (12.1) upgrade are removed and cannot be recovered.

In the downgrade procedures, the following variables are used:

local node is the first node on which you ran the rootupgrade script.

remote nodes are all other nodes where you ran the rootupgrade script.

To restore Oracle Clusterware to the previous release, use the downgrade procedure for the release to which you want to downgrade.

B.12.2 Downgrading to Releases Before 11g Release 2 (11.2.0.2)

On all remote nodes, use the command syntax Grid_home/crs/install/rootcrs.sh -downgrade [-force] to stop the 12c Release 1 (12.1) resources, and shut down the Oracle Grid Infrastructure 12c Release 1 (12.1) stack.

After the rootcrs.sh -downgrade script has completed on all remote nodes, on the local node use the command syntax Grid_home/crs/install/rootcrs.sh -downgrade [-force] -lastnode.

For example:

# /u01/app/12.1.0/grid/crs/install/rootcrs.sh -downgrade  -lastnode

Note:

With Oracle Grid Infrastructure 12c, you no longer need to provide the location of the previous release Grid home or release number.

This script downgrades the OCR. If you want to stop a partial or failed Oracle Grid Infrastructure 12c Release 1 (12.1) installation and restore the previous release Oracle Clusterware, then use the -force flag with this command.

On any of the cluster member nodes where the rootupgrade.sh script has run successfully:

Log in as the Oracle Grid Infrastructure installation owner

Use the following command to start the installer, where /u01/app/12.1.0/grid is the location of the new (upgraded) Grid home:

./runInstaller -nowait -waitforcompletion -ignoreSysPrereqs -updateNodeList -silent CRS=false ORACLE_HOME=/u01/app/12.1.0/grid

Add the flag -cfs if the Grid home is a shared home.

On each cluster member node where the rootupgrade.sh script has run successfully:

Log in as the Oracle Grid Infrastructure installation owner (grid)

Use the following command to start the installer, where the path you provide for the flag ORACLE_HOME is the location of the home directory from the earlier Oracle Clusterware installation

For example:

$ cd /u01/app/12.1.0/grid/oui/bin
$ ./runInstaller -nowait -waitforcompletion -ignoreSysPrereqs -updateNodeList -silent CRS=true ORACLE_HOME=/u01/app/crs

For downgrades to 11.1 and earlier releases

If you are downgrading to Oracle Clusterware 11g Release 1 (11.1) or an earlier release, then you must run root.sh manually from the earlier release Oracle Clusterware home to complete the downgrade after you complete step b.

OUI prompts you to run root.sh manually from the earlier release Oracle Clusterware installation home in sequence on each member node of the cluster to complete the downgrade. After you complete this task, downgrade is completed.

Running root.sh from the earlier release Oracle Clusterware installation home restarts the Oracle Clusterware stack, starts up all the resources previously registered with Oracle Clusterware in the earlier release, and configures the old initialization scripts to run the earlier release Oracle Clusterware stack.

After completing the downgrade, update the entry for Oracle ASM instance in the oratab file (/etc/oratab or /var/opt/oracle/oratab) on every node in the cluster as follows:

+ASM<instance#>:<RAC-ASM home>:N

B.12.3 Downgrading to 11g Release 2 (11.2.0.2) or Later Release

On all remote nodes, use the command syntax Grid_home/crs/install/rootcrs.sh -downgrade [-force] to stop the 12c Release 1 (12.1) resources, and shut down the Oracle Grid Infrastructure 12c Release 1 (12.1) stack.

Use the command syntax rootcrs.sh -downgrade. For example:

# /u01/app/12.1.0/grid/crs/install/rootcrs.sh -downgrade

If you want to stop a partial or failed Oracle Grid Infrastructure 12c Release 1 (12.1) installation and restore the previous release Oracle Clusterware, then use the -force flag with this command.

After the rootcrs.sh -downgrade script has completed on all remote nodes, on the local node use the command syntax Grid_home/crs/install/rootcrs.sh -downgrade [-force] -lastnode.

For example:

# /u01/app/12.1.0/grid/crs/install/rootcrs.sh -downgrade  -lastnode

Note:

Starting with Oracle Grid Infrastructure 12c Release 1 (12.1), you no longer need to provide the location of the earlier release Grid home or earlier release number.

This script downgrades the OCR. If you want to stop a partial or failed Oracle Grid Infrastructure 12c Release 1 (12.1) installation and restore the previous release Oracle Clusterware, then use the -force flag with this command.

On each cluster member node where the rootupgrade.sh script has run successfully:

Log in as the Oracle Grid Infrastructure installation owner

Use the following command to start the installer, where /u01/app/12.1.0/grid is the location of the new (upgraded) Grid home:

$ cd /u01/app/12.1.0/grid/oui/bin
./runInstaller -nowait -waitforcompletion -ignoreSysPrereqs -updateNodeList -silent CRS=false ORACLE_HOME=/u01/app/12.1.0/grid

Add the flag -cfs if the Grid home is a shared home.

On any of the cluster member nodes where the rootupgrade script has run successfully:

Log in as the Oracle Grid Infrastructure installation owner

Use the following command to start the installer, where the path you provide for the flag ORACLE_HOME is the location of the home directory from the earlier Oracle Clusterware installation

For example:

$ cd /u01/app/12.1.0/grid/oui/bin
$ ./runInstaller -nowait -waitforcompletion -ignoreSysPrereqs -updateNodeList -silent CRS=true ORACLE_HOME=/u01/app/crs

For downgrades to 11.2.0.2

If you are downgrading to Oracle Clusterware 11g Release 1 (11.2.0.1), then you must start the Oracle Clusterware stack manually after you complete step b.

On each node, start Oracle Clusterware from the earlier release Oracle Clusterware home using the command crsctl start crs. For example, where the earlier release home is /u01/app/11.2.0/grid, use the following command on each node:

/u01/app/11.2.0/grid/bin/crsctl start crs

For downgrades to 12.1.0.1

If you are downgrading to Oracle Grid Infrastructure 12c Release 1 (12.1.0.1), then run the following commands to configure the Grid Management Database:

Start the 12.1.0.1 Oracle Clusterware stack on all nodes.

On any node, remove the MGMTDB resource as follows:

12101_Grid_home/bin/srvctl remove mgmtdb

Run DBCA in the silent mode from the 12.1.0.1 Oracle home and create the Management Database as follows:

12101_Grid_home/bin/dbca -silent -createDatabase -templateName
MGMTSeed_Database.dbc -sid -MGMTDB -gdbName _mgmtdb -storageType ASM
-diskGroupName ASM_DG_NAME
-datafileJarLocation 12101_grid_home/assistants/dbca/templates -characterset AL32UTF8 -autoGeneratePasswords

Configure the Management Database by running the Configuration Assistant from the location 12101_Grid_home/bin/mgmtca.

C Installing and Configuring Oracle Database Using Response Files

This appendix describes how to install and configure Oracle products using response files. It includes information about the following topics:

How Response Files Work

Preparing a Response File

Running the Installer Using a Response File

Running Net Configuration Assistant Using a Response File

Postinstallation Configuration Using a Response File

C.1 How Response Files Work

When you start the installer, you can use a response file to automate the installation and configuration of Oracle software, either fully or partially. The installer uses the values contained in the response file to provide answers to some or all installation prompts.

Typically, the installer runs in interactive mode, which means that it prompts you to provide information in graphical user interface (GUI) screens. When you use response files to provide this information, you run the installer from a command prompt using either of the following modes:

Silent mode

If you include responses for all of the prompts in the response file and specify the -silent option when starting the installer, then it runs in silent mode. During a silent mode installation, the installer does not display any screens. Instead, it displays progress information in the terminal that you used to start it.

Response file mode

If you include responses for some or all of the prompts in the response file and omit the -silent option, then the installer runs in response file mode. During a response file mode installation, the installer displays all the screens, screens for which you specify information in the response file, and also screens for which you did not specify the required information in the response file.

You define the settings for a silent or response file installation by entering values for the variables listed in the response file. For example, to specify the Oracle home name, supply the appropriate value for the ORACLE_HOME variable:

ORACLE_HOME="OraDBHome1"

Another way of specifying the response file variable settings is to pass them as command line arguments when you run the installer. For example:

 -silent "ORACLE_HOME=OraDBHome1" ...

See Also:

Oracle Universal Installer and OPatch User's Guide for Windows and UNIX for more information about response files

C.1.1 Reasons for Using Silent Mode or Response File Mode

The following table provides use cases for running the installer in silent mode or response file mode.

Mode
Uses

Silent
Use silent mode to do the following installations:

Complete an unattended installation, which you schedule using operating system utilities such as at.

Complete several similar installations on multiple systems without user interaction.

Install the software on a system that does not have X Window System software installed on it.

The installer displays progress information on the terminal that you used to start it, but it does not display any of the installer screens.

Response file
Use response file mode to complete similar Oracle software installations on multiple systems, providing default answers to some, but not all of the installer prompts.

In response file mode, all the installer screens are displayed, but defaults for the fields in these screens are provided by the response file. You have to provide information for the fields in screens where you have not provided values in the response file.

C.1.2 General Procedure for Using Response Files

The following are the general steps to install and configure Oracle products using the installer in silent or response file mode:

Note:

You must complete all required preinstallation tasks on a system before running the installer in silent or response file mode.

Prepare a response file.

Run the installer in silent or response file mode.

If you completed a software-only installation, then run Net Configuration Assistant and Database Configuration Assistant in silent or response file mode.

These steps are described in the following sections.

C.2 Preparing a Response File

This section describes the following methods to prepare a response file for use during silent mode or response file mode installations:

Editing a Response File Template

Recording a Response File

C.2.1 Editing a Response File Template

Oracle provides response file templates for each product and installation type, and for each configuration tool. These files are located at database/response directory on the installation media.

Note:

If you copied the software to a hard disk, then the response files are located in the directory /response.

Table C-1 lists the response files provided with this software:

Table C-1 Response Files for Oracle Database

Response File
Description

db_install.rsp

Silent installation of Oracle Database 11g

dbca.rsp

Silent installation of Database Configuration Assistant

netca.rsp

Silent installation of Oracle Net Configuration Assistant

Table C-2 Response files for Oracle Grid Infrastructure

Response File
Description

grid_install.rsp

Silent installation of Oracle Grid Infrastructure installations

Caution:

When you modify a response file template and save a file for use, the response file may contain plain text passwords. Ownership of the response file should be given to the Oracle software installation owner only, and permissions on the response file should be changed to 600. Oracle strongly recommends that database administrators or other administrators delete or secure response files when they are not in use.

To copy and modify a response file:

Copy the response file from the response file directory to a directory on your system:

$ cp /directory_path/response/response_file.rsp local_directory

In this example, directory_path is the path to the database directory on the installation media. If you have copied the software to a hard drive, then you can edit the file in the response directory if you prefer.

Open the response file in a text editor:

$ vi /local_dir/response_file.rsp

See Also:

Oracle Universal Installer and OPatch User's Guide for Windows and UNIX for detailed information on creating response files

Follow the instructions in the file to edit it.

Note:

The installer or configuration assistant fails if you do not correctly configure the response file.

Change the permissions on the file to 600:

$ chmod 600 /local_dir/response_file.rsp

Note:

A fully specified response file for an Oracle Database installation contains the passwords for database administrative accounts and for a user who is a member of the OSDBA group (required for automated backups). Ensure that only the Oracle software owner user can view or modify response files or consider deleting them after the installation succeeds.

C.2.2 Recording a Response File

You can use the installer in interactive mode to record a response file, which you can edit and then use to complete silent mode or response file mode installations. This method is useful for custom or software-only installations.

Starting with Oracle Database 11g Release 2 (11.2), you can save all the installation steps into a response file during installation by clicking Save Response File on the Summary page. You can use the generated response file for a silent installation later.

When you record the response file, you can either complete the installation, or you can exit from the installer on the Summary page, before it starts to copy the software to the system.

If you use record mode during a response file mode installation, then the installer records the variable values that were specified in the original source response file into the new response file.

Note:

Oracle Universal Installer does not record passwords in the response file.

To record a response file:

Complete preinstallation tasks as for a normal installation.

Ensure that the Oracle Grid Infrastructure software owner user (typically grid) has permissions to create or write to the Oracle home path that you will specify when you run the installer.

On each installation screen, specify the required information.

When the installer displays the Summary screen, perform the following steps:

Click Save Response File and specify a file name and location to save the values for the response file, and click Save.

Click Finish to create the response file and continue with the installation.

Click Save Response File and click Cancel if you only want to create the response file but not continue with the installation. The installation will stop, but the settings you have entered will be recorded in the response file.

Before you use the saved response file on another system, edit the file and make any required changes.

Use the instructions in the file as a guide when editing it.

C.3 Running the Installer Using a Response File

Run Oracle Universal Installer at the command line, specifying the response file you created. The Oracle Universal Installer executable, runInstaller, provides several options. For help information on the full set of these options, run the runInstaller command with the -help option. For example:

$ directory_path/runInstaller -help

The help information appears in a window after some time.

To run the installer using a response file:

Complete the preinstallation tasks as for a normal installation

Log in as the software installation owner user.

If you are completing a response file mode installation, set the DISPLAY environment variable.

Note:

You do not have to set the DISPLAY environment variable if you are completing a silent mode installation.

To start the installer in silent or response file mode, enter a command similar to the following:

$ /directory_path/runInstaller [-silent] [-noconfig] \
 -responseFile responsefilename

Note:

Do not specify a relative path to the response file. If you specify a relative path, then the installer fails.

In this example:

directory_path is the path of the DVD or the path of the directory on the hard drive where you have copied the installation binaries.

-silent runs the installer in silent mode.

-noconfig suppresses running the configuration assistants during installation, and a software-only installation is performed instead.

responsefilename is the full path and file name of the installation response file that you configured.

When the installation completes, log in as the root user and run the root.sh script. For example

$ su root
password:
# /oracle_home_path/root.sh

C.4 Running Net Configuration Assistant Using a Response File

You can run Net Configuration Assistant in silent mode to configure and start an Oracle Net listener on the system, configure naming methods, and configure Oracle Net service names. To run Net Configuration Assistant in silent mode, you must copy and edit a response file template. Oracle provides a response file template named netca.rsp in the response directory in the database/response directory on the DVD.

Note:

If you copied the software to a hard disk, then the response file template is located in the database/response directory.

To run Net Configuration Assistant using a response file:

Copy the netca.rsp response file template from the response file directory to a directory on your system:

$ cp /directory_path/response/netca.rsp local_directory

In this example, directory_path is the path of the database directory on the DVD. If you have copied the software to a hard drive, you can edit the file in the response directory if you prefer.

Open the response file in a text editor:

$ vi /local_dir/netca.rsp

Follow the instructions in the file to edit it.

Note:

Net Configuration Assistant fails if you do not correctly configure the response file.

Log in as the Oracle software owner user, and set the ORACLE_HOME environment variable to specify the correct Oracle home directory.

Enter a command similar to the following to run Net Configuration Assistant in silent mode:

$ $ORACLE_HOME/bin/netca /silent /responsefile /local_dir/netca.rsp

In this command:

The /silent option indicates runs Net Configuration Assistant in silent mode.

local_dir is the full path of the directory where you copied the netca.rsp response file template.

C.5 Postinstallation Configuration Using a Response File

Use the following sections to create and run a response file configuration after installing Oracle software.

C.5.1 About the Postinstallation Configuration File

When you run a silent or response file installation, you provide information about your servers in a response file that you otherwise provide manually during a graphical user interface installation. However, the response file does not contain passwords for user accounts that configuration assistants require after software installation is complete. The configuration assistants are started with a script called configToolAllCommands. You can run this script in response file mode by creating and using a password response file. The script uses the passwords to run the configuration tools in succession to complete configuration.

If you keep the password file to use for clone installations, then Oracle strongly recommends that you store it in a secure location. In addition, if you have to stop an installation to fix an error, you can run the configuration assistants using configToolAllCommands and a password response file.

The configToolAllCommands password response file consists of the following syntax options:

internal_component_name is the name of the component that the configuration assistant configures

variable_name is the name of the configuration file variable

value is the desired value to use for configuration.

The command syntax is as follows:

internal_component_name|variable_name=value

For example:

oracle.assistants.asm|S_ASMPASSWORD=welcome

Oracle strongly recommends that you maintain security with a password response file:

Permissions on the response file should be set to 600.

The owner of the response file should be the installation owner user, with the group set to the central inventory (oraInventory) group.

C.5.2 Running Postinstallation Configuration Using a Response File

To run configuration assistants with the configToolAllCommands script:

Create a response file using the syntax filename.properties. For example:

$ touch cfgrsp.properties

Open the file with a text editor, and cut and paste the password template, modifying as needed.

Example C-1 Password response file for Oracle Grid Infrastructure installation for a cluster

Oracle Grid Infrastructure requires passwords for Oracle Automatic Storage Management Configuration Assistant (ASMCA), and for Intelligent Platform Management Interface Configuration Assistant (IPMICA) if you have a BMC card and you want to enable this feature. Provide the following response file:

oracle.assistants.asm|S_ASMPASSWORD=password
oracle.assistants.asm|S_ASMMONITORPASSWORD=password
oracle.crs|S_BMCPASSWORD=password

If you do not have a BMC card, or you do not want to enable IPMI, then leave the S_BMCPASSWORD input field blank.

Example C-2 Password response file for Oracle Real Application Clusters

Oracle Database configuration requires configuring a password for the SYS, SYSTEM, SYSMAN, and DBSNMP passwords for use with Database Configuration Assistant (DBCA). In addition, if you use Oracle ASM storage, then configure the ASMSNMP password. Also, if you selected to configure Oracle Enterprise Manager, then you must provide the password for the Oracle software installation owner for the S_HOSTUSERPASSWORD response.

oracle.assistants.server|S_SYSPASSWORD=password
oracle.assistants.server|S_SYSTEMPASSWORD=password
oracle.assistants.server|S_SYSMANPASSWORD=password
oracle.assistants.server|S_DBSNMPPASSWORD=password
oracle.assistants.server|S_HOSTUSERPASSWORD=password
oracle.assistants.server|S_ASMSNMPPASSWORD=password

If you do not want to enable Oracle Enterprise Manager or Oracle ASM, then leave those password fields blank.

Change permissions to secure the file. For example:

$ ls -al cfgrsp.properties
-rw------- 1 oracle oinstall 0 Apr 30 17:30 cfgrsp

Change directory to $ORACLE_HOME/cfgtoollogs, and run the configuration script using the following syntax:

configToolAllCommands RESPONSE_FILE=/path/name.properties

for example:

$ ./configToolAllCommands RESPONSE_FILE=/home/oracle/cfgrsp.properties

D Oracle Grid Infrastructure for a Cluster Installation Concepts

This appendix explains the reasons for preinstallation tasks that you are asked to perform, and other installation concepts.

This appendix contains the following sections:

Understanding Preinstallation Configuration

Understanding Network Addresses

Understanding Network Time Requirements

Understanding Oracle Flex Clusters and Oracle ASM Flex Clusters

Understanding Storage Configuration

Understanding Out-of-Place Upgrade

D.1 Understanding Preinstallation Configuration

This section reviews concepts about Oracle Grid Infrastructure for a cluster preinstallation tasks. It contains the following sections:

Optimal Flexible Architecture Guidelines for Oracle Grid Infrastructure

Oracle Grid Infrastructure for a Cluster and Oracle Restart Differences

Understanding the Oracle Inventory Group

Understanding the Oracle Inventory Directory

Understanding the Oracle Base directory

Understanding the Oracle Home for Oracle Grid Infrastructure Software

Location of Oracle Base and Oracle Grid Infrastructure Software Directories

D.1.1 Optimal Flexible Architecture Guidelines for Oracle Grid Infrastructure

For installations with Oracle Grid Infrastructure only, Oracle recommends that you create an Oracle base and Grid home path compliant with Oracle Optimal Flexible Architecture (OFA) guidelines, so that Oracle Universal Installer (OUI) can select that directory during installation. For OUI to recognize the path as an Oracle software path, it must be in the form u[0-9][1-9]/app.

The OFA path for an Oracle base is u[0-9][1-9]/app/user, where user is the name of the Oracle software installation owner account.

The OFA path for an Oracle Grid Infrastructure Oracle home is u[0-9][1-9]/app/release/grid where release is the three-digit Oracle Grid Infrastructure release (for example, 12.1.0).

When OUI finds an OFA-compliant software path (u[0-9][1-9]/app), it creates the Oracle Grid Infrastructure Grid home and Oracle Inventory (oraInventory) directories for you. For example, the path /u01/app and /u89/app are OFA-compliant paths.

The Oracle Grid Infrastructure home must be in a path that is different from the Grid home for the Oracle Grid Infrastructure installation owner. If you create an Oracle Grid Infrastructure base path manually, then ensure that it is in a separate path specific for this release, and not under an existing Oracle base path.

Note:

If you choose to create an Oracle Grid Infrastructure home manually, then do not create the Oracle Grid Infrastructure home for a cluster under either the Oracle Grid Infrastructure installation owner (grid) Oracle base or the Oracle Database installation owner (oracle) Oracle base. Creating an Oracle Clusterware installation in an Oracle base directory will cause succeeding Oracle installations to fail.

Oracle Grid Infrastructure homes can be placed in a local home on servers, even if your existing Oracle Clusterware home from a prior release is in a shared location.

D.1.2 Oracle Grid Infrastructure for a Cluster and Oracle Restart Differences

Requirements for Oracle Grid Infrastructure for a cluster are different from Oracle Grid Infrastructure on a single instance in an Oracle Restart configuration.

See Also:

Oracle Database Installation Guide for information about Oracle Restart requirements

D.1.3 Understanding the Oracle Inventory Group

You must have a group whose members are given access to write to the Oracle Inventory (oraInventory) directory, which is the central inventory record of all Oracle software installations on a server. Members of this group have write privileges to the Oracle central inventory (oraInventory) directory, and are also granted permissions for various Oracle Clusterware resources, OCR keys, directories in the Oracle Clusterware home to which DBAs need write access, and other necessary privileges. By default, this group is called oinstall. The Oracle Inventory group must be the primary group for Oracle software installation owners.

The oraInventory directory contains the following:

A registry of the Oracle home directories (Oracle Grid Infrastructure and Oracle Database) on the system.

Installation logs and trace files from installations of Oracle software. These files are also copied to the respective Oracle homes for future reference.

Other metadata inventory information regarding Oracle installations are stored in the individual Oracle home inventory directories, and are separate from the central inventory.

You can configure one group to be the access control group for the Oracle Inventory, for database administrators (OSDBA), and for all other access control groups used by Oracle software for operating system authentication. However, if you use one group to provide operating system authentication for all system privileges, then this group must be the primary group for all users to whom you want to grant administrative system privileges.

Note:

If Oracle software is already installed on the system, then the existing Oracle Inventory group must be the primary group of the operating system user (oracle or grid) that you use to install Oracle Grid Infrastructure. See Section 5.1.1, "Determining If the Oracle Inventory and Oracle Inventory Group Exists"to identify an existing Oracle Inventory group.

D.1.4 Understanding the Oracle Inventory Directory

The Oracle Inventory directory (oraInventory) is the central inventory location for all Oracle software installed on a server. Each cluster member node has its own central inventory file. You cannot have a shared Oracle Inventory directory, because it is used to point to the installed Oracle homes for all Oracle software installed on a node.

The first time you install Oracle software on a system, you are prompted to provide an oraInventory directory path.

By default, if an oraInventory group does not exist, then the installer lists the primary group of the installation owner for the Oracle Grid Infrastructure for a cluster software as the oraInventory group. Ensure that this group is available as a primary group for all planned Oracle software installation owners.

The primary group of all Oracle installation owners should be the Oracle Inventory Group (oinstall), whose members are granted the OINSTALL system privileges to write to the central Oracle Inventory for a server, to write log files, and other privileges.

Note:

Group and user IDs must be identical on all nodes in the cluster. Check to make sure that the group and user IDs you want to use are available on each cluster member node, and confirm that the primary group for each Oracle Grid Infrastructure for a cluster installation owner has the same name and group ID.

If the primary group of an installation owner is the user home directory (for example, /home/oracle), then the Oracle Inventory is placed in the installation owner's home directory. This placement can cause permission errors during subsequent installations with multiple Oracle software owners. For that reason, Oracle recommends that you do not accept this option, and instead use an OFA-compliant path.

If you set an Oracle base variable to a path such as /u01/app/grid or /u01/app/oracle, then the Oracle Inventory is defaulted to the path u01/app/oraInventory using correct permissions to allow all Oracle installation owners to write to this central inventory directory.

By default, the Oracle Inventory directory is not installed under the Oracle base directory for the installation owner. This is because all Oracle software installations share a common Oracle Inventory, so there is only one Oracle Inventory for all users, whereas there is a separate Oracle base for each user.

D.1.5 Understanding the Oracle Base directory

During installation, you are prompted to specify an Oracle base location, which is owned by the user performing the installation. The Oracle base directory is where log files specific to the user are placed. You can choose a location with an existing Oracle home, or choose another directory location that does not have the structure for an Oracle base directory.

Using the Oracle base directory path helps to facilitate the organization of Oracle installations, and helps to ensure that installations of multiple databases maintain an Optimal Flexible Architecture (OFA) configuration.

The Oracle base directory for the Oracle Grid Infrastructure installation is the location where diagnostic and administrative logs, and other logs associated with Oracle ASM and Oracle Clusterware are stored. For Oracle installations other than Oracle Grid Infrastructure for a cluster, it is also the location under which an Oracle home is placed.

However, in the case of an Oracle Grid Infrastructure installation, you must create a different path, so that the path for Oracle bases remains available for other Oracle installations.

For OUI to recognize the Oracle base path as an Oracle software path, it must be in the form u[00-99][00-99]/app, and it must be writable by any member of the oraInventory (oinstall) group. The OFA path for the Oracle base is u[00-99][00-99]/app/user, where user is the name of the software installation owner. For example:

/u01/app/grid

Because you can have only one Oracle Grid Infrastructure installation on a cluster, and all upgrades are out-of-place upgrades, Oracle recommends that you create an Oracle base for the grid infrastructure software owner (grid), and create an Oracle home for the Oracle Grid Infrastructure binaries using the release number of that installation.

D.1.6 Understanding the Oracle Home for Oracle Grid Infrastructure Software

The Oracle home for Oracle Grid Infrastructure software (Grid home) should be in a path in the format u[00-99][00-99]/app/release/grid, where release is the release number of the Oracle Grid Infrastructure software. For example:

/u01/app/12.1.0/grid

During installation, ownership of the path to the Grid home is changed to root. If you do not create a unique path to the Grid home, then after the Grid install, you can encounter permission errors for other installations, including any existing installations under the same path.

Ensure that the directory path you provide for the Oracle Grid Infrastructure software location (Grid home) complies with the following requirements:

If you create the path before installation, then it should be owned by the installation owner of Oracle Grid Infrastructure (typically oracle for a single installation owner for all Oracle software, or grid for role-based Oracle installation owners), and set to 775 permissions.

It should be created in a path outside existing Oracle homes, including Oracle Clusterware homes.

It should not be located in a user home directory.

It must not be the same location as the Oracle base for the Oracle Grid Infrastructure installation owner (grid), or the Oracle base of any other Oracle installation owner (for example, /u01/app/oracle).

It should be created either as a subdirectory in a path where all files can be owned by root, or in a unique path.

Oracle recommends that you install Oracle Grid Infrastructure binaries on local homes, rather than using a shared home on shared storage.

D.1.7 Location of Oracle Base and Oracle Grid Infrastructure Software Directories

Even if you do not use the same software owner to install Grid Infrastructure (Oracle Clusterware and Oracle ASM) and Oracle Database, be aware that running the root.sh script during the Oracle Grid Infrastructure installation changes ownership of the home directory where clusterware binaries are placed to root, and all ancestor directories to the root level (/) are also changed to root. For this reason, the Oracle Grid Infrastructure for a cluster home cannot be in the same location as other Oracle software.

However, Oracle Restart can be in the same location as other Oracle software.

See Also:

Oracle Database Installation Guide for your platform for more information about Oracle Restart

D.2 Understanding Network Addresses

During installation, you are asked to identify the planned use for each network interface that OUI detects on your cluster node. Identify each interface as a public or private interface, or as an interface that you do not want Oracle Grid Infrastructure or Oracle Flex ASM cluster to use. Public and virtual IP addresses are configured on public interfaces. Private addresses are configured on private interfaces.

See the following sections for detailed information about each address type:

About the Public IP Address

About the Private IP Address

About the Virtual IP Address

About the Grid Naming Service (GNS) Virtual IP Address

About the SCAN for Oracle Grid Infrastructure Installations

D.2.1 About the Public IP Address

The public IP address is assigned dynamically using DHCP, or defined statically in a DNS or in a hosts file. It uses the public interface (the interface with access available to clients). The public IP address is the primary address for a cluster member node, and should be the address that resolves to the name returned when you enter the command hostname.

If you configure IP addresses manually, then avoid changing host names after you complete the Oracle Grid Infrastructure installation, including adding or deleting domain qualifications. A node with a new host name is considered a new host, and must be added to the cluster. A node under the old name will appear to be down until it is removed from the cluster.

D.2.2 About the Private IP Address

Oracle Clusterware uses interfaces marked as private for internode communication. Each cluster node needs to have an interface that you identify during installation as a private interface. Private interfaces need to have addresses configured for the interface itself, but no additional configuration is required. Oracle Clusterware uses interfaces you identify as private for the cluster interconnect. If you identify multiple interfaces during information for the private network, then Oracle Clusterware configures them with Redundant Interconnect Usage. Any interface that you identify as private must be on a subnet that connects to every node of the cluster. Oracle Clusterware uses all the interfaces you identify for use as private interfaces.

For the private interconnects, because of Cache Fusion and other traffic between nodes, Oracle strongly recommends using a physically separate, private network. If you configure addresses using a DNS, then you should ensure that the private IP addresses are reachable only by the cluster nodes.

After installation, if you modify interconnects on Oracle RAC with the CLUSTER_INTERCONNECTS initialization parameter, then you must change it to a private IP address, on a subnet that is not used with a public IP address. Oracle does not support changing the interconnect to an interface using a subnet that you have designated as a public subnet.

You should not use a firewall on the network with the private network IP addresses, as this can block interconnect traffic.

D.2.3 About the Virtual IP Address

If you are not using Grid Naming Service (GNS), then determine a virtual host name for each node. A virtual host name is a public node name that is used to reroute client requests sent to the node if the node is down. Oracle Database uses VIPs for client-to-database connections, so the VIP address must be publicly accessible. Oracle recommends that you provide a name in the format hostname-vip. For example: myclstr2-vip.

The virtual IP (VIP) address is registered in the GNS, or the DNS. Select an address for your VIP that meets the following requirements:

The IP address and host name are currently unused (it can be registered in a DNS, but should not be accessible by a ping command)

The VIP is on the same subnet as your public interface

D.2.4 About the Grid Naming Service (GNS) Virtual IP Address

The GNS virtual IP address is a static IP address configured in the DNS. The DNS delegates queries to the GNS virtual IP address, and the GNS daemon responds to incoming name resolution requests at that address.

Within the subdomain, the GNS uses multicast Domain Name Service (mDNS), included with Oracle Clusterware, to enable the cluster to map host names and IP addresses dynamically as nodes are added and removed from the cluster, without requiring additional host configuration in the DNS.

To enable GNS, you must have your network administrator provide a set of IP addresses for a subdomain assigned to the cluster (for example, grid.example.com), and delegate DNS requests for that subdomain to the GNS virtual IP address for the cluster, which GNS will serve. The set of IP addresses is provided to the cluster through DHCP, which must be available on the public network for the cluster.

See Also:

Oracle Clusterware Administration and Deployment Guide for more information about Grid Naming Service

D.2.5 About the SCAN for Oracle Grid Infrastructure Installations

Oracle Database clients connect to Oracle Real Application Clusters database using SCANs. The SCAN and its associated IP addresses provide a stable name for clients to use for connections, independent of the nodes that make up the cluster. SCAN addresses, virtual IP addresses, and public IP addresses must all be on the same subnet.

The SCAN is a virtual IP name, similar to the names used for virtual IP addresses, such as node1-vip. However, unlike a virtual IP, the SCAN is associated with the entire cluster, rather than an individual node, and associated with multiple IP addresses, not just one address.

The SCAN works by being able to resolve to multiple IP addresses in the cluster handling public client connections. When a client submits a request, the SCAN listener listening on a SCAN IP address and the SCAN port is made available to a client. Because all services on the cluster are registered with the SCAN listener, the SCAN listener replies with the address of the local listener on the least-loaded node where the service is currently being offered. Finally, the client establishes connection to the service through the listener on the node where service is offered. All of these actions take place transparently to the client without any explicit configuration required in the client.

During installation listeners are created. They listen on the SCAN IP addresses provided on nodes for the SCAN IP addresses. Oracle Net Services routes application requests to the least loaded instance providing the service. Because the SCAN addresses resolve to the cluster, rather than to a node address in the cluster, nodes can be added to or removed from the cluster without affecting the SCAN address configuration.

The SCAN should be configured so that it is resolvable either by using Grid Naming Service (GNS) within the cluster, or by using Domain Name Service (DNS) resolution. For high availability and scalability, Oracle recommends that you configure the SCAN name so that it resolves to three IP addresses. At a minimum, the SCAN must resolve to at least one address.

If you specify a GNS domain, then the SCAN name defaults to clustername-scan.GNS_domain. Otherwise, it defaults to clustername-scan.current_domain. For example, if you start Oracle Grid Infrastructure installation from the server node1, the cluster name is mycluster, and the GNS domain is grid.example.com, then the SCAN Name is mycluster-scan.grid.example.com.

Clients configured to use IP addresses for Oracle Database releases before Oracle Database 11g Release 2 can continue to use their existing connection addresses; using SCANs is not required. When you upgrade to Oracle Clusterware 12c Release 1 (12.1), the SCAN becomes available, and you should use the SCAN for connections to Oracle Database 11g Release 2 or later databases. When an earlier version of Oracle Database is upgraded, it registers with the SCAN listeners, and clients can start using the SCAN to connect to that database. The database registers with the SCAN listener through the remote listener parameter in the init.ora file. The REMOTE_LISTENER parameter must be set to SCAN:PORT. Do not set it to a TNSNAMES alias with a single address with the SCAN as HOST=SCAN.

The SCAN is optional for most deployments. However, clients using Oracle Database 11g Release 2 and later policy-managed databases using server pools should access the database using the SCAN. This is because policy-managed databases can run on different servers at different times, so connecting to a particular node virtual IP address for a policy-managed database is not possible.

Provide SCAN addresses for client access to the cluster. These addresses should be configured as round robin addresses on the domain name service (DNS). Oracle recommends that you supply three SCAN addresses.

Note:

The following is a list of additional information about node IP addresses:

For the local node only, OUI automatically fills in public and VIP fields. If your system uses vendor clusterware, then OUI may fill additional fields.

Host names and virtual host names are not domain-qualified. If you provide a domain in the address field during installation, then OUI removes the domain from the address.

Interfaces identified as private for private IP addresses should not be accessible as public interfaces. Using public interfaces for Cache Fusion can cause performance problems.

Identify public and private interfaces. OUI configures public interfaces for use by public and virtual IP addresses, and configures private IP addresses on private interfaces.

The private subnet that the private interfaces use must connect all the nodes you intend to have as cluster members.

D.3 Understanding Network Time Requirements

Oracle Clusterware 12c Release 1 (12.1) is automatically configured with Cluster Time Synchronization Service (CTSS). This service provides automatic synchronization of all cluster nodes using the optimal synchronization strategy for the type of cluster you deploy. If you have existing cluster time synchronization service, such as NTP, then it starts in an observer mode. Otherwise, it starts in an active mode to ensure that time is synchronized between cluster nodes. CTSS does not cause compatibility issues.

The CTSS module is installed as a part of Oracle Grid Infrastructure installation. CTSS daemons are started up by the OHAS daemon (ohasd), and do not require a command-line interface.

D.4 Understanding Oracle Flex Clusters and Oracle ASM Flex Clusters

Oracle Grid Infrastructure installed in an Oracle Flex Cluster configuration is a scalable, dynamic, robust network of nodes. Oracle Flex Clusters also provide a platform for other service deployments that require coordination and automation for high availability.

All nodes in an Oracle Flex Cluster belong to a single Oracle Grid Infrastructure cluster. This architecture centralizes policy decisions for deployment of resources based on application needs, to account for various service levels, loads, failure responses, and recovery.

Oracle Flex Clusters contain two types of nodes arranged in a hub and spoke architecture: Hub Nodes and Leaf Nodes. The number of Hub Nodes in an Oracle Flex Cluster can be as many as 64. The number of Leaf Nodes can be many more. Hub Nodes and Leaf Nodes can host different types of applications.

Oracle Flex Cluster Hub Nodes are similar to Oracle Grid Infrastructure nodes in a standard configuration: they are tightly connected, and have direct access to shared storage.

Leaf Nodes are different from standard Oracle Grid Infrastructure nodes, in that they do not require direct access to shared storage. Hub Nodes can run in an Oracle Flex Cluster configuration without having any Leaf Nodes as cluster member nodes, but Leaf Nodes must be members of a cluster with a pool of Hub Nodes.

See Also:

Oracle Clusterware Administration and Deployment Guide for information about Oracle Flex Cluster deployments

Oracle Database Storage Administrator's Guide for information about Oracle Flex ASM

D.5 Understanding Storage Configuration

About Migrating Existing Oracle ASM Instances

Standalone Oracle ASM Installations to Clustered Installation Conversions

D.5.1 About Migrating Existing Oracle ASM Instances

If you have an Oracle ASM installation from a prior release installed on your server, or in an existing Oracle Clusterware installation, then you can use Oracle Automatic Storage Management Configuration Assistant (ASMCA, located in the path Grid_home/bin) to upgrade the existing Oracle ASM instance to Oracle ASM 12c Release 1 (12.1), and subsequently configure failure groups, and Oracle ASM volumes.

Note:

You must first shut down all database instances and applications on the node with the existing Oracle ASM instance before upgrading it.

During installation, if you chose to use Oracle ASM and ASMCA detects that there is a prior Oracle ASM version installed in another home, then after installing the Oracle ASM 12c Release 1 (12.1) binaries, you can start ASMCA to upgrade the existing Oracle ASM instance.

On an existing Oracle Clusterware or Oracle RAC installation, if the earlier version of Oracle ASM instances on all nodes is Oracle ASM 11g Release 1 (11.1), then you are provided with the option to perform a rolling upgrade of Oracle ASM instances. If the earlier version of Oracle ASM instances on an Oracle RAC installation are from an Oracle ASM release before Oracle ASM 11g Release 1 (11.1), then rolling upgrades cannot be performed. Oracle ASM is then upgraded on all nodes to 12c Release 1 (12.1).

D.5.2 Standalone Oracle ASM Installations to Clustered Installation Conversions

If you have existing standalone Oracle ASM installations on one or more nodes that are member nodes of the cluster, then OUI proceeds to install Oracle Grid Infrastructure for a cluster.

If you place Oracle Clusterware files (OCR and voting disks) on Oracle ASM, then ASMCA is started at the end of the clusterware installation, and provides prompts for you to migrate and upgrade the Oracle ASM instance on the local node, so that you have an Oracle ASM 12c Release 1 (12.1) installation.

On remote nodes, ASMCA identifies any standalone Oracle ASM instances that are running, and prompts you to shut down those Oracle ASM instances, and any database instances that use them. ASMCA then extends clustered Oracle ASM instances to all nodes in the cluster. However, disk group names on the cluster-enabled Oracle ASM instances must be different from existing standalone disk group names.

See Also:

Oracle Database Storage Administrator's Guide

D.6 Understanding Out-of-Place Upgrade

With an out-of-place upgrade, the installer installs the newer version in a separate Oracle Clusterware home. Both versions of Oracle Clusterware are on each cluster member node, but only one version is active.

Rolling upgrade avoids downtime and ensure continuous availability while the software is upgraded to a new version.

If you have separate Oracle Clusterware homes on each node, then you can perform an out-of-place upgrade on all nodes, or perform an out-of-place rolling upgrade, so that some nodes are running Oracle Clusterware from the earlier version Oracle Clusterware home, and other nodes are running Oracle Clusterware from the new Oracle Clusterware home.

An in-place upgrade of Oracle Grid Infrastructure is not supported.

See Also:

Appendix B, "How to Upgrade to Oracle Grid Infrastructure 12c Release 1" for instructions on completing rolling upgrades

E How to Complete Installation Tasks Manually

This appendix provides instructions for how to complete configuration tasks manually that Cluster Verification Utility (CVU) and the installer (OUI) normally complete during installation. Use this appendix as a guide if you cannot use the fixup script.

This appendix contains the following information:

Configuring SSH Manually on All Cluster Nodes

Configuring Kernel Parameters

Setting UDP and TCP Kernel Parameters Manually

E.1 Configuring SSH Manually on All Cluster Nodes

Passwordless SSH configuration is a mandatory installation requirement. SSH is used during installation to configure cluster member nodes, and SSH is used after installation by configuration assistants, Oracle Enterprise Manager, Opatch, and other features.

Automatic Passwordless SSH configuration using OUI creates RSA encryption keys on all nodes of the cluster. If you have system restrictions that require you to set up SSH manually, such as using DSA keys, then use this procedure as a guide to set up passwordless SSH.

In the examples that follow, the Oracle software owner listed is the grid user.

If SSH is not available, then OUI attempts to use rsh and rcp instead. However, these services often are disabled for security.

This section contains the following:

Checking Existing SSH Configuration on the System

Configuring SSH on Cluster Nodes

Enabling SSH User Equivalency on Cluster Nodes

E.1.1 Checking Existing SSH Configuration on the System

To determine if SSH is running, enter the following command:

$ pgrep sshd

If SSH is running, then the response to this command is one or more process ID numbers. In the home directory of the installation software owner (grid, oracle), use the command ls -al to ensure that the .ssh directory is owned and writable only by the user.

You need either an RSA or a DSA key for the SSH protocol. RSA is used with the SSH 1.5 protocol, while DSA is the default for the SSH 2.0 protocol. With OpenSSH, you can use either RSA or DSA. The instructions that follow are for SSH1. If you have an SSH2 installation, and you cannot use SSH1, then refer to your SSH distribution documentation to configure SSH1 compatibility or to configure SSH2 with DSA.

E.1.2 Configuring SSH on Cluster Nodes

To configure SSH, you must first create RSA or DSA keys on each cluster node, and then copy all the keys generated on all cluster node members into an authorized keys file that is identical on each node. Note that the SSH files must be readable only by root and by the software installation user (oracle, grid), as SSH ignores a private key file if it is accessible by others. In the examples that follow, the DSA key is used.

You must configure SSH separately for each Oracle software installation owner that you intend to use for installation.

To configure SSH, complete the following:

E.1.2.1 Create SSH Directory, and Create SSH Keys On Each Node

Complete the following steps on each node:

Log in as the software owner (in this example, the grid user).

To ensure that you are logged in as grid, and to verify that the user ID matches the expected user ID you have assigned to the grid user, enter the commands id and id grid. Ensure that Oracle user group and user and the user terminal window process you are using have group and user IDs are identical. For example:

$ id
uid=502(grid) gid=501(oinstall) groups=501(oinstall),502(grid,asmadmin,asmdba)
$ id grid
uid=502(grid) gid=501(oinstall) groups=501(oinstall),502(grid,asmadmin,asmdba)

If necessary, create the .ssh directory in the grid user's home directory, and set permissions on it to ensure that only the oracle user has read and write permissions:

$ mkdir ~/.ssh
$ chmod 700 ~/.ssh

Note:

SSH configuration will fail if the permissions are not set to 700.

Enter the following command:

$ /usr/bin/ssh-keygen -t dsa

At the prompts, accept the default location for the key file (press Enter).

Note:

SSH with passphrase is not supported for Oracle Clusterware 11g release 2 and later releases.

This command writes the DSA public key to the ~/.ssh/id_dsa.pub file and the private key to the ~/.ssh/id_dsa file.

Never distribute the private key to anyone not authorized to perform Oracle software installations.

Repeat steps 1 through 4 on each node that you intend to make a member of the cluster, using the DSA key.

E.1.2.2 Add All Keys to a Common authorized_keys File

Complete the following steps:

On the local node, change directories to the .ssh directory in the Oracle Grid Infrastructure owner's home directory (typically, either grid or oracle).

Then, add the DSA key to the authorized_keys file using the following commands:

$ cat id_dsa.pub >> authorized_keys
$ ls

In the .ssh directory, you should see the id_dsa.pub keys that you have created, and the file authorized_keys.

On the local node, use SCP (Secure Copy) or SFTP (Secure FTP) to copy the authorized_keys file to the oracle user .ssh directory on a remote node. The following example is with SCP, on a node called node2, with the Oracle Grid Infrastructure owner grid, where the grid user path is /home/grid:

[grid@node1 .ssh]$ scp authorized_keys node2:/home/grid/.ssh/

You are prompted to accept a DSA key. Enter Yes, and you see that the node you are copying to is added to the known_hosts file.

When prompted, provide the password for the grid user, which should be the same on all nodes in the cluster. The authorized_keys file is copied to the remote node.

Your output should be similar to the following, where xxx represents parts of a valid IP address:

[grid@node1 .ssh]$ scp authorized_keys node2:/home/grid/.ssh/
The authenticity of host 'node2 (xxx.xxx.173.152) can't be established.
DSA key fingerprint is 7e:60:60:ae:40:40:d1:a6:f7:4e:zz:me:a7:48:ae:f6:7e.
Are you sure you want to continue connecting (yes/no)? yes
Warning: Permanently added 'node1,xxx.xxx.173.152' (dsa) to the list
of known hosts
grid@node2's password:
authorized_keys       100%             828             7.5MB/s      00:00

Using SSH, log in to the node where you copied the authorized_keys file. Then change to the .ssh directory, and using the cat command, add the DSA keys for the second node to the authorized_keys file, clicking Enter when you are prompted for a password, so that passwordless SSH is set up:

[grid@node1 .ssh]$ ssh node2
[grid@node2 grid]$ cd .ssh
[grid@node2 ssh]$ cat id_dsa.pub  >> authorized_keys

Repeat steps 2 and 3 from each node to each other member node in the cluster.

When you have added keys from each cluster node member to the authorized_keys file on the last node you want to have as a cluster node member, then use scp to copy the authorized_keys file with the keys from all nodes back to each cluster node member, overwriting the existing version on the other nodes.

To confirm that you have all nodes in the authorized_keys file, enter the command more authorized_keys, and determine if there is a DSA key for each member node. The file lists the type of key (ssh-dsa), followed by the key, and then followed by the user and server. For example:

ssh-dsa AAAABBBB . . . = grid@node1

Note:

The grid user's /.ssh/authorized_keys file on every node must contain the contents from all of the /.ssh/id_dsa.pub files that you generated on all cluster nodes.

E.1.3 Enabling SSH User Equivalency on Cluster Nodes

After you have copied the authorized_keys file that contains all keys to each node in the cluster, complete the following procedure, in the order listed. In this example, the Oracle Grid Infrastructure software owner is named grid:

On the system where you want to run OUI, log in as the grid user.

Use the following command syntax, where hostname1, hostname2, and so on, are the public host names (alias and fully qualified domain name) of nodes in the cluster to run SSH from the local node to each node, including from the local node to itself, and from each node to each other node:

[grid@nodename]$ ssh hostname1 date
[grid@nodename]$ ssh hostname2 date
    .
    .
    .

For example:

[grid@node1 grid]$ ssh node1 date
The authenticity of host 'node1 (xxx.xxx.100.101)' can't be established.
DSA key fingerprint is 7z:60:60:zz:48:48:z1:a0:f7:4e.
Are you sure you want to continue connecting (yes/no)? yes
Warning: Permanently added 'node1,xxx.xxx.100.101' (DSA) to the list of
known hosts.
Mon Dec 4 11:08:13 PST 2006
[grid@node1 grid]$ ssh node1.example.com date
The authenticity of host 'node1.example.com (xxx.xxx.100.101)' can't be
established.
DSA key fingerprint is 7z:60:60:zz:48:48:z1:a0:f7:4e.
Are you sure you want to continue connecting (yes/no)? yes
Warning: Permanently added 'node1.example.com,xxx.xxx.100.101' (DSA) to the
list of known hosts.
Mon Dec 4 11:08:13 PST 2006
[grid@node1 grid]$ ssh node2 date
Mon Dec 4 11:08:35 PST 2006
.
.
.

At the end of this process, the public host name for each member node should be registered in the known_hosts file for all other cluster nodes.

If you are using a remote client to connect to the local node, and you see a message similar to "Warning: No xauth data; using fake authentication data for X11 forwarding," then this means that your authorized keys file is configured correctly, but your SSH configuration has X11 forwarding enabled. To correct this issue, proceed to Section 5.2.3, "Setting Remote Display and X11 Forwarding Configuration."

Repeat step 2 on each cluster node member.

If you have configured SSH correctly, then you can now use the ssh or scp commands without being prompted for a password. For example:

[grid@node1 ~]$ ssh node2 date
Mon Feb 26 23:34:42 UTC 2009
[grid@node1 ~]$ ssh node1 date
Mon Feb 26 23:34:48 UTC 2009

If any node prompts for a password, then verify that the ~/.ssh/authorized_keys file on that node contains the correct public keys, and that you have created an Oracle software owner with identical group membership and IDs.

E.2 Configuring Kernel Parameters

Note:

The kernel parameter values shown in this section are recommended values only. For production database systems, Oracle recommends that you tune these values to optimize the performance of the system. See your operating system documentation for more information about tuning kernel parameters.

On HP-UX 11.31 (version 3), the following parameters are not valid:

msgmap

msgseg

E.2.1 Minimal Kernel Parameter Values

On all cluster nodes, verify that the kernel parameters shown in Table E-1 are set either to the formula shown, or to values greater than or equal to the recommended value shown. The procedure following the table describes how to verify and set the values.

Table E-1 Minimal HP-UX Kernel Parameter Values

Parameter
Minimum Required Value

ksi_alloc_max

32768

executable_stack

0

max_thread_proc

1024

maxdsiz

1073741824 (1 GB)

maxdsiz_64bit

2147483648 (2 GB)

maxfiles

1024

maxfiles_lim

32767

maxssiz

134217728 (128 MB)

maxssiz_64bit

1073741824 (1 GB)

maxuprc

3686

msgmni

4096

msgtql

4096

ncsize

35840

nflocks

4096

ninode

34816

nkthread

7184

nproc

4096

semmni

4096

semmns

8192

semmnu

4092

semvmx

32767

shmmax

1073741824

shmmni

4096

shmseg

512

tcp_largest_anon_port

65500

udp_largest_anon_port

65500

Ensure that you set the TCP and UDP kernel parameters by following the procedure described in the section Setting UDP and TCP Kernel Parameters Manually.

Note:

If the current value for any parameter is higher than the value listed in this table, then do not change the value of that parameter.

If you do not use HFS, then retain the default ninode value.

E.2.2 Setting Kernel Parameters Manually

To view the current value or formula specified for these kernel parameters, and to change them if necessary, use kctune, HP System Management Homepage (HP SMH), or HP-UX Kernel Configuration (kcweb).

Modifying Kernel Settings Using KCTUNE

Modifying Kernel Settings Using SMH

Modifying Kernel Settings Using KCWEB

E.2.2.1 Modifying Kernel Settings Using KCTUNE

Use /usr/sbin/kctune to view or change kernel parameters. For example, to view kernel parameters, enter kctune with the -d flag. For example:

# /usr/sbin/kctune -d

To modify a kernel parameter, enter kctune variable=value. For example:

# /usr/sbin/kctune aio_listio_max=512

Complete this procedure on all other cluster nodes.

E.2.2.2 Modifying Kernel Settings Using SMH

The following procedure describes how to modify kernel settings using HP System Management Homepage ( SMH):

Optionally, set the DISPLAY environment variable to specify the display of the local system:

Bourne, Bash, or Korn shell:

# DISPLAY=local_host:0.0 ; export DISPLAY

C shell:

# setenv DISPLAY local_host:0.0

Start SMH:

# /usr/sbin/smh

Choose the Kernel Configuration area, then choose the Configurable Parameters area.

Check the value or formula specified for each of these parameters and, if necessary, modify that value or formula.

If necessary, refer to the SMH online Help for more information about completing this step.

Note:

If you modify the value of a parameter that is not dynamic, then you must restart the system.

If necessary, when the system restarts, log in and switch user to root.

Complete this procedure on all other cluster nodes.

E.2.2.3 Modifying Kernel Settings Using KCWEB

The following procedure shows how to

Enter the following command to start the kcweb application:

# /usr/sbin/kcweb -F

Check the value or formula specified for each of these parameters and, if necessary, modify that value or formula.

If necessary, refer to the kcweb online Help for more information about completing this step.

Note:

If you modify the value of a parameter that is not dynamic, then you must restart the system.

If necessary, when the system restarts, log in and switch user to root.

Complete this procedure on all other cluster nodes.

E.2.3 Configuring Kernel Parameters on HP-UX Systems

During installation, you can generate and run the Fixup script to check and set the kernel parameter values required for successful installation of the database. This script updates required kernel packages if necessary to minimum values.

If you cannot use the Fixup scripts, then verify that the kernel parameters are set to values greater than or equal to the minimum value shown in Appendix E, "Configuring Kernel Parameters." The procedure following the table describes how to verify and set the values manually.

Note:

The kernel parameter and shell limit values configured by Fixup scripts and listed in Appendix E, "Configuring Kernel Parameters" are minimum values only. For production database systems, Oracle recommends that you tune these values to optimize the performance of the system. Refer to the operating system documentation for more information about tuning kernel parameters.

E.3 Setting UDP and TCP Kernel Parameters Manually

Use NDD to ensure that the HP-UX kernel TCP/IP ephemeral port range is broad enough to provide enough ephemeral ports for the anticipated server workload. Set the port range high enough to avoid reserved ports for any applications you may intend to use.

For example:

# /usr/bin/ndd /dev/tcp tcp_largest_anon_port
65535

In the preceding example, tcp_largest_anon_port is set to the default value.

If necessary, edit the file /etc/rc.config.d/nddconf and add entries to update the UDP and TCP ephemeral port values. For example:

TRANSPORT_NAME[0]=tcp
NDD_NAME[0]=tcp_largest_anon_port
NDD_VALUE[0]=65500

TRANSPORT_NAME[1]=udp
NDD_NAME[1]=udp_largest_anon_port
NDD_VALUE[1]=65500

Ensure that the entries are numbered in proper order. For example, if there are two entries present for the TCP and UDP ports in nddconf, then ensure that they are numbered 0 and 1: TRANSPORT_NAME[0]=tcp and TRANSPORT_NAME[1]=udp.

Note:

The tcp_smallest_anon_port and udp_smallest_anon_port parameters are obsolete and you do not need to set them.

Index

A  B  C  D  E  F  G  H  I  J  K  L  M  N  O  P  R  S  T  U  V  W  X 

Numbers

32-bit and 64-bit

software versions in the same cluster not supported, 2.2

A

and Fixup script feature, 3.3

architecture

checking system architecture, 2.1

ASM

and multiple databases, 5.1.7.1.3

changing owner and permissions of disks

on HP-UX, 6.4.1.4, 6.4.1.4

character device names

on HP-UX, 6.4.1.4

characteristics of failure groups, 6.4.1.1, 6.4.2.1

checking disk availability on HP-UX, 6.4.1.4

creating the OSDBA for ASM group, 5.1.9.5

disk groups, 6.4.1.1

failure groups, 6.4.1.1

examples, 6.4.1.1, 6.4.2.1

identifying, 6.4.1.1, 6.4.2.1

identifying available disks on HP-UX, 6.4.1.4

identifying disks on HP-UX, 6.4.1.4

OSASM or ASM administrator, 5.1.7.1.3

OSDBA for ASM group, 5.1.7.1.3

recommendations for disk groups, 6.4.1.1

space required for Oracle Clusterware files, 6.4.1.1

space required for preconfigured database, 6.4.1.1

ASM group

creating, 5.1.9.3

ASM. See Oracle ASM

ASMCA

Used to create disk groups for earlier Oracle Database releases on Oracle ASM, 8.3.3

ASMSNMP, 1.1.3

B

Bash shell

default user startup file, 5.2.2

.bash_profile file, 5.2.2

bdf, 2.1, 2.1

binaries

relinking, 8.4

block devices

creating permissions file for Oracle Clusterware files, 6.4.1.4

unsupported for direct storage, 6.1.1

BMC

configuring, 5.3.3

BMC interface

preinstallation tasks, 5.3

bonded addresses

must use same IP protocol, 4.4

Bourne shell

default user startup file, 5.2.2

C

C shell

default user startup file, 5.2.2

central inventory, 5.1.7.1.1, 5.1.8.1

about, D.1.3

local on each cluster member node, 5.1.1

central inventory. See Also OINSTALL group, and Oracle Inventory group

changing host names, D.2.1

character device

device name on HP-UX, 6.4.1.4

checkdir error, 8.4

checking version, 3.8

chmod command, 6.3.8, 6.3.9, 6.4.1.4

chown command, 6.3.8, 6.3.9, 6.4.1.4

clients

connecting to SCANs, D.2.5

cloning

cloning a Grid home to other nodes, 7.2

cluster configuration file, 7.1.2

cluster file system

storage option for data files, 6.1.2

cluster interconnect

Hyper Messaging protocol, 3.6

cluster name, 1.1.3

requirements for, 1.1.3

cluster nodes

private network node interfaces, 1.1.3

private node names, D.2.5

public network node names and addresses, 1.1.3

public node names, 7.1.1

specifying uids and gids, 5.1.9.7

virtual node names, 1.1.3, D.2.3

Cluster Time Synchronization Service, 3.9

Cluster Verification Utility

Fixup scripts, 3.3

user equivalency troubleshooting, A.4

clusterware

requirements for third party clusterware, 1.1.3

commands

asmca, 7.1.1, 7.1.1, 8.2.3.2, B.9.5.1

asmcmd, 5.1.3.1

chmod, 6.3.8, 6.3.8, 6.3.9

chown, 6.3.8, 6.3.8, 6.3.9

crsctl, 7.3, 8.3.4, B.5, B.9.6

df, 2.3

fdisk, 6.4.1.4

groupadd, 5.1.9.7

id, 5.1.9.7

mkdir, 6.3.8, 6.3.8, 6.3.9

nscd, 3.13

passwd, 5.1.9.7

ping, 4.2

rootcrs.sh, 8.4

and deconfig option, 9.5

rootupgrade.sh, B.5

sqlplus, 5.1.3.1

srvctl, B.5

umask, 5.2.1

uname, 2.1

unset, B.6.1

useradd, 5.1.3.3, 5.1.9.6.3, 5.1.9.7

usermod, 5.1.9.6.4

xhost, 3.4

xterm, 3.4

configuring kernel parameters, E.2

creating required X library symbolic links, 3.11

cron jobs, 1.1.6, A.6

crs_install.rsp file, C.2.1

CSD

download location for WebSphere MQ, 3.8

ctsdd, 3.9

custom database

failure groups for ASM, 6.4.1.1, 6.4.2.1

requirements when using ASM, 6.4.1.1

Custom installation type

reasons for choosing, 5.1.7.1.2, 5.1.8.2

D

data files

creating separate directories for, 6.3.8, 6.3.9

setting permissions on data file directories, 6.3.8, 6.3.9

storage options, 6.1.2

data loss

minimizing with ASM, 6.4.1.1, 6.4.2.1

database files

supported storage options, 6.1.1

databases

ASM requirements, 6.4.1.1

dba group

and ASM disks on HP-UX, 6.4.1.4

DBCA

no longer used for Oracle ASM disk group administration, 8.3.3

Used to create server pools for earlier Oracle Database releases, 8.3.2

dbca.rsp file, C.2.1

default file mode creation mask

setting, 5.2.1

deinstall, 9.1

deinstallation, 9.1

Deinstallation tool

about, 9.6.1

example, 9.6.2

previous Grid home, 9.6.1.1

Restriction for Oracle Flex Clusters and -lastnode flag, 9.5

roothas.sh, 9.6.1

deinstalling previous Grid home, 9.6.1.1

device names

on HP-UX, 6.4.1.4

df command, 2.3

DHCP

and GNS, 4.5.1

Direct NFS

disabling, 6.3.10, 6.3.10

enabling, 6.3.5

for data files, 6.2.4

Direct NFS Client

minimum write size value for, 6.2.4.2

directory

creating separate data file directories, 6.3.8, 6.3.9

permission for data file directories, 6.3.8, 6.3.9

disk

changing permissions and owner for ASM

on HP-UX, 6.4.1.4

disk group

ASM, 6.4.1.1

recommendations for Oracle ASM disk groups, 6.4.1.1

disk groups

recommendations for, 6.4.1.1

disk space

checking, 2.1

requirements for preconfigured database in ASM, 6.4.1.1

disks

changing permissions and owner for ASM

on HP-UX, 6.4.1.4

checking availability for ASM on HP-UX, 6.4.1.4

identifying LVM disks on HP-UX, 6.4.1.4

disks. See Also ASM disks

DISPLAY environment variable, E.2.2.2

setting, 5.2.2

DNS, A.9

E

emulator

installing from X emulator, 3.4

enterprise.rsp file, C.2.1

environment

configuring for oracle user, 5.2

environment variables

DISPLAY, 5.2.2, E.2.2.2

ORACLE_HOME, 5.1.3.1, 5.2.2, B.6.1

ORACLE_SID, B.6.1

removing from shell startup file, 5.2.2

SHELL, 5.2.2

TEMP and TMPDIR, 2.1, 2.3, 5.2.2

TNS_ADMIN, 5.2.2

errors

X11 forwarding, 5.2.3, E.1.3

errors using Opatch, 8.4

Exadata

relinking binaries example for, 8.4

examples

ASM failure groups, 6.4.1.1, 6.4.2.1

executable_stack parameter

minimal value, E.2.1

F

failure group

ASM, 6.4.1.1

characteristics of ASM failure group, 6.4.1.1, 6.4.2.1

examples of ASM failure groups, 6.4.1.1, 6.4.2.1

fencing

and IPMI, 1.1.1, 5.3

file mode creation mask

setting, 5.2.1

file system

storage option for data files, 6.1.2

file systems, 6.1.5

files

$ORACLE_HOME/lib/libnfsodm11.so, 6.3.5

$ORACLE_HOME/lib/libodm11.so, 6.3.5

.bash_profile, 5.2.2

dbca.rsp, C.2.1

editing shell startup file, 5.2.2

enterprise.rsp, C.2.1

.login, 5.2.2

oraInst.loc, 5.1.1

.profile, 5.2.2

response files, C.2

filesets, 3.5

fixup script

troubleshooting, 3.3

Fixup script, 3.3

G

GFS, 6.1.5

gid

identifying existing, 5.1.9.7

specifying, 5.1.9.7

specifying on other nodes, 5.1.9.7

GID changes for existing install owners unsupported, 5.1.3.3

globalization

support for, 1.1.6

GNS

about, 4.5.3

configuring, 4.5.1

GNS client clusters

and GNS client data file, 4.5.4.4

GNS client data file required for installation, 4.5.4.1

name resolution for, 4.5.4.1

GNS client data file

how to create, 4.5.4.4

GNS virtual IP address, 1.1.3

GPFS, 6.1.5

Grid home

and Oracle base restriction, 5.1.5

disk space for, 1.1.1, 2.3

minimum required space for, 2.3

unlocking, 8.4

grid user, 5.1.7.1.1

Grid user, 5.1.8.1

group IDs

identifying existing, 5.1.9.7

specifying, 5.1.9.7

specifying on other nodes, 5.1.9.7

groups

checking for existing oinstall group, 5.1.1, 5.1.1

creating identical groups on other nodes, 5.1.9.7, 5.1.9.7

creating the ASM group, 5.1.9.3, 5.1.9.3

creating the OSDBA for ASM group, 5.1.9.5

creating the OSDBA group, 5.1.9.1

OINSTALL, 5.1.1, 5.1.2

OSASM (asmadmin), 5.1.7.1.3, 5.1.8.4

OSBACKUPDBA (backupdba), 5.1.8.3

OSDBA (dba), 5.1.7.1.2, 5.1.8.2

OSDBA for ASM (asmdba), 5.1.7.1.3, 5.1.8.4

OSDBA group (dba), 5.1.7.1.2, 5.1.8.2

OSDGDBA (dgdba), 5.1.8.3

OSKMDBA (kmdba), 5.1.8.3

OSOPER for ASM, 5.1.7.1.3

OSOPER for ASM (asmoper), 5.1.8.4

OSOPER group (oper), 5.1.7.1.2

OSOPER (oper), 5.1.7.1.2, 5.1.8.2

required for installation owner user, 5.1.7.1.1

required for Oracle Software Owner users, 5.1.8.1

specifying when creating users, 5.1.9.7, 5.1.9.7

using NIS, 5.1.7, 5.1.9.7

H

high availability IP addresses, 4.3

host names

changing, D.2.1

legal host names, 1.1.3

HP-UX

character device names, 6.4.1.4

checking disk availability for ASM, 6.4.1.4

identifying disks for ASM, 6.4.1.4

identifying LVM disks, 6.4.1.4

tuning parameters for, E.2.2

Hub Nodes, 4.6, D.4, D.4

names and addresses for, 1.1.3

Hyper Messaging Protocol

using as a cluster interconnect, 3.6

HyperFabric software

requirement, 3.6

I

id command, 5.1.9.7

inaccessible nodes

upgrading, B.9.3

INS-32026 error, 5.1.5

installation

and cron jobs, 1.1.6

and globalization, 1.1.6

cloning a Grid infrastructure installation to other nodes, 7.2

response files, C.2

preparing, C.2, C.2.2

templates, C.2

silent mode, C.3

using cluster configuration file, 7.1.2

installation types

and ASM, 6.4.1.1

interconnect, 1.1.3

interfaces, 1.1.3

requirements for private interconnect, D.2.2

intermittent hangs

and socket files, 7.3

ioscan command, 6.4.1.4

IOServers

about, D.4

IP protocol

and redundant interfaces, 4.4

IPMI

preinstallation tasks, 5.3

preparing for installation, 1.1.1

required postinstallation configuration, 8.2.1

IPv4 requirements, 4.4

IPv6 requirements, 4.4

IPv6 support

about, Preface

Itanium

operating system requirements, 3.6

J

JDK requirements, 3.5

job role separation users, 5.1.7.1.1, 5.1.8.1

K

kctune, E.2.2

kcweb, E.2.2

kernel parameters

configuring, E.2

setting, E.2.2.2

Korn shell

default user startup file, 5.2.2

ksi_alloc_max parameter

minimal value, E.2.1

L

Leaf Nodes, 4.6, D.4

legal host names, 1.1.3

libnfsodm11.so, 6.3.5

libodm11.so, 6.3.5

log file

how to access during installation, 7.1.1

.login file, 5.2.2

LVM

identifying volume group devices on HP-UX, 6.4.1.4

recommendations for ASM, 6.4.1.1

M

mask

setting default file mode creation mask, 5.2.1

max_thread_proc

minimal value, E.2.1

max_thread_proc parameter

minimal value, E.2.1

maxdsiz parameter

minimal value, E.2.1

maxdsiz_64bit parameter

minimal value, E.2.1

maxfiles parameter

minimal value, E.2.1

maxfiles_lim

minimal value, E.2.1

maxssiz parameter

minimal value, E.2.1

maxssiz_64bit parameter

minimal value, E.2.1

maxuprc parameter

minimal value, E.2.1

minor number for device files, 3.12

mixed binaries, 3.5

mkdir command, 6.3.8, 6.3.9

mode

setting default file mode creation mask, 5.2.1

msgmap

not valid, E.2

msgmni parameter

minimal value, E.2.1

msgseg

not valid, E.2

msgtql parameter

minimal value, E.2.1

multiple databases

and ASM, 5.1.7.1.3

multiple oracle homes, 6.3.9

multiple Oracle homes, 5.1.3.1

My Oracle Support, 8.1

N

ncsize parameter

minimal value, E.2.1

Net Configuration Assistant (NetCA)

response files, C.4

running at command prompt, C.4

netca, 7.1.1

netca.rsp file, C.2.1

networks

for Oracle Flex Clusters, 4.6, D.4

IP protocol requirements for, 4.4

Oracle Flex ASM, 1.1.3, 4.6, D.4

nflocks parameter

minimal value, E.2.1

NFS, 6.1.5, 6.3.2

and data files, 6.2.5

and Oracle Clusterware files, 6.2.1

buffer size parameters for, 6.3.1, 6.3.3

Direct NFS, 6.2.4

for data files, 6.2.5

rsize, 6.3.2

ninode parameter

minimal value, E.2.1

NIS

alternative to local users and groups, 5.1.7

nkthread parameter

minimal value, E.2.1

nproc parameter

minimal value, E.2.1

nslookup command, A.9

O

oinstall group

checking for existing, 5.1.1

OINSTALL group

about, D.1.3

and oraInst.loc, 5.1.1

creating on other nodes, 5.1.9.7

system privileges granted by, 5.1.3.1

OINSTALL group. See Also Oracle Inventory group

Opatch, 8.4

operating system

checking version, 3.8

different on cluster members, 3.5

operating system authentication for system privileges, 5.1.8.2

operating system privileges groups, 5.1.8.2

operating system requirements, 3.5

Itanium, 3.6

optimal flexible architecture

and oraInventory directory, D.1.4

Oracle ASM

and rolling upgrade, B.9.5

installation as part of Oracle Grid Infrastructure installation, Preface

OSASM for ASM administrator, 5.1.8.4

OSDBA for ASM group, 5.1.8.4

OSOPER for ASM group, 5.1.8.4

storage option for data files, 6.1.2

storing Oracle Clusterware files on, 6.1.1

Oracle ASM clients, 4.6

Oracle base directory

Grid home must not be in an Oracle Database Oracle base, 5.1.5

Grid homes not permitted under, D.1.1

minimum disk space for, 1.1.1, 2.3

requirements for Oracle Grid Infrastructure, D.1.6

Oracle Cluster Registry

configuration of, 1.1.5

mirroring, 6.2.1

partition sizes, 6.2.1

permissions file to own block device partitions, 6.4.1.4

supported storage options, 6.1.1

Oracle Clusterware

and file systems, 6.1.5

installation as part of Oracle Grid Infrastructure installation, Preface

installing, 7

supported storage options for, 6.1.1

upgrading, 6.2.1

Oracle Clusterware files

ASM disk space requirements, 6.4.1.1

Oracle Clusterware Installation Guide

replaced by Oracle Grid Infrastructure Installation Guide, 7

Oracle Database

creating data file directories, 6.3.8, 6.3.9

data file storage options, 6.1.2

privileged groups, 5.1.7.1.2, 5.1.8.2

requirements with ASM, 6.4.1.1

Oracle Database Configuration Assistant

response file, C.2.1

Oracle Disk Manager

and Direct NFS, 6.3.5

Oracle Flex ASM

about, D.4

and Oracle ASM clients, 1.1.3, 4.6, D.4

networks, 1.1.3, 4.6, D.4

Oracle Flex Clusters

about, Preface

and Hub Nodes, 8.3.2, D.4

and IOServers, D.4

and Leaf Nodes, 8.3.2

and Oracle Flex ASM, 4.6, D.4

Hub Node configuration, 1.1.3

Oracle Grid Infrastructure owner (grid), 5.1.7.1.1, 5.1.8.1

Oracle Grid Infrastructure response file, C.2.1

oracle home

multiple oracle homes, 6.3.9

Oracle home

and asmcmd errors, 5.1.3.1

ASCII path restriction for, 1.1.2

multiple Oracle homes, 5.1.3.1

Oracle Inventory

pointer file, 5.1.1

Oracle Inventory group

about, D.1.3

checking for existing, 5.1.1

creating, 5.1.2

creating on other nodes, 5.1.9.7

Oracle Net Configuration Assistant

response file, C.2.1

Oracle patch updates, 8.1

Oracle software owner user

creating, 5.1.3

description, 5.1.7.1.1

Oracle Software Owner user

and ASM disks, 6.4.1.4, 6.4.1.4

configuring environment for, 5.2

creating, 5.1.3.2, 5.1.9.6.1, 5.1.9.6.2

creating on other nodes, 5.1.9.7

determining default shell, 5.2.2

required group membership, 5.1.7.1.1

Oracle Software Owner users

description, 5.1.8.1

required group membership, 5.1.8.1

Oracle Universal Installer

response files

list of, C.2.1

Oracle Upgrade Companion, 3.1.1

oracle user

and ASM disks, 6.4.1.4, 6.4.1.4

configuring environment for, 5.2

creating, 5.1.3, 5.1.3.2, 5.1.3.3, 5.1.9.6.1, 5.1.9.6.2, 5.1.9.6.3

creating on other nodes, 5.1.9.7

description, 5.1.7.1.1

determining default shell, 5.2.2

required group membership, 5.1.7.1.1

Oracle user

description, 5.1.8.1

required group membership, 5.1.8.1

ORACLE_BASE environment variable

removing from shell startup file, 5.2.2

ORACLE_HOME environment variable

removing from shell startup file, 5.2.2

unsetting, 5.2.2

ORACLE_SID environment variable

removing from shell startup file, 5.2.2

oraInst.loc

and central inventory, 5.1.1

contents of, 5.1.1

oraInst.loc file

location, 5.1.1

location of, 5.1.1

oraInventory, 5.1.7.1.1, 5.1.8.1

about, D.1.3

creating, 5.1.2

OSASM group, 5.1.7.1.3, 5.1.8.4

about, 5.1.7.1.3, 5.1.8.4

and multiple databases, 5.1.7.1.3

and SYSASM, 5.1.7.1.3

creating, 5.1.9.3

OSBACKUPDBA group (backupdba), 5.1.8.3

OSDBA for ASM group, 5.1.7.1.3, 5.1.8.4

about, 5.1.7.1.3, 5.1.8.4

OSDBA group

and ASM disks on HP-UX, 6.4.1.4

and SYSDBA privilege, 5.1.7.1.2

and SYSDBA system privileges, 5.1.8.2

creating, 5.1.9.1

creating on other nodes, 5.1.9.7, 5.1.9.7

description, 5.1.7.1.2, 5.1.8.2

OSDBA group for ASM

creating, 5.1.9.5

OSDGDBA group (dgdba), 5.1.8.3

OSKMDBA group (kmdba), 5.1.8.3

OSOPER for ASM group, 5.1.8.4

about, 5.1.7.1.3, 5.1.8.4

creating, 5.1.9.4

OSOPER group

and SYSOPER privilege, 5.1.7.1.2

and SYSOPER system privileges, 5.1.8.2

creating, 5.1.9.2

creating on other nodes, 5.1.9.7, 5.1.9.7

description, 5.1.7.1.2, 5.1.8.2

OUI, 3.3

P

parameters

tuning manually, E.2.2

partition

using with ASM, 6.4.1.1

passwd command, 5.1.9.7

patch download location, 3.8

patch updates

download, 8.1

install, 8.1

My Oracle Support, 8.1

patches

download location, 3.8

permissions

for data file directories, 6.3.8, 6.3.9

ping command, A.9

policy-managed databases

and SCANs, D.2.5

postinstallation

patch download and install, 8.1

preconfigured database

ASM disk space requirements, 6.4.1.1

requirements when using ASM, 6.4.1.1

primary host name, 1.1.3

privileged groups

for Oracle Database, 5.1.7.1.2, 5.1.8.2

processor

checking system architecture, 2.1

.profile file, 5.2.2

public node name

and primary host name, 1.1.3

pvdisplay command, 6.4.1.4

R

RAC

configuring disks for ASM on HP-UX, 6.4.1.4

RAID

and mirroring Oracle Cluster Registry and voting disk, 6.2.1

recommended ASM redundancy level, 6.4.1.1

raw devices

unsupported, 6.1.1

upgrading existing partitions, 6.2.1

recommendations

client access to the cluster, 8.2.4

recovery files

supported storage options, 6.1.1

redundancy level

and space requirements for preconfigured database, 6.4.1.1

Redundant Interconnect Usage, 4.3

redundant interfaces

must use same IP protocol, 4.4

relinking Oracle Grid Infrastructure home binaries, 8.4, 9.3, 9.4

requirements, 6.4.1.1

resolv.conf file, A.9

response file installation

preparing, C.2

response files

templates, C.2

silent mode, C.3

response file mode

about, C.1

reasons for using, C.1.1

See also response files, silent mode,

response files

about, C.1

creating with template, C.2.1

crs_install.rsp, C.2.1

dbca.rsp, C.2.1

enterprise.rsp, C.2.1

general procedure, C.1.2

Net Configuration Assistant, C.4

netca.rsp, C.2.1

passing values at command line, C.1

specifying with Oracle Universal Installer, C.3

response files.See also silent mode

about, C.1

reasons for using, C.1.1

See also response files.,

rolling upgrade

of Oracle ASM, B.9.5

root user

logging in as, 3.4

rootcrs.pl

restriction for Oracle Flex Cluster deinstallation, 9.5

roothas.sh, 9.6.1

root.sh, 7.1.1

rsize parameter, 6.3.2

run level, 2.2

S

SAM, E.2.2

starting, E.2.2.2

sam command, E.2.2.2

SCAN address, 1.1.3, A.9

SCAN listener, A.9, D.2.5

SCANs, 1.1.3, 4.5.5

client access, 8.2.4

configuring, 1.1.3

description, 8.2.4

understanding, D.2.5

use of SCANs required for clients of policy-managed databases, D.2.5

secure shell

configured by the installer, 3.10

security

dividing ownership of Oracle software, 5.1.7

semmni parameter

minimal value, E.2.1

semmns parameter

minimal value, E.2.1

semmnu parameter

minimal value, E.2.1

semvmx parameter

minimal value, E.2.1

Serviceguard

requirement, 3.6

setting kernel parameters, E.2.2.2

shell

determining default shell for oracle user, 5.2.2

SHELL environment variable

checking value of, 5.2.2

shell startup file

editing, 5.2.2

removing environment variables, 5.2.2

shmmax parameter

minimal value, E.2.1

shmmni parameter

minimal value, E.2.1

shmseg parameter

minimal value, E.2.1

silent mode installation, C.3

software requirements, 3.5

checking software requirements, 3.8

ssh

and X11 Forwarding, 5.2.3

automatic configuration from OUI, 3.10

configuring, E.1

when used, 3.10

Standard cluster

upgrades result in, B.5

startup file

for shell, 5.2.2

stty

suppressing to prevent installation errors, 5.2.4

supported storage options

Oracle Clusterware, 6.1.1

suppressed mode

reasons for using, C.1.1

symbolic links

X library links required, 3.11

SYSASM, 5.1.7.1.3

and OSASM, 5.1.7.1.3

SYSASM system privileges, 5.1.8.4

SYSBACKUPDBA system privileges, 5.1.8.3

SYSDBA

using database SYSDBA on ASM deprecated, 5.1.7.1.3

SYSDBA for ASM system privileges, 5.1.8.4

SYSDBA privilege

associated group, 5.1.7.1.2

SYSDBA system privileges

associated group, 5.1.8.2

SYSDGDBA system privileges, 5.1.8.3

SYSKMDBA system privileges, 5.1.8.3

SYSOPER for ASM system privileges, 5.1.8.4

SYSOPER privilege

associated group, 5.1.7.1.2

SYSOPER system privileges

associated group, 5.1.8.2

System Administration Manager

See SAM

System Administration Manager (SAM), E.2.2.2, E.2.2.2

system architecture

checking, 2.1

system privileges

SYSASM, 5.1.8.4

SYSBACKUPDBA, 5.1.8.3

SYSDBA, 5.1.8.2

SYSDBA for ASM, 5.1.8.4, 5.1.8.4

SYSDGDBA, 5.1.8.3

SYSKMDBA, 5.1.8.3

SYSOPER, 5.1.8.2

SYSOPER for ASM, 5.1.8.4

T

TEMP environment variable, 2.1, 2.3

setting, 5.2.2

terminal output commands

suppressing for Oracle installation owner accounts, 5.2.4

third party multicast DNS

restrictions, 4.5.3

TMPDIR environment variable, 2.1, 2.3

setting, 5.2.2

TNS_ADMIN environment variable

unsetting, 5.2.2

troubleshooting

and deinstalling, 9.1

asmcmd errors and Oracle home, 5.1.3.1

automatic SSH configuration from OUI, 3.10, 5.1.3.1

disk space errors, 1.1.2

DISPLAY errors, 5.2.3

environment path errors, 1.1.2

garbage strings in script inputs found in log files, 5.2.4

GID, 5.1.3.3

intermittent hangs, 7.3

log file, 7.1.1

nfs mounts, 3.13

permissions errors and oraInventory, D.1.3

public network failures, 3.13

root.sh errors, 9.5

run level error, 2.2

SQLPlus errors and Oracle home, 5.1.3.1

ssh, E.1.1

ssh configuration failure, E.1.2.1

ssh errors, 5.2.4

SSH timeouts, A.2

stty errors, 5.2.4

UID, 5.1.3.3

unconfiguring Oracle Clusterware to fix causes of root.sh errors, 9.5

unexplained installation errors, 1.1.6, A.6

user equivalency, A.4, E.1.1

user equivalency error due to different user or group IDs, 5.1.9.6.2

user equivalency errors, 5.1.2, D.1.4

X11 forwarding error, 5.2.3

Troubleshooting

DBCA does not recognize Oracle ASM disk size and fails to create disk groups, 8.3.3

U

uid

identifying existing, 5.1.9.7

specifying, 5.1.9.7

specifying on other nodes, 5.1.9.7

UID changes for existing install owners unsupported, 5.1.3.3

umask command, 5.2.1

uname command, 3.8

unconfiguring Oracle Clusterware, 9.5

uninstall, 9.1

uninstalling, 9.1

UNIX commands

chmod, 6.4.1.4

chown, 6.4.1.4

ioscan, 6.4.1.4

pvdisplay, 6.4.1.4

sam, E.2.2.2

uname, 3.8

unset, 5.2.2

unsetenv, 5.2.2

unreachable nodes

upgrading, B.9.3

unset command, 5.2.2

unsetenv command, 5.2.2

upgrades

and Leaf Nodes, B.5

and OCR partition sizes, 6.2.1

and Oracle ASM rolling upgrades, B.9.5

and SCANs, D.2.5

and voting disk partition sizes, 6.2.1

best practices, 3.1.1

of Oracle ASM, B.9.5.1

restrictions for, B.5

shared Oracle Clusterware home to local Grid homes, D.1.1

unsetting environment variables for, B.6.1

upgrading

inaccessible nodes, B.9.3

user equivalence

testing, A.4

user equivalency errors

groups and users, 5.1.9.6.2

user IDs

identifying existing, 5.1.9.7

specifying, 5.1.9.7

specifying on other nodes, 5.1.9.7

useradd command, 5.1.3.3, 5.1.9.6.3, 5.1.9.7

users

creating identical users on other nodes, 5.1.9.7, 5.1.9.7

creating the grid user, 5.1.3, 5.1.3

creating the oracle user, 5.1.3.2, 5.1.3.2, 5.1.9.6.1, 5.1.9.6.1, 5.1.9.6.2, 5.1.9.6.2

oracle software owner user (oracle), 5.1.7.1.1

Oracle Software Owner users, 5.1.8.1

specifying groups when creating, 5.1.9.7, 5.1.9.7

using NIS, 5.1.7, 5.1.9.7

V

vendor clusterware

and cluster names for Oracle Grid Infrastructure, 1.1.3

VIP

for SCAN, A.9

voting disks

configuration of, 1.1.5

mirroring, 6.2.1

partition sizes, 6.2.1

supported storage options, 6.1.1

W

WebSphere MQ

CSD download location, 3.8

workstation

installing from, 3.4

wsize parameter, 6.3.2

wtmax, 6.2.4.2

minimum value for Direct NFS Client, 6.2.4.2

X

X emulator

installing from, 3.4

X library symbolic links

required, 3.11

X terminal

installing from, 3.4

X Window System

enabling remote hosts, 3.4, 3.4

X11 forwarding

error, 5.2.3

X11 forwarding errors, E.1.3

xhost command, 3.4

xterm command, 3.4

xtitle

suppressing to prevent installation errors, 5.2.4

Oracle Legal Notices

Copyright Notice

Copyright © 1994-2015, Oracle and/or its affiliates. All rights reserved.

Trademark Notice

Oracle and Java are registered trademarks of Oracle and/or its affiliates. Other names may be trademarks of their respective owners.

Intel and Intel Xeon are trademarks or registered trademarks of Intel Corporation. All SPARC trademarks are used under license and are trademarks or registered trademarks of SPARC International, Inc. AMD, Opteron, the AMD logo, and the AMD Opteron logo are trademarks or registered trademarks of Advanced Micro Devices. UNIX is a registered trademark of The Open Group.

License Restrictions Warranty/Consequential Damages Disclaimer

This software and related documentation are provided under a license agreement containing restrictions on use and disclosure and are protected by intellectual property laws. Except as expressly permitted in your license agreement or allowed by law, you may not use, copy, reproduce, translate, broadcast, modify, license, transmit, distribute, exhibit, perform, publish, or display any part, in any form, or by any means. Reverse engineering, disassembly, or decompilation of this software, unless required by law for interoperability, is prohibited.

Warranty Disclaimer

The information contained herein is subject to change without notice and is not warranted to be error-free. If you find any errors, please report them to us in writing.

Restricted Rights Notice

If this is software or related documentation that is delivered to the U.S. Government or anyone licensing it on behalf of the U.S. Government, the following notice is applicable:

U.S. GOVERNMENT END USERS: Oracle programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, delivered to U.S. Government end users are "commercial computer software" pursuant to the applicable Federal Acquisition Regulation and agency-specific supplemental regulations. As such, use, duplication, disclosure, modification, and adaptation of the programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, shall be subject to license terms and license restrictions applicable to the programs. No other rights are granted to the U.S. Government.

Hazardous Applications Notice

This software or hardware is developed for general use in a variety of information management applications. It is not developed or intended for use in any inherently dangerous applications, including applications that may create a risk of personal injury. If you use this software or hardware in dangerous applications, then you shall be responsible to take all appropriate fail-safe, backup, redundancy, and other measures to ensure its safe use. Oracle Corporation and its affiliates disclaim any liability for any damages caused by use of this software or hardware in dangerous applications.

Third-Party Content, Products, and Services Disclaimer

This software or hardware and documentation may provide access to or information on content, products, and services from third parties. Oracle Corporation and its affiliates are not responsible for and expressly disclaim all warranties of any kind with respect to third-party content, products, and services. Oracle Corporation and its affiliates will not be responsible for any loss, costs, or damages incurred due to your access to or use of third-party content, products, or services.

Alpha and Beta Draft Documentation Notice

If this document is in preproduction status:

This documentation is in preproduction status and is intended for demonstration and preliminary use only. It may not be specific to the hardware on which you are using the software. Oracle Corporation and its affiliates are not responsible for and expressly disclaim all warranties of any kind with respect to this documentation and will not be responsible for any loss, costs, or damages incurred due to the use of this documentation.