Oracle® Database

Quick Installation Guide

12c Release 1 (12.1) for Microsoft Windows x64 (64-Bit)

E56576-02

August 2015

This guide describes how to quickly install the Oracle Database product on Windows x64 systems. It includes information about the following:

- Review Information About this Guide

- Log On to the System with Administrator Privileges

- Check the Hardware Requirements

- Check the Software Requirements

- Default Share Configuration Requirement

- Installation Requirements for Web Browsers

- Remote Desktop Services

- Creating Oracle Home User

- Operating System Groups Created During Oracle Database Installation

- Creating Required Directories

- Install the Oracle Database Software

- Installing Oracle Database Examples

- What to Do Next?

- Additional Information

- Documentation Accessibility

1 Review Information About this Guide

This guide describes how to install Oracle Database using the default installation options into a new Oracle home.

Tasks Described in this Guide

The procedures in this guide describe how to:

- Configure your system to support Oracle Database.

- Install the Oracle Database software on a local file system.

- Configure a general-purpose Oracle database that uses the local file system for database file storage.

Results of a Successful Installation

After you successfully install Oracle Database:

- The database that you created and the default Oracle Net listener process run on the system.

- Oracle Enterprise Manager Database Express is running and can be accessed using a Web browser.

Tasks Not Described in this Guide

This guide covers the Typical Installation scenario and does not describe how to complete the following tasks:

- Using the Advanced Installation option to install the software

- Installing the software on a system that has an existing Oracle software installation.

- Installing Oracle Clusterware and Oracle Real Application Clusters.

- Setting TCP kernel parameter manually

- Cloning an Oracle home.

- Enabling Enterprise Manager e-mail notifications or automated backups.

- Using alternative storage options such as Automatic Storage Management.

- Installing and configuring Oracle Grid Infrastructure.

Where to Get Additional Installation Information

For more detailed information about installing Oracle Database components, including information about the tasks not described in this guide, see one of the following guides:

- If you are installing the software on a single system, see Oracle Database Installation Guide for Microsoft Windows.

- If you want to install Oracle Grid Infrastructure for a standalone server, then see the "Oracle Grid Infrastructure for a Standalone Server" chapter in Oracle Database Installation Guide for Microsoft Windows.

- If you are installing Oracle Real Application Clusters, see Oracle Grid Infrastructure Installation Guide and Oracle Real Application Clusters Installation Guide. These guides describe how to install Oracle Grid Infrastructure and Oracle Real Application Clusters. Oracle Grid Infrastructure is a prerequisite for Oracle Real Application Clusters installations.

The product documentation for Oracle Database products is available in both HTML and PDF formats online on the Oracle Technology Network (OTN) website:

http://www.oracle.com/technetwork/indexes/documentation/index.html

2 Log On to the System with Administrator Privileges

Log on as a member of the Administrators group to the computer on which you want to install Oracle components. If you are installing on a Primary Domain Controller (PDC) or a Backup Domain Controller (BDC), log on as a member of the Domain Administrators group.

3 Check the Hardware Requirements

Table 1 Hardware Requirements

Requirement

Minimum Value

Physical memory (RAM)

2 GB minimum

Virtual memory (swap)

- If physical memory is between 2 GB and 16 GB, then set virtual memory to 1 times the size of the RAM

- If physical memory is more than 16 GB, then set virtual memory to 16 GB

Disk space

Typical Install Type total: 10 GB

See Table 2 for details.

System Architecture

AMD64, or Intel Extended memory (EM64T)

Video adapter

256 colors

Screen Resolution

1024 X 768 minimum

3.1 Hard Disk Space Requirements

Table 2 lists the space requirements on NTFS. Oracle strongly recommends that you install the Oracle database home (Oracle database binaries, trace files, and so on) on Oracle ACFS or NTFS; the database files themselves must be placed on Oracle ASM if using Oracle ACFS; otherwise they can be placed on NTFS. Usage of Oracle ACFS and Oracle ASM or NTFS instead of FAT32 is recommended to ensure security of these files. The starter database requires 720 MB of disk space. The figures in this table include the starter database. FAT32 space requirements are slightly higher.

Table 2 Windows x64 Disk Space Requirements on NTFS

Installation Type

TEMP Space

C:\Program Files\Oracle\Inventory

Oracle Home

Datafiles *

Total

Typical Installation

500 MB

700 KB

4.8 GB

5.1 GB

10.4 GB

* Refers to the contents of the admin, cfgtoollogs, flash_recovery_area, and oradata directories in the ORACLE_BASE directory.

** This size can be higher depending on the installation options selected, such as languages or additional components. If you choose to install Oracle Database with automated backups enabled, include at least 2 GB extra for data file disk space.

See Also:
"Overview of NTFS File System and Windows Registry Permissions" in Oracle Database Platform Guide for Microsoft Windows

To ensure that the system meets these requirements, follow these steps:

1. Determine the physical RAM size. For example, on a Windows Server 2008 R2 computer, click System and Security in the Windows Control Panel, then click System.
If the size of the physical RAM installed in the system is less than the required size, then you must install more memory before continuing.

2. Determine the size of the configured virtual memory (also known as paging file size). For example, on a Windows Server 2008 R2 computer, click System and Security, then click System, click Advanced System Settings, click the Advanced tab on System Properties page, and then click Settings in the Performance section. Then select the Advanced tab on Performance Options page.
The virtual memory is listed in the Virtual Memory section.

If necessary, see your operating system documentation for information about how to configure additional virtual memory.

3. Determine the amount of free disk space on the system. For example, on a Windows Server 2008 R2 computer, right-click My Computer and click Open.

4. Determine the amount of disk space available in the temp directory. This is equivalent to the total amount of free disk space, minus what is needed for the Oracle software to be installed.
For example, to change the environment variables on a Windows Server 2008 R2 computer, click System and Security, then click System, click Advanced System Settings, click the Advanced tab on System Properties page, and then click Environment Variables.

4 Check the Software Requirements

Table 3 lists the software requirements for Oracle Database.

Table 3 Windows x64 Software Requirements

Requirement

Value

Operating System

Oracle Database for Windows x64 is supported on the following operating systems:

- Windows Server 2008 x64 and Windows Server 2008 R2 x64 - Standard, Enterprise, Datacenter, Web, and Foundation editions.

- Windows 7 x64 - Professional, Enterprise, and Ultimate editions

- Windows 8 x64 and Windows 8.1 x64 - Pro and Enterprise editions

- Windows Server 2012 x64 and Windows Server 2012 R2 x64 - Standard, Datacenter, Essentials, and Foundation editions

Note:

- Check My Oracle Support Note for more information about Hyper-V support.

- Windows Multilingual User Interface Pack is supported.

- The Server Core option is not supported.

Compiler

The following components are supported with the Microsoft Visual C++ 2010 SP1, Microsoft Visual C++ 2012, Microsoft Visual C++ 2013 Update 2, and Intel 12.1 C compilers:

- Oracle Call Interface

- External callouts

- Pro*C/C++ (not supported with Microsoft Visual C++ 2013 Update 2 at this time of release.)

- XDK

Oracle C++ Call Interface is supported with

- Microsoft Visual C++ 2010 SP1

- Microsoft Visual C++ 2012 - OCCI libraries are installed under ORACLE_HOME\oci\lib\msvc\vc11. When developing OCCI applications with MSVC++ 2012, ensure that the OCCI libraries are correctly selected from this directory for linking and executing.

- Intel 12.1 C compilers with Microsoft Visual Studio 2010 STLs

Network Protocol

The Oracle Net foundation layer uses Oracle protocol support to communicate with the following industry-standard network protocols:

- TCP/IP

- TCP/IP with SSL

- Named Pipes

Oracle Database Client

If you plan to connect to Oracle Database 12c Release 1 (12.1) from a release of Oracle Database Client that is 10g Release 2 (10.2) or higher, then the following conditions apply:

- Oracle Database Client is version 10.2 or higher.

- If the earlier Oracle Database Client is running on the same computer as Oracle Database 12c Release 1 (12.1), a bequeath connection cannot be used.

Oracle recommends upgrading Oracle Database Client to the latest patchset (10.2.0.5, or 11.2.0.4 or later). You can download the patchset from the Patches and Updates section of My Oracle Support at

https://support.oracle.com

5 Default Share Configuration Requirement

The prerequisite checks during Oracle Database installation require that the system drive on your computer has default share configured on it. Use the net use command to verify, for example:

C:\>net use\\hostname\c$
The command completed successfully.

Ensure that the current user, the user in the Administrator group, has all the privileges on the default share.

6 Installation Requirements for Web Browsers

Web browsers are required to use Oracle Enterprise Manager Database Express and Oracle Enterprise Manager Cloud Control. Web browsers must support Java Script, and the HTML 4.0 and CSS 1.0 standards. For a list of browsers that meet these requirements, see the Oracle Enterprise Manager certification matrix on My Oracle Support:

https://support.oracle.com

See Also:
Oracle Enterprise Manager Cloud Control Basic Installation Guide for information on accessing the Oracle Enterprise Manager certification matrix

7 Remote Desktop Services

Oracle supports installing, configuring, and running Oracle Database through Remote Desktop Services, formerly known as Terminal Services, on Windows. To install Oracle Database, Oracle recommends that you start all configuration tools from the Terminal Server console session of the server (using mstsc/console).

Platform-specific support information is as follows:

- Windows client operating systems: The Remote Desktop is only available in Single User Mode.

- Windows server operating systems: You can have multiple Remote Desktop sessions.

See Also:

- The Microsoft website for more information about Remote Desktop Services
http://www.microsoft.com/

- The My Oracle Support website for the latest Terminal Services and Remote Desktop Services information
https://support.oracle.com/

8 Creating Oracle Home User

During Oracle Database installation, you can specify an optional Oracle Home User associated with the Oracle home. For example, assume that you use an Administrator user named OraSys to install the software (Oracle Installation user), then you can specify the ORADOMAIN\OraDb domain user as the Oracle Home user for this installation. The specified Oracle Home domain user must exist before you install the Oracle Database software.

The Oracle Home User can be either the Windows built-in account (LocalSystem) or an existing user. If you specify an existing user as the Oracle Home user, then the Windows User Account you specify must be a domain user. This account is used for running the Windows services for the Oracle home. Do not log in using this account to perform administrative tasks. Windows User Account can be a Windows Local User, Windows Domain User or Managed Services Account (MSA). If you want to create a new user during installation, then it can only be a Windows Local User. It cannot be a Windows Domain User or an MSA. The new user that is created is denied interactive logon privileges to the Windows computer. However, a Windows administrator can manage this account like any other Windows account. Oracle recommends that you use the standard Windows User Account (instead of Windows Built-in Account) as the Oracle Home User for enhanced security.

Note:
You cannot change the Oracle Home User after the installation is complete. If you must change the Oracle Home User, then you must reinstall the Oracle Database software.

Silent installation is enhanced to support password prompt for Oracle Home User. So, customers and independent software vendors (ISV) can use response files without hard coding the password into the source code.

Oracle recommends using the standard Windows User Account (not an Administrator account) as Oracle Home User for typical installation, software-only installation, and cloning.

If an existing Windows User Account is used as Oracle Home User for software-only installation, then a password is not required. Thus, you can perform a silent, software-only installation using Windows User Account.

If using a Windows User Account as Oracle Home User for cloning individual Oracle Database installations, then a password is not required.

9 Operating System Groups Created During Oracle Database Installation

During installation, the user groups listed in Table 4 are created, if they do not already exist. In the following table, the HOMENAME variable refers to the generated HOMENAME for a software installation, which is of the form OraproductmajorVersionHomenumber. For example, OraDB12cHome1.

Table 4 User Groups Created During Oracle Database Installation

Operating System Group Name

Related System Privilege

Description

ORA_DBA

SYSDBA system privileges for all Oracle Database installations on the server

A special OSDBA group for the Windows operating system.

Members of this group are granted SYSDBA system privileges for all Oracle Databases installed on the server.

ORA_OPER

SYSOPER system privileges for all Oracle databases installed on the server

A special OSOPER group for the Windows operating system.

Members of this group are granted SYSOPER system privileges all Oracle Databases installed on the server. This group does not have any members after installation, but you can manually add users to this group after the installation completes.

ORA_ASMADMIN

SYSASM system privileges for Oracle ASM administration

The OSASM group for the Oracle ASM instance.

Using this group and the SYSASM system privileges enables the separation of SYSDBA database administration privileges from Oracle ASM storage administration privileges. Members of the OSASM group are authorized to connect using the SYSASM privilege and have full access to Oracle ASM, including administrative access to all disk groups that the Oracle ASM instance manages.

ORA_ASMDBA

SYSDBA system privileges on the Oracle ASM instance

The OSDBA group for the Oracle ASM instance.

This group grants access for the database to connect to Oracle ASM. During installation, the Oracle Installation Users are configured as members of this group. After you create an Oracle Database, this groups contains the contains Oracle Home Users of those database homes.

ORA_ASMOPER

SYSOPER for ASM system privileges

The OSOPER group for the Oracle ASM instance.

Members of this group are granted SYSOPER system privileges on the Oracle ASM instance, which permits a user to perform operations such as startup, shutdown, mount, dismount, and check disk group. This group has a subset of the privileges of the OSASM group. Similar to the ORA_HOMENAME_OPER group, this group does not have any members after installation, but you can manually add users to this group after the installation completes.

ORA_HOMENAME_DBA

SYSDBA system privileges for all instances that run from the Oracle home with the name HOMENAME

An OSDBA group for a specific Oracle home with a name of HOMENAME.

Members of this group can use operating system authentication to gain SYSDBA system privileges for any database that runs from the specific Oracle home. If you specified an Oracle Home User during installation, the user is added to this group during installation.

ORA_HOMENAME_OPER

SYSOPER system privileges for all instances that run from the Oracle home with a name HOMENAME

An OSDBA group for the Oracle home with a name of HOMENAME.

Members of this group can use operating system authentication to gain SYSOPER system privileges for any database that runs from the specific Oracle home. This group does not have any members after installation, but you can manually add users to this group after the installation completes.

ORA_HOMENAME_SYSBACKUP

SYSBACKUP system privileges for all instances that run from the Oracle home with a name of HOMENAME

OSBACKUPDBA group for a specific Oracle home with a name of HOMENAME.

Members of this group have privileges necessary for performing database backup and recovery tasks on all database instances that run from the specified Oracle home directory.

ORA_HOMENAME_SYSDG

SYSDG system privileges for all instances that run from the Oracle home with a name of HOMENAME

OSDGDBA group for a specific Oracle home with a name of HOMENAME.

Members of this group have privileges necessary for performing Data Guard administrative tasks on all database instances that run from the specified Oracle home directory.

ORA_HOMENAME_SYSKM

SYSKM system privileges for all instances that run from the Oracle home with a name of HOMENAME.

OSKMDBA group for a specific Oracle home with a name of HOMENAME.

Members of this group have privileges necessary for performing encryption key management tasks on all database instances that run from the specified Oracle home directory.

During the installation of Oracle Database, all groups mentioned in the table are populated for proper operation of Oracle products. You must not remove any group member populated by Oracle. However, if you want to assign specific database privileges to new Windows operating system users, then you can manually add users to these groups after the installation completes.

See Also:

- "Database Administrator Authentication" section in Oracle Database Administrator's Guide for more information about database system privileges

- "Authentication for Accessing Oracle ASM Instances" section in Oracle Automatic Storage Management Administrator's Guide for more information about Oracle ASM system privileges

Oracle creates other groups, such as, ORA_INSTALL, ORA_CLIENT_LISTENERS, ORA_GRID_LISTENERS, ORA_HOMENAME_SVCSIDS during installation and you should not change these groups, memberships, and ACLs associated with various Oracle created groups.

See Also:
"About Job Role Separation Operating System Privileges Groups and Users" in Oracle Database Installation Guide for Microsoft Windows

10 Creating Required Directories

Note:
You must complete this procedure only to place the Oracle database or recovery files on a separate file system from the Oracle base directory.

To create directories for the Oracle database or recovery files on separate file systems from the Oracle base directory, follow these steps:

1. Use Windows Explorer to determine the free disk space on the file system.

2. From the display, identify the file systems to use:

File Type

File System Requirements

Data files

Choose either:

- A single file system with at least 950 MB of free disk space.

- Two or more file systems with at least 950 MB of free disk space in total.

Recovery files

Choose a file system with at least 2 GB of free disk space.

If you are using the same file system for multiple types of files, then add the disk space requirements for each type to determine the total disk space requirement.

3. Note the names of the directories for the file systems that you identified.

4. If you also want to use Oracle Automatic Storage Management, see section "Preparing Disks for Oracle Automatic Storage Management" in Oracle Database Installation Guide for Microsoft Windows for instructions.

11 Install the Oracle Database Software

To install the Oracle Database software:

Note:
If you run Oracle Universal Installer when Windows Scheduler jobs are running, then you may encounter unexplained installation problems if your Windows Scheduler job is performing cleanup, and temporary files are deleted before the installation is finished. Oracle recommends that you complete installation before the Windows Scheduler jobs are run, or disable Windows Scheduler jobs that perform cleanup of temporary files until after the installation is completed.

1. Log in to Windows as an Administrator user.
If you are installing on a Primary Domain Controller (PDC) or a Backup Domain Controller (BDC), log on as a member of the Domain Administrators group.

2. If you are installing Oracle Database on a computer with multple Network Interface Cards or multiple aliases, use System in the Control Panel to create the ORACLE_HOSTNAME system environment variable. Set this variable to point to the host name of the computer on which you are installing Oracle Database.

3. Navigate to the location of the installation media for Oracle Database Client 12c Release 1 (12.1), open a command prompt with administrator privileges, and run the setup.exe command.
Use the same installation media to install Oracle Database on all supported Windows operating systems.

4. Follow these guidelines to complete the installation:

- Do not install Oracle Database 12c Release 1 (12.1) software into an existing Oracle home.

- Follow the instructions displayed in the Oracle Universal Installer screens. If you need additional information, click Help.

- When prompted for a password, follow these guidelines:
The installation does not continue if the following requirements are not met.

- Password cannot exceed 30 characters.

- Password cannot contain invalid characters: ! @ % ^ & * ( ) + = \ | ` ~ [ { ] } ; : ' " , < > ?

- A user name cannot be a password.

- An empty password cannot be accepted.

- The SYS account password cannot be change_on_install. (case-insensitive)

- The SYSTEM account password cannot be manager. (case-insensitive)

- The DBSNMP account password cannot be dbsnmp. (case-insensitive)

- If you choose to use the same password for all the accounts, then that password cannot be change_on_install, manager, or dbsnmp. (case-insensitive)

Note:

- You must remember the passwords that you specify.

- If you select the option to create the database as a multitenant container database, then you must provide the pluggable database administrator password.

- Do not modify the Java Runtime Environment (JRE) except by using a patch provided by Oracle Support Services. Oracle Universal Installer automatically installs the Oracle-supplied version of the JRE. This version is required to run Oracle Universal Installer and several Oracle assistants.

- If you encounter errors while installing or linking the software, see Appendix F in Oracle Database Installation Guide for Microsoft Windows for information about troubleshooting.

- If you chose an installation type that runs Database Configuration Assistant and Oracle Net Configuration Assistant in interactive mode, you must provide detailed information about configuring your database and network.
If you need assistance when using the Database Configuration Assistant or Oracle Net Configuration Assistant in interactive mode, click Help on any screen.

Note:
If you chose a default installation, Database Configuration Assistant and Oracle Net Configuration Assistant run non-interactively.

5. When the Configuration Assistant tasks are complete, click Finish, click Exit, then click Yes to exit from Oracle Universal Installer.

6. Optionally, delete the OraInstalldate_time directory to remove the temporary files that were created during the installation process. The OraInstalldate_time directory holds about 45 MB of files. This directory is created in the location set by the TEMP environment variable setting.
Restarting your computer also removes the OraInstalldate_time directory.

7. See Chapter 6, "Oracle Database Postinstallation Tasks" in Oracle Database Installation Guide for Microsoft Windows for information about postinstallation tasks that you must complete after you have installed Oracle Database.

The following table lists the various screens displayed during a Typical installation for Oracle Database 12c:

Screen

Recommended Action

Configure Security Updates

Enter your e-mail address, preferably your My Oracle Support (formerly OracleMetaLink) e-mail address or user name in the Email field.
You can select the I wish to receive security updates via My Oracle Support check box to receive security updates.

Enter your My Oracle Support password in the My Oracle Support Password field.

Click Next.

Select Installation Option

Select one of the following installation options, click Next.

- Create and configure a database: This option creates a new database along with sample schemas.

- Install database software only: This option installs only the database binaries. To configure database, you must run Oracle Database Configuration Assistant after the software installation.

- Upgrade an existing database: This option installs the software binaries in a new Oracle home. At the end of the installation, you can upgrade the existing database.

System Class

Select the type of system for installing the database, click Next.

- Desktop Class: Choose this option if you are installing on a laptop or desktop class system. This option includes a starter database and allows minimal configuration. This option is designed for those who want to quickly set up a database.

- Server Class: Choose this option if you are installing on a server class system, such as what you would use when deploying Oracle in a production data center. This option allows for more advanced configuration options. Advanced configuration options available using this option include Oracle RAC, Oracle Automatic Storage Management, backup and recovery configuration, integration with Enterprise Manager Cloud Control, and more fine-grained memory tuning, among many others.

Grid Installation Options

Select the type of database installation you want to perform, click Next.

- Single instance database installation: This option installs the database and the listener.

- Oracle Real Application Clusters database installation: This option installs Oracle Real Application Clusters.

- Oracle RAC One Node database installation: This option installs Oracle RAC One Node database.

Select Install Type

Select one of the following, then click Next:

- Typical Install: This installation method is selected by default. It lets you quickly install Oracle Database using minimal input. It installs the software and optionally creates a general-purpose database using the information that you specify on this screen.

- Advanced Install: This installation method enables to perform more complex installations, such as creating individual passwords for different accounts, creating specific types of starter databases (for example, for transaction processing or data warehouse systems), using different language groups, specifying e-mail notifications, and so on.

Specify Oracle Home User

Starting with Oracle Database 12c, Oracle recommends that you use Windows Built-in Account or specify a standard Windows User Account (not an Administrator account) to install and configure the Oracle home. This account is used for running the Windows services for the Oracle home. Do not log in using this account to perform administrative tasks. Select one of the following, then click Next.

- Use Existing Windows User
The account can be a Windows Local User, Windows Domain User or Windows Managed Services Account (MSA). You must provide both the user name and password for a Windows Local or Domain User. For Windows MSA, which is a managed domain account, only the user name is required.

- Create New Windows User
Provide the user name and password for the Windows Local User that you want Oracle Universal Installer to create. Confirm the password. The new user that is created is denied interactive logon privileges to the Windows computer. However, a Windows administrator can manage this account like any other Windows account.

Select Use Windows Built-in Account if you do not want to specify an Oracle Home User during installation. No user name or password is required and the Windows services for the Oracle home run as the LocalSystem or LocalService.

For Database Server installation, Oracle recommends that you use a standard Windows User Account (instead of Windows Built-in Account) as the Oracle Home User for enhanced security.

See Also: "Managing Oracle Home User" in Oracle Database Platform Guide for Microsoft Windows

Typical Install Configuration

- The Oracle base path appears by default. You can change the path based on your requirement. Specify Oracle Base, Software location, and Database file location.
The Oracle base directory is a top-level directory for Oracle software installations owned by an Oracle installation owner account. The default Oracle base path is DRIVE_LETTER:\app\user, where user is the user account running the installation. You can change the path based on your requirements.

In the Software location field, accept the default value or enter the Oracle home directory path in which you want to install Oracle components. The directory path should not contain spaces.

- Database edition: Choose from the list between Enterprise Edition, Standard Edition, Standard Edition One, or Standard Edition 2.

- Character set: This option enables you to store the character data in the database in one of the methods. Choose between Defaul or Unicode.

- Global database name: Specify the Global Database Name using the following syntax:

database_unique_name.db_domain

where:

- database_unique_name is the name of the database. It can contain a maximum of 30 characters as long as the first eight characters are unique and begin with an alphabetic character. The characters can include alphanumeric, underscore (_), dollar ($), and pound (#), no other special characters are permitted in a database name.

- db_domain is the computer environment used for the database. It should contain no more than 128 characters (alphanumeric, underscore (_), and pound (#)), inclusive of all periods.

Note: Ensure that the combination of database name (first eight unique characters of database unique name), delimiter, and the database domain name does not exceed 128 characters.

For example:

sales.us.example.com

where:

- database_unique_name is sales

- db_domain is us.example.com

- Administrative password: Provide the password and confirm the same.

- Select the Create as Container database option to create the database as a multitenant container database (CDB) that can support one pluggable database (PDB). If you want Oracle Universal Installer to create a PDB when it creates the CDB, specify the PDB name in the Pluggable database name field.
The PDB name must be unique and must follow the database naming conventions. See section "Identifying Databases" in Oracle Database Installation Guide for Microsoft Windows.

To create additional PDBs and to manage PDBs, use Oracle Database Configuration Assistant.

Perform Prerequisite Checks

This option checks if the minimum system requirements to perform the database installation are met.
Click Fix & Check Again, if you want the installer to fix the problem and check the system requirements once more.

If you click Check Again, then you can run the prerequisite check again to see if the minimum requirements are met to carry on with the database installation.

To get a list of failed requirements, select Show Failed from the list. To get a list of all the prerequirement checks run by the OUI, select Show All. To get a list of the prerequirement checks that are successful, select Show Succeeded.

Note: Oracle recommends that you use caution in checking the Ignore All option. If you check this option, then Oracle Universal Installer may not confirm that your system can install Oracle Database successfully.

Summary

Review the information displayed on this screen, and click Install.
Note: You can save all the installation steps into a response file by clicking Save Response File. Later, this file can be used for a silent installation.

Install Product

This screen displays the progress of a database installation. It also shows the status information while the product is being installed. Click Next.
This screen then displays the status information for the configuration assistants that configure the software and create a database. When the message is displayed after Database Configuration Assistant process, click OK to continue.

Finish

This screen is shown automatically when all the configuration tools are successful.

12 Installing Oracle Database Examples

If you plan to use the following products or features, then download and install the products from the Oracle Database Examples media:

- Oracle JDBC Development Drivers

- Oracle Database Examples

- Oracle Text Knowledge Base

For detailed information about various Oracle product demonstrations, see Oracle Database Examples Installation Guide.

13 What to Do Next?

To become familiar with this release of Oracle Database, Oracle suggests that you complete the following tasks:

- Log in to Oracle Enterprise Manager Database Express using a web browser.
Oracle Enterprise Manager Database Express 12c is a web-based management tool built into Oracle Database without any need for special installation or management. You can use Oracle Enterprise Manager Database Express to manage a single Oracle Database installation. The default URL for Oracle Enterprise Manager Database Express is similar to the following:

http://host.domain:port/em/

Log in with the user name SYSMAN. Use the password that you specified for this user during the Oracle Database installation.

- See Chapter 6 of Oracle Database Installation Guide for Microsoft Windows for information about required and optional postinstallation tasks, depending on the components to use.

- Review Chapter 7 of Oracle Database Installation Guide for Microsoft Windows for information about how to get started using Oracle Database.

- Read Oracle Database 2 Day DBA guide, to learn more about using Oracle Enterprise Manager Database Express to administer a database.

14 Additional Information

This section contains information about the following:

- Product Licenses

- Purchasing Licenses, Version Updates, and Documentation

- Contacting Oracle Support Services

- Locating Product Documentation

Product Licenses

You are welcome to install and evaluate the products included in this media pack for 30 days under the terms of the Trial License Agreement. However, you must purchase a program license to continue using any product after the 30 day evaluation period. See the following section for information about purchasing program licenses.

See Also:
Oracle Database Licensing Information

Purchasing Licenses, Version Updates, and Documentation

You can purchase program licenses and updated versions of Oracle products from the Oracle Store Web site:

https://shop.oracle.com/">>https://shop.oracle.com/

Contacting Oracle Support Services

If you have purchased Oracle Product Support, you can call Oracle Support Services for assistance 24 hours a day, seven days a week. For information about purchasing Oracle Product Support or contacting Oracle Support Services, go to the Oracle Support Services Web site:

http://www.oracle.com/us/support/index.html

Locating Product Documentation

Product documentation includes information about configuring, using, or administering Oracle products on any platform. The product documentation for Oracle Database 12c Release 1 (12.1) is available in both HTML and PDF formats on Oracle Technology Network (OTN) at:

http://www.oracle.com/technetwork/indexes/documentation/index.html

15 Documentation Accessibility

For information about Oracle's commitment to accessibility, visit the Oracle Accessibility Program website at http://www.oracle.com/pls/topic/lookup?ctx=acc&id=docacc.

Access to Oracle Support

Oracle customers have access to electronic support through My Oracle Support. For information, visit http://www.oracle.com/pls/topic/lookup?ctx=acc&id=info or visit http://www.oracle.com/pls/topic/lookup?ctx=acc&id=trs if you are hearing impaired.

Oracle Database Installation Guide, 12c Release 1 (12.1) for Microsoft Windows x64 (64-Bit)

E56576-02

Copyright © 1996, 2015, Oracle and/or its affiliates. All rights reserved.

This software and related documentation are provided under a license agreement containing restrictions on use and disclosure and are protected by intellectual property laws. Except as expressly permitted in your license agreement or allowed by law, you may not use, copy, reproduce, translate, broadcast, modify, license, transmit, distribute, exhibit, perform, publish, or display any part, in any form, or by any means. Reverse engineering, disassembly, or decompilation of this software, unless required by law for interoperability, is prohibited.

The information contained herein is subject to change without notice and is not warranted to be error-free. If you find any errors, please report them to us in writing.

If this is software or related documentation that is delivered to the U.S. Government or anyone licensing it on behalf of the U.S. Government, then the following notice is applicable:

U.S. GOVERNMENT END USERS: Oracle programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, delivered to U.S. Government end users are "commercial computer software" pursuant to the applicable Federal Acquisition Regulation and agency-specific supplemental regulations. As such, use, duplication, disclosure, modification, and adaptation of the programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, shall be subject to license terms and license restrictions applicable to the programs. No other rights are granted to the U.S. Government.

This software or hardware is developed for general use in a variety of information management applications. It is not developed or intended for use in any inherently dangerous applications, including applications that may create a risk of personal injury. If you use this software or hardware in dangerous applications, then you shall be responsible to take all appropriate fail-safe, backup, redundancy, and other measures to ensure its safe use. Oracle Corporation and its affiliates disclaim any liability for any damages caused by use of this software or hardware in dangerous applications.

Oracle and Java are registered trademarks of Oracle and/or its affiliates. Other names may be trademarks of their respective owners.

Intel and Intel Xeon are trademarks or registered trademarks of Intel Corporation. All SPARC trademarks are used under license and are trademarks or registered trademarks of SPARC International, Inc. AMD, Opteron, the AMD logo, and the AMD Opteron logo are trademarks or registered trademarks of Advanced Micro Devices. UNIX is a registered trademark of The Open Group.

This software or hardware and documentation may provide access to or information about content, products, and services from third parties. Oracle Corporation and its affiliates are not responsible for and expressly disclaim all warranties of any kind with respect to third-party content, products, and services unless otherwise set forth in an applicable agreement between you and Oracle. Oracle Corporation and its affiliates will not be responsible for any loss, costs, or damages incurred due to your access to or use of third-party content, products, or services, except as set forth in an applicable agreement between you and Oracle.

Oracle Legal Notices

Copyright Notice

Copyright © 1994-2015, Oracle and/or its affiliates. All rights reserved.

Trademark Notice

Oracle and Java are registered trademarks of Oracle and/or its affiliates. Other names may be trademarks of their respective owners.

Intel and Intel Xeon are trademarks or registered trademarks of Intel Corporation. All SPARC trademarks are used under license and are trademarks or registered trademarks of SPARC International, Inc. AMD, Opteron, the AMD logo, and the AMD Opteron logo are trademarks or registered trademarks of Advanced Micro Devices. UNIX is a registered trademark of The Open Group.

License Restrictions Warranty/Consequential Damages Disclaimer

This software and related documentation are provided under a license agreement containing restrictions on use and disclosure and are protected by intellectual property laws. Except as expressly permitted in your license agreement or allowed by law, you may not use, copy, reproduce, translate, broadcast, modify, license, transmit, distribute, exhibit, perform, publish, or display any part, in any form, or by any means. Reverse engineering, disassembly, or decompilation of this software, unless required by law for interoperability, is prohibited.

Warranty Disclaimer

The information contained herein is subject to change without notice and is not warranted to be error-free. If you find any errors, please report them to us in writing.

Restricted Rights Notice

If this is software or related documentation that is delivered to the U.S. Government or anyone licensing it on behalf of the U.S. Government, the following notice is applicable:

U.S. GOVERNMENT END USERS: Oracle programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, delivered to U.S. Government end users are "commercial computer software" pursuant to the applicable Federal Acquisition Regulation and agency-specific supplemental regulations. As such, use, duplication, disclosure, modification, and adaptation of the programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, shall be subject to license terms and license restrictions applicable to the programs. No other rights are granted to the U.S. Government.

Hazardous Applications Notice

This software or hardware is developed for general use in a variety of information management applications. It is not developed or intended for use in any inherently dangerous applications, including applications that may create a risk of personal injury. If you use this software or hardware in dangerous applications, then you shall be responsible to take all appropriate fail-safe, backup, redundancy, and other measures to ensure its safe use. Oracle Corporation and its affiliates disclaim any liability for any damages caused by use of this software or hardware in dangerous applications.

Third-Party Content, Products, and Services Disclaimer

This software or hardware and documentation may provide access to or information on content, products, and services from third parties. Oracle Corporation and its affiliates are not responsible for and expressly disclaim all warranties of any kind with respect to third-party content, products, and services. Oracle Corporation and its affiliates will not be responsible for any loss, costs, or damages incurred due to your access to or use of third-party content, products, or services.

Alpha and Beta Draft Documentation Notice

If this document is in preproduction status:

This documentation is in preproduction status and is intended for demonstration and preliminary use only. It may not be specific to the hardware on which you are using the software. Oracle Corporation and its affiliates are not responsible for and expressly disclaim all warranties of any kind with respect to this documentation and will not be responsible for any loss, costs, or damages incurred due to the use of this documentation.